HS 0840+2630 z=0.258

4000 5000 6000 [Å] Wavelength

0.51[10e-15]

Flux

HS 0743+6059 z=0.277

4000 5000 6000 [Å] Wavelength

0123456[10e-16]

HS 0844+2642 z=0.282

4000 5000 6000 [Å] Wavelength

HS 2250+1926 z=0.284

4000 5000 6000 [Å] Wavelength HS 1714+6445 z=0.286

4000 5000 6000 7000 [Å] Wavelength

HS 0043+0339 z=0.291

4000 5000 6000 [Å] Wavelength

0123[10e-16]

HS 1859+6909 z=0.298

4000 5000 6000 [Å] Wavelength

012[10e-15]

HS 0852+2729 z=0.303

4000 5000 6000 [Å] Wavelength

01234[10e-16]

HS 1824+6507 z=0.303

4000 5000 6000 [Å] Wavelength

0.51.5[10e-15]

HS 1818+6740 z=0.314

4000 5000 6000 [Å] Wavelength

3456789[10e-16]

HS 0727+6205 z=0.325

4000 5000 6000 [Å] Wavelength

012345[10e-15]

HS 0404+0629 z=0.346

4000 5000 6000 [Å] Wavelength