\documentstyle{l-aa}
\begin{document}

\setcounter{table}{1}
\begin{table*}[htbp]
   \caption[]{Near-infrared photometry of ISO-AGB variables 1}
   \label{t:nirp1}
   \begin{flushleft}
   \begin{tabular}{ll|llcrrrrrc}
   \hline
          GCVS4
       &  IRAS
       &  Type
       &  Phase
       &  Chem.
    & \multicolumn{1}{c}{JD}
    & \multicolumn{1}{c}{\small J}
    & \multicolumn{1}{c}{\small H}
    & \multicolumn{1}{c}{\small K}
    & \multicolumn{1}{c}{\small L$^\prime$}
    & pub.\\
   \hline
\object{
VY Cas}   &00484$+$6238&SRb  & & O &2450406.96 &   2.40 &   1.50 &   1.16 &   0.91 &     \\
          &            &     & &  &2450709.13 &   2.43 &   1.49 &   1.13 &   0.89 &     \\
\object{
R For}    &02270$-$2619&M    & 0.73 & C &2450407.95 &   4.22 &   2.69 &   1.39 &   0.00 &     \\
          &            &     & 0.49 &  &2450708.24 &   4.56 &   2.93 &   1.57 &   0.04 &     \\
\object{
RV Cam}   &04265$+$5718&SRb  & & O &2447873.54 &   1.83 &   0.86 &   0.52 &   0.19 &SRIIa\\
          &            &     & &   &2450408.11 &   1.78 &   0.85 &   0.53 &   0.30 &     \\
          &            &     & &   &2450690.19 &   2.00 &   1.07 &   0.70 &        &     \\
          &            &     & &   &2450708.21 &   1.94 &   1.01 &   0.67 &   0.38 &     \\
          &            &     & &   &2450907.86 &   1.82 &   0.84 &   0.50 &   0.25 &     \\
\object{
Z Cnc}    &08196$+$1509&SRb  & & O &2448290.17 &   2.49 &   1.56 &   1.21 &   0.92 &SRIIa\\
          &            &     & &   &2449850.91 &   2.32 &   1.43 &   1.13 &   0.87 &     \\
\object{
CW Cnc}   &09057$+$1325&Lb   & & O &2450907.90 &   1.34 &   0.44 &   0.10 &   0.27 &     \\
          &            &     & &   &2451329.88 &   1.33 &   0.48 &   0.12 &  -0.26 &     \\
\object{
RT UMa}   &09149$+$5136&Lb   & & C &2449854.90 &   4.93 &   3.86 &   3.25 &   2.56 &LBI  \\
          &            &     & &   &2451291.94 &   4.45 &   3.49 &   3.01 &        &     \\
\object{
Z Sex}    &10083$+$0248&Lb   & & O &2449854.92 &   4.89 &   4.01 &   3.78 &   3.45 &LBI  \\
          &            &     & &   &2450947.94 &   9.64 &   9.17 &   9.07 &        &     \\
\object{
RW LMi}   &10131$+$3049&SRa  & & C &2447648.42 &   7.36 &   4.76 &   2.62 &  -0.83 &SRIIa\\
          &            &     & &   &2451294.00 &   6.14 &   3.63 &   1.44 &        &     \\
          &            &     & &   &2451329.94 &   6.51 &   3.99 &   1.77 &  -1.46 &     \\
\object{
IY Hya}   &     $ $    &Lb:  & & C &2451292.96 &   5.98 &   3.81 &   2.06 &        &     \\
          &            &     & &   &2451330.91 &   5.42 &   3.43 &   1.74 &  -0.68 &     \\
\object{
CV Leo}   &11514$+$2046&Lb   & & O &2450498.17 &   6.19 &   5.44 &   5.26 &        &     \\
          &            &     & &   &2450946.90 &   6.21 &   5.43 &   5.26 &   4.86 &     \\
          &            &     & &   &2450985.87 &   6.11 &   5.34 &   5.24 &   5.55 &     \\
          &            &     & &   &2451328.91 &   6.25 &   5.45 &   5.26 &   4.97 &     \\
\object{
RW Vir}    &12046$-$0629&Lb   & & O &2450498.19 &   1.38 &   0.50 &   0.19 &        &     \\
          &            &     & &   &2450985.89 &   0.98 &   0.13 &   0.13 &  -0.19 &     \\
          &            &     & &   &2451328.93 &   1.34 &   0.45 &   0.16 &  -0.21 &     \\
\object{
UY CVn}   &     $ $    &Lb   & & O &2450498.20 &   4.86 &   4.03 &   3.78 &        &     \\
          &            &     & &   &2450946.92 &   4.90 &   4.05 &   3.79 &   3.57 &     \\
          &            &     & &   &2451328.94 &   4.98 &   4.12 &   3.86 &   3.57 &     \\
\object{
SS Vir}   &12226$+$0102&SRa  & & C &2447661.00 &   3.06 &   1.64 &   0.85 &  -0.20 &SRIIa\\
          &            &     & &   &2448378.10 &   3.46 &   2.01 &   0.96 &  -0.16 &SRIIa\\
          &            &     & &   &2451292.00 &   2.96 &   1.75 &   0.88 &        &     \\
          &            &     & &   &2451329.99 &   2.65 &   1.53 &   0.67 &  -0.16 &     \\
\object{
Y UMa}    &12380$+$5607&SRb  & & O &2449850.93 &   0.73 &  -0.19 &  -0.57 &  -1.03 &     \\
          &            &     & &   &2450946.94 &   0.75 &  -0.12 &  -0.51 &  -0.89 &     \\
          &            &     & &   &2450985.90 &   0.65 &  -0.23 &  -0.51 &  -0.89 &     \\
          &            &     & &   &2451328.96 &   1.13 &   0.24 &  -0.21 &  -0.56 &     \\
\object{
RU Vir}   &12447$+$0425&M    & 0.96 &C &2451292.01 &   3.74 &   2.38 &   1.37 &        &     \\
          &            &     & 0.95 &  &2451330.00 &   3.49 &   2.15 &   1.11 &  -0.61 &     \\
\object{
TT CVn}   &12570$+$3805&SRb  & & C &2451292.02 &   6.20 &   5.55 &   5.30 &        &     \\
          &            &     & &   &2451330.01 &   6.17 &   5.53 &   5.23 &   5.23 &     \\
\object{
SY CVn}   &13081$+$4718&Lb   & & O &2450498.22 &   3.48 &   2.68 &   2.31 &        &     \\
          &            &     & &   &2450946.96 &   3.52 &   2.70 &   2.34 &   2.00 &     \\
          &            &     & &   &2450985.91 &   3.46 &   2.65 &   2.36 &   2.07 &     \\
          &            &     & &   &2451328.99 &   3.69 &   2.90 &   2.52 &   2.17 &     \\
\object{
RX Boo}   &14219$+$2555&SRb  & & O &2449850.96 &  -0.56 &  -1.47 &  -1.87 &  -2.35 &     \\
\object{
SY CrB}   &15349$+$3244&Lb   & & O &2450498.24 &   3.72 &   2.87 &   2.56 &        &     \\
          &            &     & &   &2450946.98 &   3.74 &   2.88 &   2.58 &   2.35 &     \\
          &            &     & &   &2450985.93 &   3.77 &   2.94 &   2.60 &   2.39 &     \\
          &            &     & &   &2451329.00 &   3.83 &   2.97 &   2.67 &   2.49 &     \\
$\longrightarrow $ & & & & & \\
   \hline
   \end{tabular}
   \end{flushleft}
\end{table*}


\begin{table*}[htbp]
   \caption[]{Near-infrared photometry of ISO-AGB variables 2}
   \label{t:nirp2}
   \begin{flushleft}
   \begin{tabular}{ll|llcrrrrrc}
   \hline
          GCVS4
       &  IRAS
       &  Type
       &  Phase
       &  Chem.
    & \multicolumn{1}{c}{JD}
    & \multicolumn{1}{c}{\small J}
    & \multicolumn{1}{c}{\small H}
    & \multicolumn{1}{c}{\small K}
    & \multicolumn{1}{c}{\small L$^\prime$}
    & pub.\\
   \hline
\object{
V CrB}    &15477$+$3943&M    & 0.88 &C &2450173.07 &   3.49 &   2.48 &   1.69 &        &     \\
          &            &     & 0.95 &  &2450201.08 &   3.18 &   2.17 &   1.44 &        &     \\
          &            &     & 0.02 &  &2450226.09 &   3.11 &   2.05 &   1.31 &        &     \\
          &            &     & 0.04 &  &2450231.93 &   3.16 &   2.08 &   1.35 &   0.12 &     \\
          &            &     & 0.05 &  &2450233.93 &   3.13 &   2.05 &   1.32 &   0.07 &     \\
          &            &     & 0.09 &  &2450248.96 &   3.11 &   2.03 &   1.29 &   0.03 &     \\
          &            &     & 0.14 &  &2450268.95 &   3.20 &   2.10 &   1.32 &   0.15 &     \\
          &            &     & 0.82 &  &2450509.23 &   3.79 &   2.64 &   1.77 &   0.65 &     \\
          &            &     & 0.86 &  &2450908.03 &   3.55 &   2.44 &   1.55 &   0.29 &     \\
          &            &     & 0.96 &  &2450946.98 &   3.24 &   2.14 &   1.31 &   0.16 &     \\
          &            &     & 0.07 &  &2450985.93 &   3.13 &   2.00 &   1.18 &   0.08 &     \\
          &            &     & 0.03 &  &2451329.01 &   2.88 &   1.82 &   1.11 &  -0.03 &     \\
\object{
ST Her}   &15492$+$4837&SRb  & & O &2450498.25 &   0.60 &  -0.26 &  -0.65 &        &     \\
          &            &     & &   &2450947.00 &   0.58 &  -0.32 &  -0.67 &  -0.98 &     \\
          &            &     & &   &2450985.94 &   0.55 &  -0.34 &  -0.71 &  -0.98 &     \\
          &            &     & &   &2451329.03 &   0.65 &  -0.23 &  -0.56 &  -0.84 &     \\
\object{
RR Her}   &16028$+$5038&SRb  & & C &2451292.09 &   4.38 &   3.49 &   3.22 &        &     \\
          &            &     & &   &2451330.05 &   4.49 &   3.61 &   3.31 &   2.90 &     \\
\object{
NP Her}   &16150$+$2558&M    & & C &2451293.04 &   5.61 &   4.40 &   3.48 &        &     \\
          &            &     & &   &2451330.07 &   5.44 &   4.27 &   3.44 &   2.53 &     \\
\object{
g Her}    &16269$+$4159&SRb  & & O &2449851.06 &  -0.88 &  -1.76 &  -2.04 &  -2.34 &     \\
          &            &     & &   &2449997.86 &  -0.89 &  -1.78 &  -2.10 &        &     \\
          &            &     & &   &2450173.08 &  -0.80 &  -1.63 &  -1.94 &        &     \\
          &            &     & &   &2450201.09 &  -0.83 &  -1.66 &  -1.95 &        &     \\
          &            &     & &   &2450226.08 &  -0.87 &  -1.73 &  -2.02 &        &     \\
          &            &     & &   &2450231.94 &  -0.83 &  -1.68 &  -1.98 &  -2.24 &     \\
          &            &     & &   &2450248.00 &  -0.84 &  -1.69 &  -1.98 &  -2.24 &     \\
          &            &     & &   &2450248.99 &  -0.85 &  -1.70 &  -2.00 &  -2.28 &     \\
          &            &     & &   &2450268.98 &  -0.74 &  -1.64 &  -1.95 &  -2.17 &     \\
          &            &     & &   &2450297.92 &  -0.86 &  -1.69 &  -2.03 &  -2.29 &     \\
          &            &     & &   &2450306.99 &  -1.11 &  -1.91 &  -2.17 &  -2.37 &     \\
          &            &     & &   &2450498.26 &        &  -1.73 &  -2.02 &        &     \\
          &            &     & &   &2450626.08 &  -0.88 &  -1.72 &  -2.02 &  -2.36 &     \\
          &            &     & &   &2450660.00 &  -0.90 &  -1.81 &  -2.06 &  -2.34 &     \\
          &            &     & &   &2450660.98 &  -0.90 &  -1.77 &  -2.08 &        &     \\
          &            &     & &   &2450686.98 &  -0.89 &  -1.74 &  -2.05 &  -2.31 &     \\
          &            &     & &   &2450947.01 &  -0.89 &  -1.74 &  -2.04 &  -2.26 &     \\
          &            &     & &   &2450985.97 &  -0.80 &  -1.67 &  -2.05 &  -2.25 &     \\
          &            &     & &   &2451329.06 &  -0.85 &  -1.71 &  -2.00 &  -2.22 &     \\
\object{
AX Sco}   &16387$-$2700&SRb  & & O &2449854.09 &   2.06 &   1.12 &   0.80 &   0.47 &     \\
          &            &     & &   &2450948.03 &   2.57 &   1.66 &   1.24 &   1.02 &     \\
          &            &     & &   &2450985.98 &   1.65 &   0.77 &   0.89 &   0.43 &     \\
          &            &     & &   &2451329.07 &   2.11 &   1.15 &   0.83 &   0.26 &     \\
\object{
V380 Sco} &16529$-$3014&SRa  & & O &2449851.11 &   4.72 &   3.80 &   3.56 &   3.35 &     \\
\object{
V438 Oph} &17123$+$1107&SRb  & & O &2449852.08 &   1.89 &   1.01 &   0.66 &   0.23 &     \\
          &            &     & &   &2450708.86 &   1.83 &   0.94 &   0.57 &        &     \\
          &            &     & &   &2450948.01 &   1.85 &   0.91 &   0.56 &        &     \\
          &            &     & &   &2450985.99 &   1.86 &   0.96 &   0.53 &   0.19 &     \\
          &            &     & &   &2451329.09 &   1.76 &   0.86 &   0.51 &   0.15 &     \\
\object{
Z Oph}    &17170$+$0133&M    & 0.68 &O &2449852.12 &   5.72 &   4.95 &   4.48 &   3.72 &     \\
\object{
V520 Oph} &17197$-$2909&SRa  & & O &2449851.14 &   4.83 &   3.98 &   3.67 &   3.27 &     \\
\object{
TY Dra}   &17361$+$5746&Lb   & & O &2449854.16 &   2.28 &   1.36 &   0.99 &   0.69 &LBI  \\
          &            &     & &   &2450708.91 &   2.26 &   1.30 &   0.95 &   0.70 &     \\
          &            &     & &   &2450948.02 &   2.20 &   1.22 &   0.89 &   0.65 &     \\
          &            &     & &   &2450986.00 &   2.27 &   1.37 &   1.02 &   0.71 &     \\
          &            &     & &   &2451329.10 &   2.45 &   1.54 &   1.17 &   0.84 &     \\
$\longrightarrow $ & & & & & \\
   \hline
   \end{tabular}
   \end{flushleft}
\end{table*}

\begin{table*}[htbp]
   \caption[]{Near-infrared photometry of ISO-AGB variables 3}
   \label{t:nirp3}
   \begin{flushleft}
   \begin{tabular}{ll|llcrrrrrc}
   \hline
          GCVS4
       &  IRAS
       &  Type
       &  Phase
       &  Chem.
    & \multicolumn{1}{c}{JD}
    & \multicolumn{1}{c}{\small J}
    & \multicolumn{1}{c}{\small H}
    & \multicolumn{1}{c}{\small K}
    & \multicolumn{1}{c}{\small L$^\prime$}
    & pub.\\
   \hline
\object{
T Dra}    &17556$+$5813&M    & 0.44 & C &2450173.17 &  4.59 &   3.03 &   1.73 &        &     \\
          &            &     & 0.74 &  &2450201.13 &   4.55 &   3.00 &   1.68 &        &     \\
          &            &     & 0.81 &  &2450232.01 &   4.37 &   2.88 &   1.59 &   0.04 &     \\
          &            &     & 0.90 &  &2450269.06 &   3.82 &   2.37 &   1.24 &  -0.23 &     \\
          &            &     & 0.97 &  &2450297.95 &   3.45 &   2.10 &   0.99 &  -0.44 &     \\
          &            &     & 0.72 &  &2450626.10 &   4.45 &   2.99 &   1.68 &   0.17 &     \\
          &            &     & 0.80 &  &2450659.04 &   4.31 &   2.84 &   1.55 &   0.10 &     \\
          &            &     & 0.80 &  &2450660.01 &   4.38 &   2.85 &   1.62 &   0.15 &     \\
          &            &     & 0.80 &  &2450661.04 &   4.25 &   2.81 &   1.55 &        &     \\
          &            &     & 0.86 &  &2450685.94 &   3.92 &   2.53 &   1.33 &  -0.12 &     \\
          &            &     & 0.56 &  &2450986.02 &   4.76 &   3.30 &   1.94 &   0.45 &     \\
          &            &     & 0.36 &  &2451331.03 &   4.19 &   2.74 &   1.59 &  -0.03 &     \\
\object{
AO Sgr}   &18089$-$2952&SRb  & & O &2449851.16 &   3.09 &   2.17 &   1.84 &   1.52 &     \\
\object{
V851 Oph} &18324$+$0701&SRb  & & O &2449852.14 &   3.93 &   3.00 &   2.66 &   2.32 &     \\
\object{
CZ Ser}   &18347$-$0241&Lb   & & O &2450707.94 &   2.53 &   1.42 &   0.99 &   0.62 &     \\
          &            &     & &   &2450948.12 &   2.51 &   1.33 &   0.93 &   0.58 &     \\
          &            &     & &   &2450986.03 &   2.54 &   1.40 &   0.97 &   0.58 &     \\
          &            &     & &   &2451331.11 &   2.57 &   1.46 &   1.02 &        &     \\
\object{
RW Sct}   &18537$-$1035&SRb  & & O &2449852.17 &   1.99 &   1.05 &   0.68 &   0.24 &     \\
\object{
R Aql}    &19039$+$0809&M    & 0.97 & O &2450708.97 &   0.60 &  -0.22 &  -0.65 &  -1.25 &     \\
          &            &     & 0.72 &  &2451331.12 &   0.39 &  -0.47 &  -0.90 &  -1.52 &     \\
\object{
T Sge}    &19194$+$1734&SRb  & & O &2447388.00 &   1.35 &   0.25 &  -0.17 &  -0.65 &SRIIa\\
          &            &     & &   &2449852.16 &   1.32 &   0.32 &  -0.07 &  -0.52 &     \\
          &            &     & &   &2450708.98 &   1.19 &   0.21 &  -0.20 &        &     \\
          &            &     & &   &2451331.12 &   1.26 &   0.28 &  -0.12 &  -0.59 &     \\
\object{
AH Cyg}   &19588$+$4002&SRb  & & O &2448081.60 &   3.36 &   2.36 &   1.95 &   1.74 &SRIIa\\
          &            &     & &   &2449852.18 &   3.25 &   2.31 &   1.97 &   1.67 &     \\
\object{
V584 Aql} &20079$-$0146&Lb   & & O &2450709.02 &   2.05 &   1.14 &   0.77 &   0.46 &     \\
\object{
V499 Aql} &20141$-$0716&SRa  & & O &2449855.16 &   3.79 &   2.92 &   2.57 &   2.28 &     \\
\object{
CZ Del}   &20312$+$0920&SRb  & & O &2449853.19 &   3.68 &   2.84 &   2.60 &   2.36 &     \\
\object{
V Cyg}    &20396$+$4757&M    & 0.86 &C &2450659.15 &   3.19 &   1.50 &   0.13 &  -1.60 &     \\
          &            &     & 0.86 &  &2450661.14 &   3.14 &   1.48 &   0.11 &        &     \\
          &            &     & 0.93 &  &2450687.07 &   2.71 &   1.12 &  -0.19 &  -1.82 &     \\
\object{
W Cyg}    &21341$+$4508&SRb  & & O &2449594.00 &  -0.29 &  -1.15 &  -1.48 &  -1.75 &SRIIb\\
          &            &     & &   &2449954.16 &  -0.35 &  -1.13 &  -1.44 &        &     \\
          &            &     & &   &2449996.91 &  -0.31 &  -1.09 &  -1.41 &  -1.57 &     \\
          &            &     & &   &2450042.93 &  -0.27 &  -1.08 &  -1.37 &        &     \\
          &            &     & &   &2450232.23 &  -0.14 &  -0.99 &  -1.31 &  -1.63 &     \\
          &            &     & &   &2450249.19 &  -0.16 &  -1.03 &  -1.36 &  -1.63 &     \\
          &            &     & &   &2450269.17 &  -0.15 &  -1.01 &  -1.38 &  -1.65 &     \\
          &            &     & &   &2450306.04 &  -0.18 &  -1.05 &  -1.34 &  -1.61 &     \\
          &            &     & &   &2450326.02 &  -0.16 &  -1.06 &  -1.37 &  -1.64 &     \\
          &            &     & &   &2450710.11 &  -0.16 &  -1.03 &  -1.35 &  -1.12 &     \\
\object{
SV Peg}   &22035$+$3506&SRb  & & O &2449594.07 &   0.77 &  -0.13 &  -0.49 &  -0.83 &SRIIb\\
          &            &     & &   &2449954.16 &   0.70 &  -0.17 &  -0.55 &        &     \\
          &            &     & &   &2449997.89 &   0.81 &  -0.13 &  -0.53 &  -0.81 &     \\
          &            &     & &   &2450042.93 &   0.69 &  -0.19 &  -0.56 &        &     \\
          &            &     & &   &2450306.11 &   0.81 &  -0.16 &  -0.52 &  -0.84 &     \\
          &            &     & &   &2450326.05 &   0.74 &  -0.20 &  -0.57 &  -0.87 &     \\
          &            &     & &   &2450327.04 &   0.70 &  -0.21 &  -0.59 &  -0.87 &     \\
          &            &     & &   &2450407.90 &   0.77 &  -0.21 &  -0.56 &  -0.90 &     \\
          &            &     & &   &2450686.04 &   0.85 &  -0.07 &  -0.48 &  -0.89 &     \\
\object{
V571 Cas} &23174$+$5941&Lb   & & C &2450691.00 &  10.21 &   7.84 &   5.78 &        &     \\
          &            &     & &   &2450707.07 &  10.11 &   7.77 &   5.74 &   3.28 &     \\
\object{
V353 Cas} &23211$+$5553&SRa  & & C &2448086.68 &   4.68 &   3.46 &   2.76 &   2.13 &SRIIa\\
          &            &     & &   &2450706.04 &   4.68 &   3.53 &   2.86 &        &     \\
$\longrightarrow $ & & & & & \\
   \hline
   \end{tabular}
   \end{flushleft}
\end{table*}


\begin{table*}[htbp]
   \caption[]{Near-infrared photometry of ISO-AGB variables 4}
   \label{t:nirp4}
   \begin{flushleft}
   \begin{tabular}{ll|llcrrrrrc}
   \hline
          GCVS4
       &  IRAS
       &  Type
       &  Phase
       &  Chem.
    & \multicolumn{1}{c}{JD}
    & \multicolumn{1}{c}{\small J}
    & \multicolumn{1}{c}{\small H}
    & \multicolumn{1}{c}{\small K}
    & \multicolumn{1}{c}{\small L$^\prime$}
    & pub.\\
   \hline
\object{
R Cas}    &23558$+$5106&M    & 0.69 &O &2449954.18 &  -0.01 &  -0.86 &  -1.52 &        &     \\
          &            &     & 0.89 &  &2450042.94 &  -0.34 &  -1.09 &  -1.67 &        &     \\
          &            &     & 0.92 &  &2450055.96 &  -0.38 &  -1.20 &  -1.76 &  -2.59 &     \\
          &            &     & 0.96 &  &2450074.92 &  -0.50 &  -1.29 &  -1.77 &        &     \\
          &            &     & 0.48 &  &2450297.17 &  -0.05 &  -0.93 &  -1.58 &  -2.53 &     \\
          &            &     & 0.49 &  &2450298.19 &   0.10 &  -0.80 &  -1.44 &  -2.38 &     \\
          &            &     & 0.50 &  &2450306.17 &   0.12 &  -0.88 &  -1.48 &  -2.44 &     \\
          &            &     & 0.55 &  &2450326.12 &   0.29 &  -0.67 &  -1.39 &  -2.31 &     \\
          &            &     & 0.55 &  &2450327.10 &   0.30 &  -0.69 &  -1.41 &  -2.35 &     \\
          &            &     & 0.74 &  &2450407.93 &   0.00 &  -0.91 &  -1.55 &  -2.48 &     \\
          &            &     & 0.40 &  &2450686.12 &  -0.27 &  -1.14 &  -1.70 &  -2.56 &     \\
   \hline
   \end{tabular}
   \end{flushleft}
\end{table*}

\end{document}
