\documentstyle[aastab]{article}
\begin{document}
\input environ.tex
%
%		The next five command definitions define the "stdtable"
%		arguments.  This simplifies future changes to the table headers
%		by requiring the author to change the info in only one place.
%
\newcommand{\tthra}{8}
\newcommand{\tthrb}{rrrrrrrc}
\newcommand{\tthrc}{Table 3}
\newcommand{\tthrd}{30 Dor Stellar UV and B Photometry}
\newcommand{\tthre}{UIT&\omit\hfil X\hfil&\omit\hfil Y\hfil
&${m_{162}}$&${m_{189}}$&${m_{221}}$&${m_{256}}$&$B$}
%
%		The next set of commands define maximum widths of the columns.
%		This is used to force the columns to the same tab settings from
%		page to page.
%
\newlength{\tthrlena}				% First column.
\settowidth{\tthrlena}{UIT}
\newlength{\tthrlenb}				% Second column.
\settowidth{\tthrlenb}{-888.80}
\newlength{\tthrlenc}				% Third column.
\settowidth{\tthrlenc}{-888.80}
\newlength{\tthrlend}				% Fourth column.
\settowidth{\tthrlend}{88.880}
\newlength{\tthrlene}				% Fifth column.
\settowidth{\tthrlene}{88.880}
\newlength{\tthrlenf}				% Sixth column.
\settowidth{\tthrlene}{88.880}
\newlength{\tthrleng}				% Seventh column.
\settowidth{\tthrlene}{88.880}
\newlength{\tthrlenh}				% Eightth column.
\settowidth{\tthrlene}{88.880}
%
\newcommand{\tthrf}{\tinvrule{\tthrlena}&\tinvrule{\tthrlenb}&
\tinvrule{\tthrlenc}&\tinvrule{\tthrlend}&\tinvrule{\tthrlene}&
\tinvrule{\tthrlenf}&\tinvrule{\tthrleng}&\tinvrule{\tthrlenh}}
%
%		The table.
%
\begin{stdtable}{\tthra}{\tthrb}{\tthrc}{\tthrd}{\tthre}{\tthrf}
   0  &  -49.1 &  -261.0 & 14.58 & 99.00 & 99.00 & 15.58 & 16.43 \\
   1  &    0.6 &  -256.1 & 15.34 & 99.00 & 99.00 & 15.74 & 17.08 \\
   2  &   20.2 &  -251.9 & 14.08 & 99.00 & 99.00 & 15.17 & 16.39 \\
   3  &   35.7 &  -241.5 & 14.64 & 99.00 & 99.00 & 15.74 & 16.58 \\
   4  &  -46.3 &  -234.1 & 12.52 & 12.83 & 13.06 & 13.06 & 14.21 \\
   5  & -105.7 &  -218.9 & 15.60 & 99.00 & 99.00 & 16.05 & 16.33 \\
   6  & -191.3 &  -210.6 & 14.28 & 14.59 & 99.00 & 15.60 & 16.51 \\
   7  & -142.7 &  -209.2 & 14.75 & 99.00 & 99.00 & 15.55 & 16.92 \\
   8  &  111.1 &  -209.2 & 14.47 & 99.00 & 99.00 & 15.53 & 16.38 \\
   9  &  -14.8 &  -204.8 & 15.15 & 99.00 & 99.00 & 16.33 & 16.77 \\
  10  &   38.1 &  -201.2 & 13.20 & 13.75 & 99.00 & 14.38 & 15.43 \\
  11  & -181.9 &  -196.2 & 14.44 & 99.00 & 99.00 & 14.87 & 15.49 \\
  12  & -140.9 &  -193.9 & 12.89 & 13.18 & 13.14 & 13.50 & 15.10 \\
  13  &  -71.0 &  -190.9 & 14.39 & 99.00 & 99.00 & 15.22 & 16.02 \\
  14  & -134.8 &  -188.5 & 14.31 & 99.00 & 99.00 & 15.53 & 16.70 \\
  15  & -201.3 &  -182.8 & 14.80 & 99.00 & 99.00 & 15.42 & 15.07 \\
  16  & -229.4 &  -179.1 & 10.97 & 11.55 & 11.67 & 11.85 & 13.76 \\
  17  &   11.4 &  -175.1 & 15.87 & 99.00 & 99.00 & 16.23 & 16.47 \\
  18  & -172.2 &  -173.7 & 13.87 & 13.92 & 99.00 & 14.71 & 15.82 \\
  19  &   34.3 &  -172.3 &  15.13 & 99.00 & 99.00 & 15.78 & 16.07 \\
  20 &  -201.7 &  -170.3 & 14.43 & 99.00 & 99.00 & 15.38 & 16.36 \\
  21 &  -238.0 &  -166.2 & 13.37 & 13.90 & 99.00 & 14.02 & 15.36 \\
  22 &    65.7 &  -161.5 & 12.85 & 12.89 & 12.88 & 13.22 & 14.11 \\
  23 &  -223.5 &  -159.2 & 12.62 & 99.00 & 12.82 & 13.18 & 14.86 \\
  24 &    34.0 &  -145.2 & 14.66 & 99.00 & 99.00 & 15.25 & 16.12 \\
  25 &  -225.3 &  -146.1 & 14.54 & 99.00 & 99.00 & 15.81 & 16.80 \\
  26 &   -62.9 &  -144.2 & 12.99 & 13.53 & 99.00 & 14.26 & 15.71 \\
  27 &    -9.5 &  -141.9 & 15.27 & 99.00 & 99.00 & 15.84 & 16.13 \\
  28 &    56.4 &  -142.1 & 15.22 & 99.00 & 99.00 & 15.91 & 16.15 \\
  29 &    71.3 &  -139.6 & 13.80 & 99.00 & 99.00 & 14.03 & 14.58 \\
  30 &  -243.0 &  -138.7 & 13.45 & 13.80 & 99.00 & 13.96 & 15.72 \\
  31 &   -36.2 &  -136.8 & 15.10 & 99.00 & 99.00 & 15.57 & 16.27 \\
  32 &   110.8 &  -135.5 & 14.50 & 99.00 & 99.00 & 14.91 & 15.91 \\
  33 &   -19.4 &  -131.7 & 14.36 & 99.00 & 99.00 & 13.68 & 13.21 \\
  34 &    56.4 &  -128.9 & 13.60 & 13.71 & 99.00 & 14.41 & 15.17 \\
  35 &    30.5 &  -128.0 & 14.03 & 99.00 & 99.00 & 14.55 & 15.16 \\
  36 &   -80.4 &  -126.5 & 13.30 & 13.41 & 99.00 & 14.82 & 15.49 \\
  37 &    62.0 &  -124.9 & 13.84 & 99.00 & 99.00 & 14.14 & 15.78 \\
  38 &  -107.9 &  -125.1 & 14.12 & 99.00 & 99.00 & 15.22 & 16.51 \\
  39 &    13.2 &  -123.9 & 14.76 & 99.00 & 99.00 & 15.01 & 14.85 \\
  40 &    48.7 &  -124.4 & 13.35 & 13.45 & 99.00 & 12.84 & 12.37 \\
  41 &    63.8 &  -117.7 & 14.34 & 99.00 & 99.00 & 14.70 & 14.77 \\
  42 &   -17.1 &  -110.1 & 14.91 & 99.00 & 99.00 & 15.60 & 15.90 \\
  43 &  -108.1 &  -108.0 & 13.07 & 13.39 & 99.00 & 13.74 & 15.36 \\
  44 &  -152.4 &  -104.9 & 11.07 & 11.59 & 11.77 & 11.93 & 13.53 \\
  45 &   132.8 &  -103.3 & 13.58 & 14.00 & 99.00 & 14.12 & 15.51 \\
  46 &    41.3 &  -102.4 & 14.76 & 99.00 & 99.00 & 15.98 & 16.54 \\
  47 &    56.0 &  -102.5 & 13.54 & 13.75 & 99.00 & 13.66 & 14.51 \\
  48 &  -280.1 &   -99.9 & 15.10 & 99.00 & 99.00 & 15.75 & 16.36 \\
  49 &    30.1 &   -98.7 & 14.55 & 99.00 & 99.00 & 15.63 & 16.23 \\
\stdendcont{\tthra}{\tthrb}{\tthrc}{\tthrd}{\tthre}{\tthrf}
  50 &    55.5 &   -93.2 & 15.26 & 99.00 & 99.00 & 16.04 & 16.65 \\
  51 &    16.4 &   -91.9 & 13.92 & 99.00 & 99.00 & 14.68 & 15.76 \\
  52 &   -54.5 &   -89.4 & 15.09 & 99.00 & 99.00 & 15.36 & 16.96 \\
  53 &  -324.9 &   -86.6 & 14.65 & 99.00 & 99.00 & 15.46 & 16.62 \\
  54 &    54.7 &   -86.0 & 14.86 & 99.00 & 99.00 & 15.82 & 16.61 \\
  55 &    70.3 &   -80.8 & 13.86 & 99.00 & 99.00 & 14.44 & 15.17 \\
  56 &   112.9 &   -74.0 & 14.41 & 99.00 & 99.00 & 14.86 & 15.24 \\
  57 &  -102.5  &  -73.3 & 12.91 & 12.95 & 12.96 & 12.94 & 14.22 \\
  58 &  -321.6 &   -72.1 & 14.11 & 14.20 & 99.00 & 14.98 & 16.22 \\
  59 &    26.0 &   -70.2 & 14.16 & 99.00 & 99.00 & 14.88 & 16.36 \\
  60 &    97.7 &   -70.2 & 14.06 & 99.00 & 99.00 & 15.20 & 15.86 \\
  61 &    79.3 &   -66.9 & 14.33 & 99.00 & 99.00 & 15.35 & 14.32 \\
  62 &   284.3 &   -66.5 & 14.48 & 99.00 & 99.00 & 15.54 & 16.54 \\
  63 &    39.5 &   -63.0 & 13.90 & 99.00 & 99.00 & 15.01 & 16.50 \\
  64 &    -2.4 &   -61.8 & 13.29 & 13.74 & 99.00 & 14.61 & 15.26 \\
  65 &   183.0 &   -60.5 & 14.41 & 99.00 & 99.00 & 15.22 & 15.93 \\
  66 &     3.4 &   -59.4 & 13.77 & 99.00 & 99.00 & 14.71 & 15.73 \\
  67 &    12.2 &   -54.2 & 13.65 & 99.00 & 99.00 & 15.01 & 16.00 \\
  68 &   -32.6 &   -54.6 & 13.07 & 13.55 & 13.85 & 13.54 & 14.01 \\
  69 &    -8.7 &   -54.9 & 14.10 & 99.00 & 99.00 & 16.27 & 16.19 \\
  70 &    18.9 &   -53.5 & 13.13 & 13.56 & 99.00 & 14.47 & 15.51 \\
  71 &  -176.0 &   -51.3 & 13.10 & 13.49 & 99.00 & 13.93 & 15.57 \\
  72 &    39.4 &   -50.5 & 15.80 & 99.00 & 99.00 & 16.53 & 17.14 \\
  73 &  -193.6 &   -50.3 & 14.55 & 99.00 & 99.00 & 15.50 & 16.42 \\
  74 &    -3.0 &   -47.9 & 13.47 & 99.00 & 99.00 & 15.52 & 17.27 \\
  75 &     5.5 &   -47.7 & 13.54 & 99.00 & 99.00 & 15.36 & 17.13\\
  76 &   -29.4  &  -47.9 & 14.08 & 99.00 & 99.00 & 15.94 & 15.82 \\
  77 &   -19.6  &  -46.6 & 12.32 & 12.71 & 99.00 & 12.93 & 13.99 \\
  78 &   -34.4  &  -43.6 & 13.55 & 13.89 & 99.00 & 13.52 & 13.97 \\
  79 &  -354.7  &  -43.1 & 11.46 & 12.20 & 12.03 & 11.99 & 13.80 \\
  80 &    27.9  &  -42.2 & 14.46 & 99.00 & 99.00 & 15.32 & 16.05 \\
  81 &    87.8  &  -39.2 & 13.66 & 13.93 & 99.00 & 14.74 & 15.66 \\
  82 &    38.7  &  -40.2 & 11.35 & 11.70 & 11.75 & 11.93 & 13.22 \\
  83 &    54.8  &  -40.4 & 12.60 & 13.00 & 99.00 & 13.38 & 14.44 \\
  84 &  -373.0  &  -39.1 & 13.83 & 13.91 & 99.00 & 14.81 & 16.21 \\
  85 &   -75.5  &  -38.0 & 14.15 & 99.00 & 99.00 & 15.57 & 16.09 \\
  86 &  -365.5 &   -39.1 & 14.45 & 99.00 & 99.00 & 15.27 & 16.85 \\
  87 &    77.1 &   -36.0 & 13.67 & 99.00 & 99.00 & 14.75 & 16.04 \\
  88 &    22.7 &   -37.4 & 14.36 & 99.00 & 99.00 & 15.35 & 17.13 \\
  89 &  -311.5 &   -34.8 & 14.31 & 99.00 & 99.00 & 14.47 & 16.11 \\
  90 &     0.9 &   -33.0 & 12.30 & 13.00 & 99.00 & 13.69 & 15.01 \\
  91 &  -125.3 &   -31.8 & 13.53 & 13.92 & 99.00 & 14.44 & 15.43 \\
  92 &   112.0 &   -31.8 & 13.63 & 14.13 & 99.00 & 14.72 & 15.71 \\
  93 &  -350.9 &   -31.3 & 12.48 & 12.65 & 12.53 & 13.27 & 14.87 \\
  94 &  -162.9 &   -31.5 & 13.37 & 13.29 & 99.00 & 13.19 & 13.85 \\
  95 &    38.3  &  -27.0 & 14.66 & 99.00 & 99.00 & 15.50 & 16.15 \\
  96 &    97.5  &  -27.4 & 14.80 & 99.00 & 99.00 & 16.07 & 17.09 \\
  97 &   -77.2  &  -26.2 & 13.34 & 13.78 & 99.00 & 13.80 & 15.06 \\
  98 &   202.1  &  -23.7 & 13.79 & 13.73 & 13.29 & 13.42 & 13.13 \\
  99 &   134.6  &  -22.2 & 13.78 & 13.96 & 99.00 & 14.50 & 15.44 \\
\stdendcont{\tthra}{\tthrb}{\tthrc}{\tthrd}{\tthre}{\tthrf}
 100 &    -2.1  &  -22.6 & 10.99 & 11.11 & 11.94 & 11.74 & 13.92 \\
 101 &    89.2  &  -21.5 & 13.78 & 14.11 & 99.00 & 14.88 & 16.09 \\
 102 &  -118.2  &  -20.0 & 14.61 & 99.00 & 99.00 & 15.60 & 16.38 \\
 103 &    17.2  &  -19.5 & 10.95 & 10.89 & 11.20 & 11.18 & 12.68 \\
 104 &  -175.9  &  -18.7 & 11.77 & 11.65 & 11.40 & 11.07 & 11.24 \\
 105 &   -69.5  &  -17.7 & 13.43 & 99.00 & 99.00 & 14.86 & 15.82 \\
 106 &  -298.2  &  -17.4 & 14.87 & 99.00 & 99.00 & 15.08 & 15.78 \\
 107 &   -18.0  &  -18.5 & 10.98 & 11.49 & 11.75 & 11.73 & 13.71 \\
 108 &    45.8  &  -17.6 & 12.90 & 13.18 & 99.00 & 13.17 & 14.18 \\
 109 &    35.0  &  -16.7 & 13.53 & 13.54 & 99.00 & 14.26 & 15.66 \\
 110 &  -115.1  &  -14.3 & 13.72 & 99.00 & 99.00 & 14.64 & 15.73 \\
 111 &   -35.3  &  -14.2 & 12.77 & 13.02 & 99.00 & 13.48 & 14.83 \\
 112 &    19.5  &  -14.5 & 13.15 & 11.00 & 11.48 & 11.87 & 13.87 \\
 113 &     4.1  &  -13.4 &  9.65 &  9.50 & 10.53 & 10.64 & 13.27 \\
 114 &    -1.9 &   -11.6 &  9.59 & 10.43 & 10.36 & 10.52 & 12.92 \\
 115 &   152.2 &   -11.0 & 13.23 & 13.53 & 99.00 & 14.23 & 15.21 \\
 116 &   -20.0 &   -10.2 & 11.50 & 99.00 & 99.00 & 12.43 & 15.21 \\
 117 &    55.4 &    -9.3 & 13.45 & 13.48 & 99.00 & 14.18 & 15.16 \\
 118 &  -275.1 &    -8.3 & 14.35 & 14.15 & 99.00 & 14.40 & 15.17 \\
 119 &   186.9 &    -7.2 & 14.05 & 99.00 & 99.00 & 15.20 & 15.88 \\
 120 &   -34.9 &    -6.2 & 11.23 & 11.42 & 11.65 & 11.46 & 13.21 \\
 121 &   -90.4 &    -6.4 & 13.65 & 99.00 & 99.00 & 14.85 & 15.97 \\
 122 &  -191.0 &    -6.0 & 13.99 & 14.22 & 99.00 & 14.84 & 15.85 \\
 123 &   -78.8 &    -3.9 & 14.18 & 99.00 & 99.00 & 15.61 & 16.47 \\
 124 &    78.1 &    -2.8 &  9.80 & 10.34 & 10.78 & 15.86 & 12.02 \\
 125 &  -341.8 &    -2.5 & 13.66 & 13.76 & 99.00 & 14.90 & 16.28 \\
 126 &     9.3 &    -3.1 & 10.10 & 10.06 & 99.00 & 11.68 & 13.21 \\
 127 &    41.6 &    -1.6 & 13.26 & 99.00 & 99.00 & 14.26 & 15.22 \\
 128 &   -14.7 &    -0.2 & 10.41 & 10.42 & 11.25 & 11.36 & 14.25 \\
 129 &   -12.1 &     2.9 &  8.96 & 99.00 & 99.00 & 10.22 & 12.85 \\
 130 &  -109.6 &     2.8 & 14.72 & 99.00 & 99.00 & 15.68 & 16.80 \\
 131 &  -124.3 &     2.2 & 12.50 & 12.52 & 12.50 & 12.76 & 14.22 \\
 132 &    20.3 &     3.5 & 11.31 & 99.00 & 99.00 & 12.34 & 15.05 \\
 133  &   46.6 &     3.5 & 12.16 & 12.16 & 12.56 & 12.60 & 14.33 \\
 134  &  -70.5 &     3.7 & 13.36 & 99.00 & 99.00 & 14.31 & 15.98 \\
 135  & -331.8 &     8.3 & 14.69 & 99.00 & 99.00 & 15.58 & 16.94 \\
 136  &  -33.4 &     7.4 & 11.70 & 99.00 & 11.96 & 11.73 & 12.06 \\
 137  &  -10.2 &     5.8 &  8.96 &  9.64 &  9.69 &  9.95 & 12.61 \\
 138  &    9.6 &     7.4 &  9.61 & 10.44 & 10.61 & 10.78 & 13.02 \\
 139  &  -60.2 &     9.9 & 13.57 & 13.85 & 99.00 & 13.91 & 15.49 \\
 140  &  225.7 &     9.7 & 14.57 & 99.00 & 99.00 & 15.91 & 16.72 \\
 141  & -302.2 &     9.3 & 15.19 & 99.00 & 99.00 & 16.33 & 17.44 \\
 142  &   -2.0 &    10.2 &  8.45 &  9.51 &  9.77 & 10.06 & 12.53 \\
 143  &  328.2 &    12.6 & 14.09 & 99.00 & 99.00 & 14.80 & 17.50 \\
 144  &  -46.4 &    11.8 & 13.40 & 99.00 & 99.00 & 13.75 & 16.24 \\
 145  &  -30.3 &    11.2 & 11.78 & 99.00 & 99.00 & 13.27 & 99.00 \\
 146  &   19.5 &    11.5 & 10.42 & 10.93 & 11.10 & 11.55 & 13.49 \\
 147  & -334.4 &    15.2 & 13.74 & 13.93 & 99.00 & 14.90 & 16.40 \\
 148  &   50.0 &    16.0 & 13.31 & 13.65 & 99.00 & 14.52 & 16.08 \\
 149  &   16.3 &    15.1 &  9.90 & 10.36 & 10.40 & 10.76 & 12.62 \\
\stdendcont{\tthra}{\tthrb}{\tthrc}{\tthrd}{\tthre}{\tthrf}
 150  & -258.3 &    16.2 & 14.77 & 99.00 & 99.00 & 15.40 & 16.35 \\
 151  &    9.0 &    16.2 &  9.42 & 10.03 & 10.09 & 10.47 & 13.16 \\
 152  &  -55.5 &    16.0 & 13.09 & 99.00 & 99.00 & 13.82 & 15.82 \\
 153  & -345.8 &    16.4 & 13.29 & 13.63 & 99.00 & 13.76 & 15.34 \\
 154  & -328.4 &    17.9 & 13.47 & 13.45 & 99.00 & 14.54 & 15.98 \\
 155  & -182.3 &    18.1 & 11.08 & 11.65 & 11.81 & 11.99 & 14.03 \\
 156  &  -24.5 &    19.8 & 11.37 & 11.96 & 99.00 & 12.50 & 14.81 \\
 157  &    1.4 &    20.3 &  9.64 & 10.11 &  9.88 &  9.95 & 12.01 \\
 158  & -134.6 &    20.7 & 13.13 & 13.37 & 99.00 & 13.64 & 15.64 \\
 159  &  119.9 &    22.4 & 12.78 & 13.25 & 99.00 & 13.18 & 14.45 \\
 160  &   17.0 &    23.4 & 10.76 & 10.36 & 11.40 & 11.51 & 13.94 \\
 161  &   42.3 &    24.6 & 11.95 & 12.16 & 12.41 & 12.82 & 14.25 \\
 162  &   10.4 &    26.8 & 10.73 & 10.65 & 11.30 & 11.58 & 13.82 \\
 163  &  -35.4 &    28.0 & 12.36 & 12.78 & 99.00 & 14.24 & 15.50 \\
 164  &   51.2 &    29.0 & 12.88 & 13.20 & 99.00 & 13.87 & 15.39 \\
 165  &   -6.3 &    30.4 & 10.72 & 11.03 & 11.23 & 11.42 & 13.59 \\
 166  &   20.8 &    32.1 & 12.13 & 12.61 & 99.00 & 13.62 & 15.50 \\
 167  &    3.6 &    35.6 & 11.18 & 99.00 & 99.00 & 12.23 & 15.34 \\
 168  & -313.0 &    33.9 & 14.50 & 99.00 & 99.00 & 15.67 & 17.10 \\
 169  &  -78.9 &    34.5 & 15.20 & 99.00 & 99.00 & 15.64 & 18.24 \\
 170  &  -15.2 &    36.2 & 11.58 & 11.63 & 11.89 & 12.17 & 14.57 \\
 171 &    87.2 &    38.9 & 14.52 & 99.00 & 99.00 & 15.79 & 16.10 \\
 172 &   -98.8 &    38.7 & 13.34 & 13.53 & 99.00 & 14.85 & 16.30 \\
 173 &   -54.3 &    38.9 & 12.25 & 12.58 & 12.90 & 12.97 & 14.69 \\
 174 &    14.1 &    38.6 & 11.77 & 12.61 & 99.00 & 13.14 & 15.85 \\
 175 &   -25.7 &    41.7 & 11.11 & 11.39 & 12.03 & 11.79 & 13.61 \\
 176 &   -47.9 &    41.4 & 13.26 & 13.56 & 99.00 & 13.79 & 15.86 \\
 177 &   -69.8 &    41.5 & 13.57 & 13.72 & 99.00 & 13.91 & 15.23 \\
 178 &  -107.3 &    41.4 & 12.97 & 13.30 & 99.00 & 14.49 & 15.67 \\
 179 &    -5.1 &    43.5 &  9.88 & 99.00 & 99.00 & 11.12 & 13.32 \\
 180 &    -4.7 &    48.7 &  8.67 &  9.31 & 10.15 &  9.77 & 12.05 \\
 181 &  -193.2 &    48.2 & 13.06 & 13.08 & 13.21 & 13.69 & 15.53 \\
 182 &    10.7 &    49.2 & 11.89 & 12.31 & 99.00 & 12.72 & 14.99 \\
 183 &   -50.7 &    49.7 & 12.73 & 13.02 & 99.00 & 13.42 & 15.04 \\
 184 &   -16.2 &    52.2 & 11.01 & 11.49 & 11.85 & 11.99 & 14.66 \\
 185 &    13.9 &    54.4 & 11.59 & 12.00 & 12.11 & 12.10 & 14.21 \\
 186 &   -29.6 &    54.9 & 10.91 & 11.37 & 11.09 & 11.13 & 12.29 \\
 187 &  -285.8 &    53.9 & 10.15 & 10.46 & 10.42 & 10.26 & 11.71 \\
 188 &   -66.9 &    57.6 & 12.97 & 13.62 & 99.00 & 13.64 & 14.89 \\
 189 &  -172.6 &    57.9 & 13.00 & 13.29 & 99.00 & 13.70 & 15.70 \\
 190  &    9.7  &   59.3 & 12.36 & 99.00 & 99.00 & 13.26 & 99.00 \\
 191  &   40.3  &   60.2 & 13.23 & 99.00 & 99.00 & 13.58 & 15.14 \\
 192  & -100.5  &   59.2 &  9.74 &  9.96 & 10.19 & 10.48 & 12.49 \\
 193  &   51.9  &   60.6 & 14.37 & 99.00 & 99.00 & 14.15 & 99.00 \\
 194  &  -87.1  &   61.0 & 12.50 & 12.71 & 13.05 & 13.52 & 15.47 \\
 195  &   62.0  &   61.4 & 15.02 & 99.00 & 99.00 & 15.00 & 15.93 \\
 196  &  287.3  &   63.4 & 12.66 & 13.08 & 99.00 & 13.39 & 15.02 \\
 197  &   19.9  &   62.6 & 12.70 & 99.00 & 99.00 & 13.87 & 99.00 \\
 198  &   45.7  &   62.3 & 14.37 & 99.00 & 99.00 & 14.23 & 15.48 \\
 199  &  -56.9  &   63.9 & 14.16 & 99.00 & 99.00 & 15.49 & 16.90 \\
\stdendcont{\tthra}{\tthrb}{\tthrc}{\tthrd}{\tthre}{\tthrf}
 200  &   33.0  &   63.0 & 13.30 & 99.00 & 99.00 & 14.49 & 15.83 \\
 201  &  -30.2  &   64.4 & 11.63 & 12.53 & 12.61 & 12.80 & 14.90 \\
 202  & -125.1  &   64.6 & 13.05 & 13.42 & 99.00 & 13.97 & 15.95 \\
 203  &   82.6  &   63.4 & 14.34 & 99.00 & 99.00 & 15.51 & 16.38 \\
 204  &   -0.7  &   64.7 &  9.75 & 10.13 & 10.15 & 10.32 & 12.07 \\
 205  &  -37.8  &   65.1 & 12.43 & 13.45 & 99.00 & 13.50 & 15.57 \\
 206  &   64.2  &   67.6 & 15.02 & 99.00 & 99.00 & 14.97 & 16.55 \\
 207  &   -8.8  &   69.6 & 11.22 & 12.02 & 11.85 & 12.98 & 16.04 \\
 208  & -138.9  &   69.5 & 12.94 & 13.20 & 13.18 & 13.63 & 15.51 \\
 209 &    29.2 &    71.5 & 13.60 & 99.00 & 99.00 & 14.14 & 16.99 \\
 210 &    11.1 &    71.6 & 11.05 & 11.43 & 11.79 & 11.91 & 13.94 \\
 211 &   -47.5 &    72.3 & 10.46 & 10.92 & 11.51 & 11.56 & 12.87 \\
 212 &  -166.9 &    73.4 & 12.36 & 12.69 & 12.67 & 13.05 & 15.07 \\
 213 &  -134.6 &    74.7 & 13.15 & 13.85 & 99.00 & 14.39 & 15.86 \\
 214 &  -233.5 &    74.1 & 15.18 & 99.00 & 99.00 & 15.96 & 17.01 \\
 215 &   -82.6 &    76.1 & 14.77 & 99.00 & 99.00 & 15.69 & 16.60 \\
 216 &   -66.3 &    77.6 & 13.45 & 99.00 & 99.00 & 15.95 & 16.52 \\
 217 &    29.9 &    80.5 & 12.94 & 99.00 & 99.00 & 13.87 & 15.42 \\
 218 &     4.1 &    80.9 & 11.33 & 11.70 & 11.90 & 12.22 & 14.57 \\
 219 &  -269.9 &    82.4 & 14.32 & 99.00 & 99.00 & 15.12 & 16.14 \\
 220 &    -3.0 &    84.0 & 11.57 & 12.18 & 12.33 & 12.64 & 14.70 \\
 221 &   -16.0 &    84.2 & 12.32 & 13.40 & 13.28 & 13.58 & 15.74 \\
 222 &   259.9 &    84.9 & 14.63 & 99.00 & 99.00 & 16.00 & 17.05 \\
 223 &   -48.7 &    84.3 & 11.47 & 11.99 & 12.04 & 12.50 & 14.21 \\
 224 &   -36.3 &    88.1 & 13.60 & 99.00 & 99.00 & 14.72 & 16.45 \\
 225 &     7.6 &    88.1 & 12.33 & 12.85 & 99.00 & 13.34 & 15.44 \\
 226 &    85.3 &    87.7 & 14.48 & 99.00 & 99.00 & 15.75 & 16.56 \\
 227 &   -52.9 &    90.4 & 10.99 & 11.40 & 11.86 & 11.90 & 13.71 \\
 228 &   122.7 &    91.7 & 13.77 & 99.00 & 99.00 & 14.74 & 15.86 \\
 229 &   306.8 &    92.2 & 12.82 & 13.40 & 99.00 & 13.88 & 15.57 \\
 230 &    21.7 &    94.9 & 12.64 & 12.32 & 13.03 & 12.67 & 14.19 \\
 231 &   -61.3 &    95.6 & 13.73 & 99.00 & 13.75 & 14.81 & 15.54 \\
 232 &    -7.7 &    97.9 & 11.19 & 11.75 & 12.11 & 12.19 & 14.14 \\
 233 &   -28.3 &    97.1 & 13.39 & 99.00 & 99.00 & 14.62 & 15.58 \\
 234 &  -271.0 &    97.5 & 12.70 & 13.05 & 99.00 & 13.56 & 15.46 \\
 235 &   -45.6 &   101.6 & 12.20 & 12.85 & 12.73 & 13.06 & 14.39 \\
 236 &  -283.1 &   102.6 & 14.69 & 99.00 & 99.00 & 15.82 & 99.00 \\
 237 &   -35.0 &   102.3 & 14.11 & 99.00 & 99.00 & 15.79 & 16.23 \\
 238 &   122.3 &   106.6 & 13.86 & 14.04 & 99.00 & 14.84 & 15.86 \\
 239 &   -83.6 &   104.0 & 14.92 & 99.00 & 99.00 & 15.74 & 16.98 \\
 240 &   107.8 &   108.6 & 14.65 & 99.00 & 99.00 & 15.15 & 17.16 \\
 241 &  -139.7 &   107.0 & 13.66 & 99.00 & 99.00 & 14.62 & 15.53 \\
 242 &    -6.6 &   108.5 & 12.97 & 14.08 & 99.00 & 14.36 & 15.64 \\
 243 &  -189.4 &   107.6 & 14.22 & 99.00 & 99.00 & 15.38 & 16.71 \\
 244 &     2.9 &   109.6 & 11.05 & 11.42 & 11.56 & 11.84 & 13.87 \\
 245 &   -19.9 &   110.2 & 12.63 & 12.88 & 99.00 & 13.78 & 15.37 \\
 246 &   119.5 &   112.9 & 12.78 & 12.82 & 12.74 & 12.23 & 13.37 \\
 247 &  -121.8 &   112.2 & 99.00  & 14.31 & 99.00 & 14.73 & 16.25 \\
 248 &    47.2 &   114.3 & 15.24  & 99.00 & 99.00 & 15.03 & 15.75 \\
 249 &   -77.5 &   113.4 & 14.48  & 99.00 & 99.00 & 15.24 & 16.58 \\
\stdendcont{\tthra}{\tthrb}{\tthrc}{\tthrd}{\tthre}{\tthrf}
 250 &  -131.2 &   113.0 & 12.78 & 13.05 & 99.00 & 13.41 & 14.64 \\
 251 &  -110.2 &   114.6 & 14.41 & 99.00 & 99.00 & 16.07 & 17.12 \\
 252 &   293.4 &   118.1 & 14.32 & 99.00 & 99.00 & 15.23 & 15.91 \\
 253 &  -182.7 &   114.9 & 14.63 & 99.00 & 99.00 & 15.49 & 17.20 \\
 254 &  -254.8 &   120.9 & 14.49 & 99.00 & 99.00 & 15.77 & 16.99 \\
 255 &  -223.0 &   122.7 & 13.89 & 99.00 & 99.00 & 15.24 & 16.41 \\
 256 &  -146.2 &   121.1 & 11.96 & 12.31 & 12.26 & 12.77 & 13.11 \\
 257 &  -127.2 &   123.0 & 12.44 & 12.87 & 11.91 & 13.00 & 13.36 \\
 258 &  -135.8 &   120.3 & 12.61 & 13.04 & 99.00 & 13.33 & 15.23 \\
 259 &  -141.6 &   127.8 & 12.42 & 12.68 & 99.00 & 13.58 & 15.50 \\
 260 &   -52.8 &   126.8 & 14.15 & 99.00 & 99.00 & 14.91 & 16.37 \\
 261 &  -160.7 &   130.0 & 14.47 & 99.00 & 99.00 & 15.44 & 16.98 \\
 262 &   -32.0 &   131.7 & 13.43 & 14.22 & 99.00 & 14.55 & 16.18 \\
 263 &   -65.4 &   130.0 & 13.44 & 13.77 & 99.00 & 14.58 & 15.91 \\
 264 &  -136.3 &   131.9 & 12.53 & 13.09 & 99.00 & 13.43 & 15.45 \\
 265 &  -121.1 &   131.3 & 13.71 & 99.00 & 99.00 & 15.01 & 16.92 \\
 266 &    66.2 &   133.1 & 14.37 & 99.00 & 99.00 & 15.55 & 16.46 \\
 267 &  -245.8 &   133.7 & 13.69 & 14.07 & 99.00 & 15.04 & 16.52 \\
 268 &    80.5 &   134.3 & 13.43 & 13.90 & 99.00 & 14.70 & 16.21 \\
 269 &  -147.8 &   134.0 & 12.26 & 12.46 & 12.24 & 12.41 & 13.05 \\
 270 &  -227.5 &   135.4 & 13.36 & 13.90 & 99.00 & 14.94 & 16.41 \\
 271 &   -45.6 &   136.5 & 14.23 & 99.00 & 99.00 & 15.11 & 16.68 \\
 272 &     3.1 &   138.1 & 13.71 & 99.00 & 99.00 & 14.90 & 16.02 \\
 273 &    78.5 &   139.9 & 14.78 & 99.00 & 99.00 & 15.87 & 16.67 \\
 274 &   -14.2 &   141.9 & 13.67 & 14.19 & 99.00 & 15.09 & 16.21 \\
 275 &  -132.7 &   144.0 & 13.61 & 13.69 & 99.00 & 14.39 & 15.11 \\
 276 &   -25.4 &   144.8 & 13.80 & 99.00 & 99.00 & 14.88 & 16.36 \\
 277 &  -149.6 &   149.7 & 14.41 & 99.00 & 99.00 & 15.40 & 16.80 \\
 278 &    96.0 &   152.2 & 13.70 & 14.25 & 99.00 & 14.83 & 16.11 \\
 279 &   183.9 &   155.1 & 13.88 & 99.00 & 99.00 & 15.18 & 16.04 \\
 280 &   -25.0 &   153.6 & 11.91 & 12.68 & 13.00 & 13.16 & 15.02 \\
 281 &   -51.9 &   163.0 & 13.52 & 14.13 & 99.00 & 14.44 & 15.73 \\
 282 &    13.7 &   163.6 & 14.66 & 99.00 & 99.00 & 16.26 & 16.78 \\
 283 &   209.6 &   164.3 & 14.43 & 99.00 & 99.00 & 15.26 & 15.85 \\
 284 &     7.6 &   166.5 & 14.35 & 99.00 & 99.00 & 15.21 & 16.13 \\
 285  & -222.6 &   167.5 & 14.14 & 99.00 & 99.00 & 15.13 & 16.55 \\
 286  & -112.3 &   167.3 & 15.40 & 99.00 & 99.00 & 16.16 & 17.11 \\
 287  & -118.2 &   172.3 & 14.49 & 14.15 & 99.00 & 15.37 & 16.22 \\
 288  &   -0.1 &   178.5 & 13.65 & 14.06 & 99.00 & 14.83 & 16.33 \\
 289  &   -6.7 &   184.4 & 11.69 & 12.20 & 12.23 & 12.30 & 14.27 \\
 290  &  -56.1 &   190.2 & 13.97 & 99.00 & 99.00 & 15.10 & 16.32 \\
 291  &   15.7 &   191.4 & 12.05 & 12.74 & 12.77 & 13.13 & 15.07 \\
 292  &   87.1 &   198.2 & 14.61 & 99.00 & 99.00 & 15.55 & 16.81 \\
 293  &  -51.6 &   198.8 & 14.51 & 99.00 & 99.00 & 15.76 & 16.95 \\
 294  &   57.6 &   201.8 & 13.45 & 14.14 & 99.00 & 14.89 & 16.47 \\
 295  &   22.9 &   202.4 & 14.04 & 99.00 & 99.00 & 15.25 & 16.70 \\
 296  &  -73.1 &   202.8 & 14.77 & 99.00 & 99.00 & 15.58 & 17.14 \\
 297  &  -15.9 &   211.8 & 13.61 & 13.81 & 99.00 & 14.90 & 16.44 \\
 298  & -172.1 &   211.9 & 12.50 & 12.72 & 99.00 & 13.32 & 15.59 \\
 299  &   37.9 &   212.5 & 12.64 & 13.26 & 99.00 & 13.97 & 15.71 \\
\stdendcont{\tthra}{\tthrb}{\tthrc}{\tthrd}{\tthre}{\tthrf}
 300  &  -22.2 &   214.9 & 13.08 & 13.65 & 99.00 & 14.45 & 15.80 \\
 301  &    2.5 &   217.3 & 15.22 & 99.00 & 99.00 & 16.40 & 17.20 \\
 302  &  -16.5 &   236.3 & 13.93 & 99.00 & 99.00 & 14.83 & 16.87 \\
 303  &   -3.2 &   243.9 & 12.85 & 13.49 & 99.00 & 14.06 & 15.98 \\
 304 &  -128.2 &   250.7 & 13.72 & 99.00 & 99.00 & 15.03 & 16.61 \\
 305 &    -7.5 &   256.6 & 13.05 & 13.63 & 99.00 & 14.13 & 16.64 \\
 306 &    93.6 &   262.2 & 14.08 & 14.31 & 99.00 & 15.24 & 16.84 \\
 307 &   -17.5 &   261.7 & 13.56 & 13.72 & 99.00 & 14.42 & 16.08 \\
 308 &   -42.9 &   262.9 & 14.58 & 99.00 & 99.00 & 15.73 & 16.62 \\
 309 &    55.6 &   264.7 & 13.53 & 99.00 & 99.00 & 14.88 & 16.60 \\
 310 &     3.4 &   270.2 & 11.32 & 11.73 & 11.92 & 11.79 & 13.38 \\
 311 &   -12.2 &   290.3 & 11.81 & 11.73 & 12.07 & 12.30 & 14.28 \\
 312 &    13.3 &   294.8 & 14.99 & 99.00 & 99.00 & 15.57 & 17.10 \\
 313 &     0.6 &   300.4 & 11.59 & 11.82 & 11.92 & 11.93 & 13.44 \\
\end{stdtable}
\end{document}
