Table 8: Pulsation amplitudes for the full set of firstovertone models

Z M/M_⊙ log L/ log L_⊙ T_e (K) P (d) A_u A_g A_r A_i A_z 0.0001 0.65 1.61 7300 0.2527 0.3939 0.4978 0.3522 0.2727 0.2427 0.0001 0.65 1.61 7200 0.2634 0.9037 1.0765 0.7677 0.5969 0.5296 0.0001 0.65 1.61 7100 0.2763 1.0208 1.2079 0.8637 0.6728 0.5958 0.0001 0.65 1.61 7000 0.2889 0.9900 1.1914 0.8546 0.6693 0.5944 0.0001 0.65 1.61 6900 0.3027 0.9128 1.1263 0.8139 0.6433 0.5714 0.0001 0.65 1.61 6800 0.3182 0.8089 1.0122 0.7391 0.5876 0.5194 0.0001 0.65 1.61 6700 0.3336 0.6208 0.7748 0.5778 0.4686 0.4153 0.0001 0.65 1.61 6600 0.3510 0.5207 0.6583 0.4750 0.3729 0.3204 0.0001 0.70 1.72 7200 0.3093 0.3935 0.4982 0.3544 0.2745 0.2440 0.0001 0.70 1.72 7100 0.3236 0.7960 0.9746 0.6853 0.5304 0.4734 0.0001 0.70 1.72 7000 0.3391 0.8667 1.0591 0.7558 0.5907 0.5258 0.0001 0.70 1.72 6900 0.3551 0.8189 1.0200 0.7307 0.5725 0.5069 0.0001 0.70 1.72 6800 0.3743 0.7353 0.9225 0.6725 0.5348 0.4730 0.0001 0.70 1.72 6700 0.3919 0.6572 0.8222 0.6040 0.4841 0.4277 0.0001 0.70 1.72 6600 0.4108 0.5068 0.6208 0.4701 0.3916 0.3513 0.0001 0.75 1.61 7300 0.2327 1.1463 1.2716 0.9119 0.7100 0.6299 0.0001 0.75 1.61 7200 0.2437 1.2748 1.3986 1.0058 0.7847 0.6937 0.0001 0.75 1.61 7100 0.2535 1.3099 1.4457 1.0400 0.8120 0.7254 0.0001 0.75 1.61 7000 0.2669 1.1975 1.3795 0.9887 0.7797 0.6944 0.0001 0.75 1.61 6900 0.2787 1.0419 1.2514 0.9089 0.7210 0.6436 0.0001 0.75 1.61 6800 0.2912 0.8644 1.0793 0.7936 0.6362 0.5666 0.0001 0.75 1.61 6700 0.3065 0.7118 0.8918 0.6664 0.5408 0.4798 0.0001 0.75 1.61 6600 0.3234 0.6908 0.8732 0.6359 0.5023 0.4360 0.0001 0.75 1.72 7200 0.2975 0.6696 0.8261 0.5831 0.4528 0.4043 0.0001 0.75 1.72 7000 0.3261 1.0345 1.2271 0.8817 0.6914 0.6163 0.0001 0.75 1.72 6900 0.3419 0.9863 1.1980 0.8603 0.6758 0.6006 0.0001 0.75 1.72 6800 0.3577 0.9102 1.1269 0.8153 0.6447 0.5713 0.0001 0.75 1.72 6600 0.3961 0.5495 0.6905 0.4986 0.4087 0.3638 0.0001 0.75 1.81 7100 0.3665 0.4767 0.6044 0.4275 0.3310 0.2939 0.0001 0.75 1.81 6900 0.4037 0.7550 0.9420 0.6736 0.5259 0.4644 0.0001 0.80 1.72 7200 0.2866 0.9959 1.1542 0.8305 0.6504 0.5806 0.0001 0.80 1.72 7100 0.2993 1.1618 1.3230 0.9569 0.7518 0.6705 0.0001 0.80 1.72 7000 0.3130 1.1968 1.3749 0.9936 0.7824 0.6996

0.0001 0.80 1.72 6900 0.3277 1.1461 1.3502 0.9800 0.7755 0.6927 0.0001 0.80 1.72 6800 0.3445 0.9973 1.2195 0.8862 0.7045 0.6276 0.0001 0.80 1.72 6700 0.3625 0.7981 0.9935 0.7358 0.5926 0.5258 0.0001 0.80 1.72 6600 0.3806 0.6237 0.7845 0.5698 0.4578 0.4058 0.0001 0.80 1.72 6500 0.3984 0.5384 0.6717 0.4875 0.3853 0.3316 0.0001 0.80 1.81 7100 0.3525 0.7211 0.8879 0.6250 0.4815 0.4287 0.0001 0.80 1.81 7000 0.3698 0.9018 1.0948 0.7786 0.6085 0.5431 0.0001 0.80 1.81 6900 0.3871 0.9091 1.1105 0.7947 0.6223 0.5532 0.0001 0.80 1.81 6800 0.4065 0.8231 1.0224 0.7416 0.5875 0.5214 0.0001 0.80 1.81 6700 0.4266 0.7519 0.9370 0.6850 0.5460 0.4820 0.0001 0.80 1.81 6600 0.4480 0.5774 0.7063 0.5304 0.4359 0.3884 0.0001 0.80 1.91 7000 0.4450 0.4717 0.5961 0.4253 0.3309 0.2936 0.0001 0.80 1.91 6900 0.4672 0.6020 0.7607 0.5399 0.4269 0.3795 0.0001 0.80 1.91 6800 0.4926 0.6299 0.7852 0.5747 0.4582 0.4066 0.0001 0.80 1.91 6700 0.5150 0.6255 0.7757 0.5715 0.4611 0.4133 0.0001 0.80 1.91 6600 0.5421 0.5751 0.7034 0.5320 0.4441 0.4018 0.0004 0.70 1.61 7300 0.2422 0.7085 0.8383 0.5918 0.4592 0.4093 0.0004 0.70 1.61 7200 0.2535 1.0761 1.2097 0.8656 0.6770 0.6035 0.0004 0.70 1.61 7100 0.2652 1.1560 1.3016 0.9330 0.7304 0.6495 0.0004 0.70 1.61 7000 0.2778 1.1584 1.3208 0.9499 0.7478 0.6671 0.0004 0.70 1.61 6900 0.2909 1.0623 1.2507 0.8978 0.7079 0.6300 0.0004 0.70 1.61 6800 0.3046 0.8896 1.0788 0.7854 0.6272 0.5575 0.0004 0.70 1.61 6700 0.3208 0.6914 0.8388 0.6212 0.5045 0.4478 0.0004 0.70 1.61 6600 0.3360 0.5979 0.7307 0.5261 0.4140 0.3573 0.0004 0.70 1.72 7100 0.3251 0.7430 0.8898 0.6275 0.4875 0.4353 0.0004 0.70 1.72 7000 0.3406 0.8466 1.0135 0.7188 0.5617 0.5013 0.0004 0.70 1.72 6900 0.3567 0.8070 0.9803 0.6982 0.5462 0.4832 0.0004 0.70 1.72 6800 0.3747 0.7223 0.8795 0.6363 0.5056 0.4477 0.0004 0.70 1.72 6700 0.3933 0.6539 0.7912 0.5788 0.4644 0.4115 0.0004 0.70 1.81 7000 0.4033 0.5421 0.6663 0.4744 0.3699 0.3301 0.0004 0.70 1.81 6900 0.4217 0.6126 0.7533 0.5339 0.4257 0.3807 0.0004 0.70 1.81 6800 0.4431 0.6185 0.7486 0.5491 0.4424 0.3962 0.0004 0.70 1.81 6700 0.4658 0.6018 0.7224 0.5356 0.4411 0.3988 0.0010 0.65 1.51 7300 0.2119 1.0327 1.1351 0.8063 0.6299 0.5613 0.0010 0.65 1.51 7200 0.2214 1.1403 1.2427 0.8857 0.6937 0.6177 0.0010 0.65 1.51 7100 0.2311 1.1479 1.2702 0.9010 0.7112 0.6360 0.0010 0.65 1.51 7000 0.2427 1.1273 1.2720 0.9093 0.7167 0.6389 0.0010 0.65 1.51 6900 0.2545 0.9950 1.1609 0.8332 0.6607 0.5882