0

TABLE 1 Spectroscopically Identified Quasars

Catalog U U B B V V R R I75 I75 I86 I86 Quasar I.D. z mag error mag error mag error mag error mag error mag error

DMS0059�0051 6343 1w 0.84? 19.998 0.015 20.652 0.018 20.071 0.024 19.633 0.012 19.709 0.014 19.357 0.020 DMS0059�0055 627 1e 0.296 16.012 0.021 16.784 0.025 16.621 0.024 16.344 0.017 16.703 0.020 15.835 0.020 DMS0059�0056 5923 1w 2.63 21.155 0.031 21.434 0.032 21.093 0.023 20.893 0.019 21.172 0.039 20.931 0.045 DMS0059�0059 5589 1w 1.92 19.806 0.015 20.504 0.018 20.355 0.017 20.178 0.012 20.265 0.018 20.125 0.019 DMS0059�0103 5252 1w 0.71? 20.757 0.021 21.258 0.030 21.114 0.021 20.945 0.019 20.991 0.036 20.670 0.048 DMS0059�0104 5147 1w 1.05? 20.669 0.019 21.567 0.027 21.042 0.027 20.762 0.016 20.881 0.031 20.731 0.051 DMS0100�0057 481 1e 0.77? 20.011 0.021 20.602 0.025 20.405 0.024 20.104 0.017 20.090 0.022 19.740 0.020 DMS0100.1�0058 447 1e 1.73 18.855 0.021 19.432 0.025 19.134 0.024 18.781 0.017 18.841 0.020 18.792 0.020 DMS0100.3�0058 455 1e 1.17 19.987 0.021 20.795 0.025 20.317 0.024 19.981 0.017 20.258 0.024 20.209 0.033 DMS1034�0040 1108 10e 1.22? 17.942 0.015 18.617 0.025 18.481 0.017 18.114 0.012 18.255 0.014 18.326 0.014 DMS1034�0045 708 10e 0.94? 19.061 0.015 19.734 0.025 19.392 0.017 19.178 0.012 19.392 0.014 19.394 0.015 DMS1358�0031 1780 14n 2.55 18.813 0.015 19.082 0.018 18.872 0.017 18.552 0.012 18.738 0.014 18.500 0.014 DMS1358�0036 1175 14n 0.9? 18.141 0.015 18.829 0.018 18.436 0.017 18.262 0.012 18.576 0.014 18.465 0.014 DMS1358�0039 726 14n 1.34? 20.834 0.040 21.512 0.029 21.575 0.040 21.014 0.025 21.163 0.059 20.970 0.073 DMS1358�0045 74 14n ? 21.113 0.050 21.010 0.018 20.822 0.021 20.695 0.020 21.028 0.051 20.947 0.067 DMS1358�0047 6542 14s 2.04 19.955 0.016 20.767 0.018 20.652 0.029 20.348 0.034 20.374 0.043 19.881 0.024 DMS1358�0050 6260 14s 1.34 20.199 0.020 20.967 0.020 20.873 0.021 20.427 0.020 20.601 0.037 20.436 0.040 DMS1358�0052 6058 14s 0.85? 19.773 0.015 20.441 0.025 20.321 0.017 19.885 0.023 19.784 0.017 19.738 0.021 DMS1358�0054 5879 14s 2.81 20.462 0.023 20.462 0.018 20.188 0.017 19.832 0.024 19.950 0.018 20.004 0.025 DMS1358�0055 5751 14s 3.38 23.212 0.263 21.410 0.024 20.248 0.017 19.723 0.013 19.663 0.015 19.345 0.014 DMS1358�0100 5208 14s 0.82? 20.229 0.019 20.893 0.018 20.561 0.018 20.280 0.018 20.559 0.034 20.199 0.031 DMS1358�0101 5112 14s 1.25? 20.747 0.031 21.510 0.030 21.605 0.062 21.036 0.063 21.170 0.090 20.985 0.066 DMS1358�0102 5042 14s 0.82 19.424 0.015 20.054 0.018 19.732 0.017 19.506 0.012 19.729 0.017 19.424 0.016 DMS1359�0030 1816 14n 0.86 20.659 0.036 21.549 0.024 21.045 0.023 20.682 0.018 20.552 0.033 20.071 0.030 DMS1359�0036 1076 14n 1.14? 20.328 0.026 21.252 -0.019 20.724 0.017 20.409 0.014 20.539 0.032 20.542 0.046 DMS1359�0056 5621 14s 1.85 20.824 0.033 21.535 0.033 21.675 0.043 21.407 0.048 21.438 0.074 21.380 0.093 DMS1714+4951 5074 17s 3.3 23.271 0.281 22.665 0.053 21.161 0.020 20.805 0.023 20.842 0.048 20.783 0.062 DMS1714+4959 6116 17s 1.55? 21.574 0.042 21.751 0.027 21.358 0.021 20.681 0.013 20.590 0.024 20.369 0.030 DMS1714+5000 6232 17s 1.95 19.829 0.015 20.676 0.018 20.667 0.017 20.360 0.012 20.372 0.021 20.140 0.026 DMS1714+5002 6660 17s 1.94 19.236 0.015 20.044 0.018 19.903 0.017 19.581 0.012 19.555 0.014 19.302 0.014 DMS1714+5003 6774 17s 2.8 21.119 0.030 21.300 0.021 21.166 0.020 20.562 0.014 20.587 0.025 20.558 0.037 DMS1714+5012 616 17n 2.80 20.218 0.016 20.134 0.018 19.828 0.017 19.561 0.012 19.546 0.020 19.514 -0.014 DMS1714+5014 933 17n 1.19 21.330 0.041 22.134 0.043 21.916 0.038 21.299 0.022 21.264 0.038 21.116 0.049 DMS1714+5016 1126 17n 1.12 18.790 0.015 19.787 0.018 19.346 0.017 19.076 0.012 19.244 0.014 19.287 0.014 DMS1714+5019 1517 17n 1.52 20.153 0.016 20.866 0.018 20.892 0.017 20.398 0.012 20.395 0.017 20.356 0.024 DMS1714+5020 1751 17n 0.68 19.295 0.015 19.818 0.018 19.567 0.017 19.215 0.012 19.137 0.014 18.894 0.014 DMS1714+5021 1799 17n 1.51 20.384 0.020 21.062 0.019 21.005 0.017 20.428 0.012 20.491 0.018 20.422 0.025 DMS1714+5022 2006 17n 1.8? 21.091 0.034 21.849 0.035 21.730 0.035 21.555 0.030 21.635 0.055 21.669 0.124 DMS1715+4952 5098 17s 1.85 20.233 0.015 21.011 0.018 21.436 0.024 20.978 0.027 20.992 0.052 20.828 0.048 DMS1715+5013 681 17n 1.19 20.689 0.025 21.476 0.026 21.209 0.022 20.768 0.013 20.902 0.029 20.767 0.051 DMS1715+5014 948 17n 1.62 20.941 0.032 21.555 0.029 21.651 0.031 21.192 0.021 21.104 0.035 21.069 0.046 DMS1715+5015 968 17n 1.55 20.140 0.016 20.562 0.018 20.418 0.017 19.872 0.012 19.802 0.014 19.840 0.015 DMS1715+5024 2176 17n 1.68? 20.948 0.036 21.878 0.046 21.601 0.034 21.059 0.021 20.910 0.047 21.122 0.057 DMS2138�0352 7113 21w 1.23 20.445 0.025 21.285 0.027 21.036 0.036 20.468 0.023 20.751 0.053 20.687 0.078 DMS2139�0351 7190 21w 1.91 20.863 0.032 21.546 0.030 21.352 0.029 21.006 0.023 20.870 0.033 20.589 0.053 DMS2139�0356 6596 21w 2.36 18.415 0.015 18.797 0.018 18.661 0.017 18.348 0.012 18.509 0.014 18.235 0.020 DMS2139.0�0405 5448 21w 3.32 23.250 0.333 22.012 0.041 20.805 0.021 20.530 0.015 20.717 0.029 20.706 0.065 DMS2139.1�0405 5406 21w 1.60 20.889 0.035 21.532 0.033 21.471 0.034 21.108 0.025 21.093 0.042 21.225 0.093 DMS2140�0401 1014 21e 2.05 21.057 0.032 21.518 0.028 21.344 0.029 21.090 0.025 21.097 0.042 20.666 0.041 DMS2245�0205 6245 22w 2.15 20.104 0.017 20.735 0.018 20.620 0.018 20.308 0.013 20.495 0.028 19.960 0.032 DMS2245�0208 5974 22w 0.86? 21.608 0.058 22.223 0.058 21.890 0.050 21.523 0.037 21.558 0.068 21.039 0.079

TABLE 1—Continued

Catalog U U B B V V R R I75 I75 I86 I86 Quasar I.D. z mag error mag error mag error mag error mag error mag error

DMS2246�0205 1275 22e 1.92 19.478 0.015 20.242 0.018 20.244 0.024 19.859 0.017 19.815 0.020 19.536 0.020 DMS2246�0215 5218 22w 1.38 19.029 0.015 19.812 0.018 19.596 0.017 19.056 0.012 19.103 0.014 18.964 0.020 DMS2247�0201 1749 22e 1.03 20.500 0.022 21.226 0.022 20.724 0.017 20.413 0.013 20.542 0.035 20.447 0.028 DMS2247�0209 922 22e 4.3 23.520 0.333 23.980 0.333 21.558 0.026 20.091 0.012 19.802 0.014 19.495 0.014