UBVRI(JHKLMN) - Johnson - 1965 (continues)

N λ_c = 10.38 λ_∘ = 10.40 λ_{peak} = 8.63 λ_{gauss} = 10.18 3000 1500 800 400 200 100 WHM = 5.75 W10% = 6.72 W80% = 0.94 FWHM = 4.19 9.25 9.36 9.55 10.01 10.98 12.19 W_∘ = 4.46 [3.77] [3.90] [4.08] [4.21] [3.76] [2.30] μ = 1.82 I_{asym} = 0.11 λ_{ef f} (T ) = 9.15 + 2.85 Ψ + 3.00 Ψ^2 − 2.82 Ψ^3 W_{ef f} (T ) = 3.61 + 5.32 Ψ − 13.39 Ψ^2 + 6.76 Ψ^3 I_{kurt} = −1.20