Table 7: Pulsation amplitudes for the full set of fundamental models

Z M/M_⊙ log L/ log L_⊙ T_e (K) P (d) A_u A_g A_r A_i A_z 0.0001 0.65 1.61 6900 0.4059 1.7877 1.8675 1.3689 1.0900 0.9669 0.0001 0.65 1.61 6800 0.4260 1.6424 1.7906 1.2955 1.0261 0.9187 0.0001 0.65 1.61 6700 0.4477 1.4709 1.6853 1.2125 0.9718 0.8703 0.0001 0.65 1.61 6600 0.4713 1.2503 1.5031 1.0877 0.8735 0.7814 0.0001 0.65 1.61 6400 0.5237 0.8472 1.0502 0.7517 0.6055 0.5397 0.0001 0.65 1.61 6300 0.5533 0.7909 0.9731 0.7122 0.5683 0.4955 0.0001 0.65 1.61 6200 0.5826 0.8458 1.0294 0.7526 0.5999 0.5193 0.0001 0.65 1.61 6100 0.6159 0.5782 0.6864 0.4928 0.3879 0.3268 0.0001 0.65 1.61 6000 0.6508 0.2813 0.3201 0.2217 0.1719 0.1419 0.0001 0.70 1.72 6900 0.4770 1.8368 1.8891 1.3869 1.1060 0.9949 0.0001 0.70 1.72 6700 0.5280 1.6090 1.7753 1.2853 1.0285 0.9218 0.0001 0.70 1.72 6500 0.5855 1.1883 1.4292 1.0526 0.8480 0.7582 0.0001 0.70 1.72 6300 0.6511 1.0529 1.2757 0.9292 0.7397 0.6471 0.0001 0.70 1.72 6100 0.7270 0.6633 0.7877 0.5735 0.4577 0.3930 0.0001 0.70 1.72 6000 0.7687 0.4628 0.5301 0.3829 0.3050 0.2584 0.0001 0.75 1.61 6800 0.3894 1.5375 1.7091 1.2477 0.9899 0.8789 0.0001 0.75 1.61 6700 0.4085 1.4228 1.6461 1.1959 0.9468 0.8370 0.0001 0.75 1.61 6400 0.4768 0.9752 1.2004 0.8509 0.6582 0.5591 0.0001 0.75 1.61 6100 0.5601 0.5504 0.6498 0.4461 0.3515 0.2959 0.0001 0.75 1.72 6900 0.4574 1.8581 1.9169 1.4081 1.1223 0.9959 0.0001 0.75 1.72 6700 0.5046 1.5719 1.7623 1.2703 1.0032 0.9005 0.0001 0.75 1.72 6600 0.5311 1.3686 1.6052 1.1537 0.9224 0.8241 0.0001 0.75 1.72 6500 0.5601 1.1599 1.4054 1.0156 0.8179 0.7292 0.0001 0.75 1.72 6400 0.5891 0.9510 1.1562 0.8433 0.6822 0.6043 0.0001 0.75 1.72 6300 0.6221 0.9024 1.1041 0.8094 0.6467 0.5657 0.0001 0.75 1.72 6200 0.6562 0.8945 1.0847 0.7951 0.6353 0.5529 0.0001 0.75 1.72 6100 0.6947 0.6530 0.7775 0.5580 0.4387 0.3713 0.0001 0.75 1.72 6000 0.7335 0.3900 0.4469 0.3158 0.2486 0.2083 0.0001 0.75 1.81 6800 0.5698 1.8101 1.8849 1.3803 1.1098 0.9965 0.0001 0.75 1.81 6700 0.6001 1.6595 1.8036 1.3189 1.0568 0.9493 0.0001 0.75 1.81 6500 0.6653 1.3005 1.5420 1.1297 0.9061 0.8099 0.0001 0.75 1.81 6400 0.7009 1.1143 1.3359 0.9968 0.8125 0.7244 0.0001 0.75 1.81 6200 0.7833 0.9976 1.2028 0.8733 0.6938 0.6064

0.0001 0.75 1.81 5900 0.9256 0.2849 0.3115 0.2213 0.1747 0.1454 0.0001 0.80 1.72 6800 0.4598 1.9020 1.9602 1.4419 1.1519 1.0225 0.0001 0.80 1.72 6600 0.5088 1.3233 1.5728 1.1271 0.8863 0.7834 0.0001 0.80 1.72 6500 0.5358 1.1017 1.3365 0.9617 0.7765 0.6949 0.0001 0.80 1.72 6400 0.5656 1.0168 1.2428 0.8801 0.6982 0.6112 0.0001 0.80 1.72 6300 0.5954 0.8398 1.0233 0.7298 0.5781 0.4999 0.0001 0.80 1.72 6200 0.6211 0.7297 0.8781 0.6188 0.4886 0.4184 0.0001 0.80 1.72 6100 0.6549 0.6466 0.7792 0.5711 0.4575 0.3946 0.0001 0.80 1.72 6000 0.6935 0.3501 0.4004 0.2814 0.2192 0.1813 0.0001 0.80 1.81 6800 0.5449 1.7908 1.8808 1.3741 1.1016 0.9907 0.0001 0.80 1.81 6700 0.5746 1.6685 1.8199 1.3263 1.0632 0.9543 0.0001 0.80 1.81 6600 0.6040 1.5139 1.7193 1.2365 0.9879 0.8850 0.0001 0.80 1.81 6500 0.6366 1.2729 1.5122 1.0893 0.8718 0.7806 0.0001 0.80 1.81 6400 0.6719 1.0504 1.2710 0.9457 0.7690 0.6865 0.0001 0.80 1.81 6300 0.7086 0.9713 1.1769 0.8604 0.6871 0.6012 0.0001 0.80 1.81 6200 0.7483 1.0205 1.2255 0.8908 0.7081 0.6167 0.0001 0.80 1.81 6100 0.7909 0.8304 0.9893 0.7122 0.5617 0.4865 0.0001 0.80 1.81 6000 0.8375 0.5262 0.6056 0.4385 0.3500 0.2979 0.0001 0.80 1.81 5900 0.8833 0.2676 0.2922 0.2040 0.1591 0.1317 0.0001 0.80 1.91 6800 0.6614 1.8640 1.9096 1.4204 1.1447 1.0303 0.0001 0.80 1.91 6700 0.6954 1.7560 1.8715 1.3837 1.1109 0.9998 0.0001 0.80 1.91 6600 0.7332 1.6153 1.8047 1.3267 1.0633 0.9555 0.0001 0.80 1.91 6500 0.7732 1.4136 1.6522 1.2060 0.9684 0.8674 0.0001 0.80 1.91 6400 0.8150 1.1931 1.4166 1.0491 0.8508 0.7571 0.0001 0.80 1.91 6300 0.8604 1.0347 1.2366 0.8883 0.6999 0.6106 0.0001 0.80 1.91 6200 0.9074 0.9514 1.1340 0.8231 0.6541 0.5689 0.0001 0.80 1.91 6100 0.9623 0.7112 0.8258 0.5995 0.4784 0.4104 0.0001 0.80 1.91 6000 1.0184 0.5392 0.6066 0.4362 0.3471 0.3019 0.0001 0.80 1.91 5900 1.0798 0.4136 0.4536 0.3239 0.2580 0.2175 0.0001 0.80 1.91 5800 1.1406 0.1922 0.2010 0.1375 0.1058 0.0872 0.0004 0.70 1.61 6800 0.4082 1.7016 1.8094 1.3075 1.0340 0.915 0.0004 0.70 1.61 6700 0.4295 1.5108 1.6908 1.2069 0.9464 0.8393 0.0004 0.70 1.61 6600 0.4517 1.2677 1.4851 1.0515 0.8427 0.7550 0.0004 0.70 1.61 6400 0.5012 0.9386 1.1157 0.7963 0.6293 0.5471 0.0004 0.70 1.61 6300 0.5285 0.7801 0.9189 0.6517 0.5130 0.4406 0.0004 0.70 1.61 6200 0.5585 0.7449 0.8813 0.6435 0.5145 0.4468 0.0004 0.70 1.61 6100 0.5889 0.5941 0.6806 0.4890 0.3877 0.3294 0.0004 0.70 1.61 6050 0.6063 0.4536 0.5083 0.3558 0.2769 0.2301

0.0004 0.70 1.72 6900 0.4762 1.8882 1.8970 1.3841 1.1001 0.9845 0.0004 0.70 1.72 6800 0.4993 1.7857 1.8493 1.3365 1.0726 0.9635 0.0004 0.70 1.72 6700 0.5308 1.6422 1.7621 1.2779 1.0210 0.9160 0.0004 0.70 1.72 6600 0.5576 1.4557 1.6340 1.1897 0.9497 0.8511 0.0004 0.70 1.72 6500 0.5889 1.2482 1.4569 1.0662 0.8587 0.7687 0.0004 0.70 1.72 6400 0.6201 1.0524 1.2333 0.9146 0.7436 0.6610 0.0004 0.70 1.72 6300 0.6547 1.1484 1.3421 0.9642 0.7630 0.6678 0.0004 0.70 1.72 6100 0.7303 0.6624 0.7524 0.5426 0.4324 0.3709 0.0004 0.70 1.72 5950 0.7944 0.3677 0.3967 0.2793 0.2203 0.1850 0.0004 0.70 1.81 6900 0.5693 1.9008 1.8907 1.4009 1.1290 1.0157 0.0004 0.70 1.81 6800 0.5986 1.8435 1.8834 1.3895 1.1172 1.0052 0.0004 0.70 1.81 6700 0.6311 1.7234 1.8341 1.3443 1.0776 0.9693 0.0004 0.70 1.81 6600 0.6645 1.5736 1.7516 1.2745 1.0184 0.9128 0.0004 0.70 1.81 6500 0.6995 1.3609 1.5670 1.1402 0.9155 0.8171 0.0004 0.70 1.81 6400 0.7387 1.1258 1.3106 0.9334 0.7538 0.6689 0.0004 0.70 1.81 6300 0.7796 1.0648 1.2401 0.8890 0.7027 0.6144 0.0004 0.70 1.81 6100 0.8718 0.6084 0.6723 0.4799 0.3808 0.3537 0.0004 0.70 1.81 5900 0.9750 0.3782 0.3927 0.2754 0.2171 0.1811 0.0004 0.70 1.81 5850 1.0025 0.2555 0.2611 0.1772 0.1365 0.1137 0.0010 0.65 1.51 6700 0.3772 1.4418 1.5958 1.1226 0.8805 0.7879 0.0010 0.65 1.51 6500 0.4170 1.0177 1.1763 0.8406 0.6642 0.5903 0.0010 0.65 1.51 6300 0.4629 0.8584 0.9852 0.6982 0.5558 0.4850 0.0010 0.65 1.51 6200 0.4836 0.2482 0.2683 0.1787 0.1356 0.1110 0.0010 0.65 1.61 6900 0.4140 1.8022 1.8068 1.3057 1.0500 0.9435 0.0010 0.65 1.61 6800 0.4352 1.7427 1.7896 1.3028 1.0412 0.9321 0.0010 0.65 1.61 6700 0.4568 1.5940 1.7004 1.2274 0.9759 0.8720 0.0010 0.65 1.61 6500 0.5063 1.1879 1.3596 0.9910 0.7986 0.7112 0.0010 0.65 1.61 6300 0.5620 1.2220 1.3864 0.9801 0.7701 0.6731 0.0010 0.65 1.61 6100 0.6267 0.6036 0.6613 0.4701 0.3731 0.3190 0.0010 0.65 1.61 6000 0.6614 0.3200 0.3303 0.2237 0.1731 0.1437 0.0010 0.65 1.72 6950 0.4893 1.9381 1.8771 1.3822 1.1145 1.0026 0.0010 0.65 1.72 6900 0.5099 1.9223 1.8867 1.3840 1.1139 1.0018 0.0010 0.65 1.72 6800 0.5352 1.8321 1.8557 1.3563 1.0892 0.9799 0.0010 0.65 1.72 6500 0.6256 1.2747 1.4372 1.0131 0.8128 0.7213 0.0010 0.65 1.72 6400 0.6592 1.2910 1.4540 1.0294 0.8113 0.7165 0.0010 0.65 1.72 6300 0.6974 1.0486 1.1818 0.8413 0.6652 0.5814 0.0010 0.65 1.72 6200 0.7347 0.7463 0.8155 0.5803 0.4609 0.3968 0.0010 0.65 1.72 6100 0.7755 0.6363 0.6789 0.4796 0.3805 0.3249