PLATE 021−03.1 We 1-7

022+01.1 MaC 1-13

023+04.1* MA 3

022+04.1* MA 2

022−04.1* IRAS18442-1144

023+01.1* MA 13

PLATE 023−07.1 MaC 1-16

028+10.1 WeSb 3

029−00.1 ToDo 5

027+16.1* DeHt 2

028−02.1* SP 2-149

029−07.1 LSA 1

PLATE 029−21.1* LSIV-12 111

030−07.1* MaC 1-17

031−00.2* HtTr 10

030+06.1* Sh 2-68

031−00.1 WeSb 4

032−00.1 CBSS 2

PLATE 032−01.1 CBSS 1

033−02.2 CBSS 3

034−11.1* PN 1933-0400

033−01.1* SP 2-151

034−10.1* HtDe 11

035+03.1 PN 1841+0343

PLATE 036+21.1* Y-C 44

036−01.2* HtTr 11

036−02.1* HtTr 13

036+20.1* Y-C 45

036−01.3* IRAS19021+0209

037−05.1 A 58