TABLE 1 Deep Multicolor Survey Fields

Field RA (1950.0) Dec (1950.0) l(II) b(II) Area^a E(B-V)^b

01e 01:00:16 −00:57:52 129.3069 −63.4266 292.4 0.0192 01w 00:59:21 −00:57:55 128.7997 −63.4488 224.9 0.0273 10e 10:34:19 −00:44:40 248.4348 47.1235 286.0 0.0302 14n 13:58:40 −00:37:06 336.7107 57.3613 288.5 0.0283 14s 13:58:40 −00:54:24 336.4456 57.1110 272.8 0.0263 17n 17:14:43 +50:16:47 76.9826 35.5101 266.0 0.0082 17s 17:14:45 +50:00:01 76.6398 35.4963 285.9 0.0093 21e 21:39:57 −04:00:06 51.8119 −39.2835 247.0 0.0243 21w 21:39:01 −04:00:01 51.6505 −39.0849 290.0 0.0203 22e 22:47:04 −02:09:11 68.6033 −51.4310 286.9 0.0542 22w 22:46:07 −02:09:14 68.3400 −51.2595 249.7 0.0492

aUnits of square arcminutes.

bCalculated with a program supplied by D. Burstein, using data given in Burstein & Heiles 1978 and Burstein & Heiles 1982.

TABLE 2 Observations

Field Filter Frame Exposure^a UT Date UT Time Airmass Seeing(^{00}) Zeropoint^b

01e U 1. 1350 90/8/24 11:13 1.219 1.60 -20.69 B 1. 1080 90/8/23 11:00 1.194 1.21 -21.66 V 1. 540 90/8/23 10:45 1.177 1.10 -22.37 R 1. 540 90/8/23 11:22 1.216 1.22 -22.02 I75 1. 540 90/8/23 11:35 1.239 1.28 -21.98 I86 1. 1080 90/8/24 11:41 1.268 2.03 -21.48 01w U 1. 1350 90/8/22 10:15 1.170 1.15 -20.85 U 2. 1350 90/8/22 10:41 1.178 1.24 -20.82 B 1. 1080 90/8/23 10:09 1.170 1.53 -21.77 B 2. 1080 90/8/21 10:42 1.175 1.39 -22.79 V 1. 540 90/8/23 10:31 1.172 1.26 -22.46 V 2. 540 90/8/21 10:29 1.170 1.14 -22.47 R 1. 540 90/8/22 9:48 1.181 0.93 -22.02 R 2. 540 90/8/21 11:04 1.187 1.06 -21.03 I75 1. 540 90/8/21 10:02 1.173 1.00 -21.96 I75 2. 540 90/8/21 11:18 1.201 0.99 -21.99 I86 1. 1080 90/8/22 11:31 1.228 1.39 -21.44 I86 2. 1080 90/8/22 11:14 1.207 0.95 -21.41 10e U 1. 1350 91/4/15 6:07 1.338 1.36 -20.74 U 2. 1350 91/4/15 6:43 1.475 1.37 -20.75 B 1. 1080 91/4/15 7:10 1.615 1.29 -21.73 V 1. 540 91/4/14 4:34 1.191 1.41 -22.49 V 2. 540 91/4/14 4:47 1.195 1.62 -22.48 R 1. 675 91/4/14 5:02 1.204 1.57 -22.06 R 2. 675 91/4/14 5:17 1.218 1.66 -22.06 I75 1. 540 91/4/14 5:32 1.237 1.69 -22.05 I75 2. 540 91/4/14 5:45 1.258 1.72 -22.05 I86 1. 1080 91/4/14 6:00 1.302 1.65 -21.48 I86 2. 1080 91/4/15 5:43 1.244 1.02 -21.50 14n U 1. 1350 91/4/14 9:08 1.269 2.35 -20.71 U 2. 1350 91/4/14 9:35 1.336 2.66 -20.77 B 1. 1080 91/4/15 7:45 1.190 1.10 -21.77 B 2. 1080 91/4/15 8:07 1.195 1.16 -21.76 V 1. 540 91/4/14 7:12 1.210 1.54 -22.50 V 2. 540 91/4/14 6:59 1.225 1.48 -22.50 R 1. 675 91/4/14 7:26 1.198 1.74 -22.06 R 2. 675 91/4/14 7:41 1.191 1.70 -22.06 I75 1. 540 91/4/14 8:09 1.192 1.95 -22.06 I75 2. 540 91/4/14 7:56 1.189 2.03 -21.06 I86 1. 1080 91/4/14 8:23 1.202 1.87 -21.48 I86 2. 1080 91/4/14 8:45 1.225 1.91 -21.48 14s U 1. 1350 91/4/16 9:59 1.459 1.69 -20.61 U 2. 1350 91/4/16 8:45 1.244 1.43 -20.57 B 1. 1080 91/4/15 7:10 1.208 1.07 -21.77 B 2. 1080 91/4/17 9:48 1.420 1.88 -21.77 V 1. 540 91/4/16 8:01 1.196 1.31 -22.30 V 2. 540 91/4/15 8:51 1.238 1.02 -22.50 R 1. 675 91/4/16 8:31 1.203 1.40 -21.33

TABLE 2—Continued

Field Filter Frame Exposure^a UT Date UT Time Airmass Seeing(^{00}) Zeropoint^b

R 2. 675 91/4/15 9:05 1.263 1.08 -22.06 I75 1. 540 91/4/17 8:31 1.221 2.12 -22.03 I75 2. 540 91/4/16 8:31 1.216 1.44 -21.71 I86 1. 1080 91/4/14 6:00 1.297 1.17 -21.46 I86 2. 1080 91/4/16 9:35 1.259 1.27 -21.44 17n U 1. 1350 91/4/16 10:47 1.053 1.57 -20.38 U 2. 1350 91/4/15 11:01 1.053 1.06 -20.65 B 1. 1080 91/4/15 10:37 1.056 0.97 -21.73 B 2. 1080 91/4/16 11:14 1.055 1.40 -21.52 V 1. 540 91/4/14 10:21 1.066 1.47 -22.50 V 2. 540 91/4/14 10:36 1.059 1.47 -22.50 R 1. 675 91/4/14 10:50 1.055 1.34 -22.06 R 2. 675 91/4/14 11:06 1.053 1.25 -22.06 I75 1. 540 91/4/14 11:21 1.054 1.20 -22.06 I75 2. 540 91/4/14 11:33 1.056 1.16 -22.06 I86 1. 1080 91/4/15 11:29 1.058 0.90 -21.48 I86 2. 1080 91/4/15 10:14 1.065 0.90 -21.48 17s U 1. 1350 90/8/21 5:42 1.289 1.27 -20.76 U 2. 1350 90/8/24 4:20 1.137 1.26 -20.75 B 1. 1080 90/8/21 4:53 1.169 1.39 -21.79 B 2. 1080 90/8/23 4:04 1.107 1.44 -21.77 V 1. 540 90/8/21 4:40 1.139 1.11 -22.49 V 2. 540 90/8/23 4:26 1.129 1.15 -22.49 R 1. 540 90/8/23 4:45 1.159 1.21 -22.02 R 2. 540 90/8/21 5:16 1.205 1.23 -22.05 I75 1. 540 90/8/21 5:29 1.234 1.06 -21.99 I75 2. 540 90/8/23 4:57 1.183 1.35 -21.95 I86 1. 1080 90/8/23 3:41 1.083 1.25 -21.40 I86 2. 1080 90/8/23 6:10 1.371 1.30 -21.41 21e U 1. 1350 90/8/24 5:27 1.318 1.71 -20.83 U 2. 1350 90/8/24 5:53 1.271 1.48 -20.83 B 1. 1080 90/8/23 5:57 1.274 1.25 -21.81 B 2. 1080 90/8/24 6:44 1.233 1.78 -21.81 V 1. 540 90/8/24 7:06 1.234 1.54 -22.50 V 2. 540 90/8/23 5:42 1.308 1.28 -22.49 R 1. 540 90/8/24 7:19 1.240 1.57 -22.03 R 2. 540 90/8/23 6:20 1.251 1.21 -22.02 I75 1. 540 90/8/24 7:32 1.250 1.38 -22.00 I75 2. 540 90/8/23 6:33 1.241 1.34 -21.99 I86 1. 1080 90/8/23 7:13 1.237 1.11 -21.44 I86 2. 1080 90/8/24 6:21 1.243 1.28 -21.44 21w U 1. 1350 90/8/21 7:41 1.256 1.86 -20.66 U 2. 1350 90/8/22 6:23 1.246 1.44 -20.72 B 1. 1080 90/8/21 6:51 1.234 1.86 -21.77 B 2. 1080 90/8/22 5:34 1.321 1.19 -21.77 V 1. 540 90/8/21 6:38 1.242 1.55 -22.49 V 2. 540 90/8/22 5:21 1.366 1.17 -22.48 R 1. 540 90/8/22 5:57 1.285 1.02 -22.02

TABLE 2—Continued

Field Filter Frame Exposure^a UT Date UT Time Airmass Seeing(^{00}) Zeropoint^b

R 2. 540 90/8/21 7:15 1.234 1.56 -22.06 I75 1. 540 90/8/21 7:28 1.239 1.52 -22.01 I75 2. 540 90/8/22 6:09 1.266 1.00 -21.99 I86 1. 1080 90/8/21 6:08 1.291 1.64 -21.48 I86 2. 1080 90/8/22 6:50 1.233 1.54 -21.46 22e U 1. 1350 90/8/24 8:27 1.218 1.80 -20.62 U 2. 1350 90/8/24 8:54 1.248 1.38 -20.66 B 1. 1080 90/8/24 9:42 1.349 2.32 -21.68 B 2. 1080 90/8/23 8:30 1.215 1.06 -21.69 V 1. 540 90/8/23 8:15 1.206 1.09 -22.44 V 2. 540 90/8/24 10:04 1.407 1.86 -22.45 R 1. 540 90/8/23 8:51 1.230 0.98 -22.07 R 2. 540 90/8/24 10:17 1.461 2.05 -22.00 I75 1. 540 90/8/23 9:04 1.246 1.11 -22.01 I75 2. 540 90/8/24 10:30 1.522 1.83 -22.03 I86 1. 1080 90/8/24 9:21 1.293 1.63 -21.48 I86 2. 1080 90/8/23 9:44 1.343 1.09 -21.46 22w U 1. 1350 90/8/24 7:59 1.206 1.57 -20.52 U 2. 1350 90/8/22 9:06 1.257 1.23 -20.46 B 1. 1080 90/8/22 8:18 1.207 1.24 -21.62 B 2. 1080 90/8/21 9:09 1.250 1.59 -21.67 V 1. 540 90/8/21 8:55 1.227 1.52 -22.45 V 2. 540 90/8/22 8:05 1.205 1.12 -22.42 R 1. 540 90/8/22 8:40 1.217 1.01 -22.02 R 2. 540 90/8/21 9:40 1.302 1.45 -22.04 I75 1. 540 90/8/22 8:53 1.229 1.07 -21.98 I75 2. 540 90/8/21 9:53 1.334 1.54 -22.00 I86 1. 1080 90/8/23 7:47 1.207 1.11 -21.47 I86 2. 1080 90/8/22 7:14 1.234 1.57 -21.47

aUnits of seconds. bSee §5.3.

TABLE 3 Average Magnitude Limits

Threshold 5œ Limiting 3œ Limiting Upper Limit Filter Magnitude Magnitude^a Magnitude^b Magnitude G(m_5œ)^c

U 21.0 22.8 23.45 16.0 25.2% B 21.5 23.8 24.30 16.5 22.2% V 21.0 23.5 24.00 16.5 27.8% R 20.0 23.0 23.50 16.5 33.0% I75 20.0 22.4 23.05 16.0 19.5% I86 19.5 22.1 22.70 16.0 21.5%

aAlso 90% completeness magnitude. bAlso 50% completeness magnitude.

cThe percentage of misclassified galaxies in the stellar object catalog at the 5œ limiting magnitude.

TABLE 4 Photometric Calibration Parameters

Color Extinction 1991 Base 1991 Average 1990 Base 1990 Average Filter Term Coefficient Zeropoint Zeropoint Zeropoint Zeropoint

U -0.043±0.011 0.530±0.023 -20.64 -20.69 -20.78 -20.71 B -0.063±0.016 0.275±0.015 -21.71 -21.75 -21.80 -21.74 V -0.092±0.018 0.113±0.007 -22.45 -22.50 -22.51 -22.46 R -0.098±0.020 0.087±0.017 -22.06 -22.06 -22.16 -22.03 I75 ... 0.078±0.014 -22.03 -22.05 -22.08 -21.99 I86 ... 0.039±0.008 -21.48 -21.48 -21.53 -21.45