\documentstyle{article}
\setlength {\topmargin}{-5mm}
\setlength {\textwidth}{160mm}
\setlength {\textheight}{230mm}
\setlength {\oddsidemargin}{10mm}
\setlength {\evensidemargin}{10mm}
\pagestyle{plain}
\begin{document}
\begin{table}
\begin{tabular}{ccccccccccc} \hline
   Name&RA(1950)&DEC(1950)&       B$_J$&z&L60(L$_{\odot}$)&F12&  F25&F60&F100&   Ref\\ \hline
    00060-1543&  00 06 04.81&  -15 43 33.2& 18.83&    0.195&   11.57&  -0.07&  -0.07&   0.71&  0.79&3\\
    00091-0738&  00 09 09.83&  -07 38 49.1&  18.41&    0.118& 11.74&   -0.07&   0.29 &   2.63 &  2.63&5\\
    00105-0139&  00 10 30.10&  -01 39 46.0&   19.22&   0.163& 11.40&   -0.07&   -0.19&   0.63 &  0.92&1\\
    00146-0134&  00 14 41.84&  -01 34 18.7& 21.04&    0.241&  11.58&   -0.08&  -0.14  &   0.42 &  0.97&1\\
    00149-1451&  00 14 56.02&  -14 51 36.4& 19.35&    0.254&   11.68&  -0.06&   -0.19&   0.47 &  0.97&1\\
    00161-0850&  00 16 10.25&  -08 50 14.8&   17.45&    0.109& 11.46&  -0.12&   0.15 &   1.63 &  2.13&3\\
    00188-0856&  00 18 53.62&  -08 56 05.4&  18.37&    0.129& 11.81&   -0.08&   0.32 &   2.59 &  3.68&5\\
    00256-0208&  00 25 40.74&  -02 08 19.8& 20.58&    0.276&  11.86&   -0.07&  -0.27 &   0.60 &  0.62&3\\
    00275-2859&  00 27 35.03&  -28 59 01.6& 18.31&    0.279&   11.93&  -0.08&   0.22 &   0.69 &  0.86&10\\
    00275-0044&  00 27 35.36&  -00 44 17.0& 20.08&    0.242&  11.76&   -0.12&  -0.23&   0.63 &  1.41&1\\
   00333-2352&  00 33 20.67&  -23 52 39.2&   19.36&    0.293& 11.86&  -0.12&   -0.08&   0.53 &  1.15&1\\
   00335-2732&  00 33 32.00&  -27 32 05.4&  17.43&    0.069& 11.47&   -0.12&   0.70 &   4.3 &  3.4&6\\
   00377-2307&  00 37 45.06&  -23 07 41.3& 19.91&    0.338&   11.80&  -0.08&   -0.16&   0.34&  0.64&1\\
   00397-1312&  00 39 44.54&  -13 12 29.4&  19.45&    0.261& 12.29&   0.13&   -0.26 &   1.83 &  2.01&3\\
   00406-3127&  00 40 36.79&  -31 27 15.3&   19.92&   0.342& 12.13&   -0.06&   -0.08 &   0.72 &  0.75&1\\
   00456-2904&  00 45 40.49&  -29 04 40.1&  17.99&    0.110& 11.67&   -0.08&   0.15 &   2.60 &  2.97&6\\
   00461-0728&  00 46 07.44&  -07 28 42.4& 19.89&     0.246& 11.79&   -0.09&  -0.06&   0.66 &  1.08&3\\
   00507+0040&  00 50 45.99&   00 40 23.6& 20.05&    0.234&  11.69&   -0.09&  -0.18&   0.58 &  0.95&1\\
   00589-0352&  00 58 57.87&  -03 52 35.7&   18.14&    0.176& 11.50&  -0.12&   0.44 &   0.67 &  -0.7&1\\
   01003-1809&  01 00 19.81&  -18 09 49.2& 18.87&    0.221&   11.54&  -0.06&   -0.13 &   0.46&  1.36&1\\
   01003-2238&  01 00 23.60&  -22 38 02.7& 18.89&    0.118&  11.68&   -0.16&   0.62 &   2.29 &  2.06&4\\
   01031-2255&  01 03 10.67&  -22 55 21.1&   19.53&   0.187& 11.56&   -0.10&  -0.10&   0.68 &  2.52&1\\
   01082-2452&  01 08 15.52&  -24 52 06.3& 19.11&    0.230&   11.52&  -0.08&   -0.09 &   0.40 &  1.43&1\\
01160-2551$^*$& 01 16 03.50&  -25 51 47.3& 18.74&    0.236&  11.59&    0.10&   0.11&    0.45  &1.15&1\\       
   01166-0844&  01 16 37.28&  -08 44 56.0&  18.54&    0.119& 11.56&   -0.11&   0.16 &   1.74 &  1.34&1\\
   01199-2307&  01 19 57.48&  -23 07 39.7&20.43&    0.157&   11.77&   -0.09&  -0.12 &   1.60 &  1.22&2\\
   01234-0447&  01 23 24.99&  -04 47 28.5&  18.15&    0.157&   11.42& -0.1 &  0.1   &  0.71  &  1.26&3\\
   01284-1535&  01 28 26.44&  -15 35 16.2&   18.79&    0.153& 11.54&  -0.09&  -0.10&   0.99 &  1.94&3\\
   01298-0744&  01 29 50.98&  -07 44 33.6&  19.04&    0.136& 11.83&   -0.08&   0.22 &   2.47 &  2.64&1\\
   01355-1814&  01 35 32.67&  -18 14 36.3&  18.76&    0.191& 11.90&   -0.06&   0.12 &   1.4 &  1.52&3\\
   01379-3203&  01 37 59.23&  -32 03 23.0& 18.65&    0.203&   11.64&  -0.12&   -0.11&   0.69 &  0.92&2\\
   01392-2327&  01 39 12.85&  -23 27 11.0& 19.03&    0.256&   11.49&  -0.05&   -0.07&   0.30 &  0.42&1\\
   01494-1845&  01 49 28.06&  -18 45 35.4& 18.77&    0.157&  11.68&   -0.06&   0.14 &   1.29 &  1.84&2\\
   01536-1637&  01 53 41.87&  -16 37 27.6&   18.47&    0.163& 11.54&  -0.09&   -0.11&   0.87&  1.33&1\\
   01569-2939&  01 56 58.36&  -29 39 04.4& 18.18&    0.140&  11.71&   -0.09&   0.17 &   1.74 &  1.76&2\\
   01572+0009&  01 57 16.34&   00 09 09.8&  17.22&    0.163&   11.95& 0.123&   0.64 &   2.22 &2.49&11\\ 
   01579-1925&  01 57 55.64&  -19 25 30.3& 18.45&    0.173&   11.60&  -0.07&   0.18 &   0.87 &  0.88&1\\
   02021-2104&  02 02 06.58&  -21 04 04.1&   17.45&    0.117& 11.47&  -0.07&   0.33 &   1.45 &  2.09&2\\
   02038-0816&  02 03 51.91&  -08 16 40.6& 19.90&    0.220&   11.42&  -0.09&  -0.27&   0.35&  0.78&1\\
   02113-2937&  02 11 19.96&  -29 37 39.2&  19.07&    0.194&   11.73& -0.08&  -0.11&   0.94 &  1.81&2\\
   02115+0226&  02 11 34.96&   02 26 01.3&  19.88&    0.400&   11.93& -0.09&   0.16 &   0.32 &  0.77&1\\
   02125-2024&  02 12 34.03&  -20 24 22.0& 19.57&    0.258&  11.67&   -0.06&   -0.15&   0.45 &  1.43&6\\
   02130-1948&  02 13 03.06&  -19 48 23.4&  18.41&    0.192&   11.49& -0.07&   -0.15&   0.55 &  0.56&1\\
\end{tabular}
Table 1: Basic Data on Ultraluminous IRAS Galaxies in our new sample.

Notes: 12, 25, 60 and 100$\mu$m fluxes are in Jy, a negative value
indicates an upper limit.
References are (1) This work; (2) Parker \& Watson 1990; (3)
QDOT (Saunders et al in preparation); (4) Paturel et al 1989;
(5) Davis et al. private communication; (6) Huchra's
ZCAT; (7) Huchra private communication; (8) Soifer et al 1987; (9)
Clowes private communication; (10) Vader \&
Simon 1987; (11) Allen et al 1991.$^*$ indicates the additional object.
\end{table}
\begin{table}
\begin{tabular}{ccccccccccc} \hline
   Name&RA(1950)&DEC(1950)&       B$_J$&z&L60(L$_{\odot}$&F12&  F25&F60&F100&   Ref\\ \hline
   02188-1059&  02 18 53.13&  -10 59 10.9&  20.29&    0.262&   11.65& -0.05&  -0.14&   0.41&  1.1 &1\\
   02206-0823&  02 20 41.85&  -08 23 52.6&  19.26&    0.217&   11.43& -0.1&   -0.11&   0.37 &  0.84&1\\
   02230-2139&  02 23 04.75&  -21 39 55.2&  18.64&    0.188&   11.68& -0.07&   -0.11&   0.88&  1.33&1\\
   02290-1403&  02 29 04.22&  -14 03 05.6&   19.41&    0.262& 11.60&  -0.08&  -0.06&   0.37&  0.28&1\\
   02326-0609&  02 32 38.62&  -06 09 21.3&  19.98&    0.234&   11.42& -0.07&   -0.08&   0.31 &  0.76&1\\
   02349-2003&  02 34 54.38&  -20 03 22.0&   19.24&    0.207& 11.56&  -0.05&  -0.07&   0.55 &  0.87&1\\
   02417-0043&  02 41 43.99&  -00 43 18.1&18.56&   0.202&    11.48&   -0.08& -0.11  &   0.48 &  0.79&1\\
   02417-0239&  02 41 42.97&  -02 39 14.5&   20.37&   0.217& 11.65&   -0.07&  -0.10 &   0.61 &  1.21&1\\
   02455-2220&  02 45 35.66&  -22 20 06.8&   19.68&   0.296& 12.06&   -0.07&  -0.07&   0.82 &  1.43&1\\
   02459-0234&  02 45 55.76&  -02 34 02.1& 18.29&  0.180&    11.52&   -0.08& -0.08  &   0.67 &  1.22&1\\
   02546-3026&  02 54 40.90&  -30 26 13.3& 19.85&    0.320&   11.80&  -0.07&  -0.06&   0.38 &  0.77&1\\
   02550-2712&  02 55 01.63&  -27 12 42.9& 20.45&    0.202&  11.40&   -0.07&   0.17 &   0.40 &  0.48&1\\
   02562-3002&  02 56 14.24&  -30 02 06.7&  19.48&    0.228&   11.43& -0.07&   -0.06&   0.33 &  0.57&1\\
   03000-2719&  03 00 02.12&  -27 19 12.1&  18.05&    0.221&   11.84& -0.07&   0.11 &  0.92&  1.98&1\\
   03014-2026&  03 01 28.83&  -20 26 19.9& 20.36&    0.320&  11.76&   -0.07&   -0.07&   0.35&  0.75&1\\
   03041-0419&  03 04 07.70&  -04 19 43.3&20.77&    0.334&    11.76&   -0.06& -0.15  &   0.32 &  0.67&1\\
   03049-1006&  03 04 58.46&  -10 06 57.9&  19.62&    0.211& 11.41&   -0.06&   -0.06&   0.37&  0.33&1\\
   03151-1753&  03 15 09.01&  -17 53 21.9&   19.63&    0.228& 11.58&  -0.07&   0.12 &   0.47 &  1.09&1\\
   03193-2224&  03 19 20.13&  -22 24 47.8&  19.37&    0.219&   11.56& -0.08&  -0.07&   0.49 &  1.11&1\\
   03330-3107&  03 33 01.08&  -31 07 49.1&20.13&    0.226&    11.43&   -0.07& -0.06 &   0.34 &  0.43&1\\
   03385-2159&  03 38 33.19&  -21 59 10.3&   18.27&    0.176& 11.52&  -0.09&  0.1   &  0.71  &  1.38&1\\
   03448-2628&  03 44 49.11&  -26 28 07.8& 19.64&    0.218&  11.54&   -0.05&   -0.04&   0.47&  0.58&1\\
  21455-3136& 21 45 35.42&  -31 36 25.3&  19.79&    0.210&   11.42& -0.08&  -0.15&   0.39&  0.74&1\\
  21488-2819& 21 48 50.63&  -28 19 13.5& 19.27&    0.235&   11.41&  -0.07&   -0.11&   0.30 &  0.31&1\\
  22076-2301& 22 07 24.34&  -23 01 22.4&   19.95&   0.291& 11.91&   -0.09&   -0.15&   0.61 &  0.93&1\\
  22088-1831& 22 08 49.80&  -18 31 56.0&  18.38&    0.171& 11.89&   -0.09&  -0.17&   1.73  &  1.8&7\\
  22122-2025& 22 12 17.09&  -20 25 14.0&   20.18&    0.325& 11.75&  -0.09&   -0.20&   0.33 &  0.96&1\\
  22176-1014& 22 17 41.38&  -10 14 06.4&19.1&    0.232&    11.66&   -0.08&  0.18 &   0.55 &  0.64&1\\
  22192-3211& 22 19 17.90&  -32 11 34.1&   19.58&   0.231& 11.87&   -0.08&   0.22 &   0.89 &  1.42&1\\
  22206-2715& 22 20 40.88&  -27 15 15.6&   17.50&    0.133& 11.67&  -0.07&   -0.12&   1.76 &  2.26&1\\
  22301-2822& 22 30 08.55&  -28 22 41.0&  18.96&    0.244&   11.46& -0.05&   -0.08 &   0.31 &  0.63&1\\
  22390-1348& 22 39 03.36&  -13 48 27.8&   19.45&  0.259&  11.84&   -0.08&   -0.18&   0.66 &  0.76&1\\
  22491-1808& 22 49 08.94&  -18 08 19.9&  16.97&    0.0761& 11.66&   -0.12&   0.54 &   5.54 &  4.41&8\\
  22509-0040& 22 50 58.97&  -00 40 41.3&  17.41&    0.0582& 11.40&   0.15&   0.78 &   5.14 &  5.57&5\\
  22546-2637& 22 54 41.51&  -26 37 16.6&  18.40&    0.164&   11.48& -0.09&   -0.13&   0.75 &  1.47&11\\
  23031-2622& 23 03 08.57&  -26 22 21.2&  20.53&   0.331&  11.75&   -0.07 &   0.11 &   0.32 &  1.04&1\\
  23126-0539& 23 12 37.01&  -05 39 45.1& 19.59&    0.260& 11.73&    -0.09&  -0.17&   0.50&  0.46&1\\
  23146-1117& 23 14 37.88&  -11 17 00.6& 17.70&    0.101&   11.44&  -0.09&   0.27 &   1.83&  2.88&3\\
  23184-0328& 23 18 29.86&  -03 28 32.4&  19.26&    0.244&   11.46& -0.09&   -0.17&   0.31&  -0.35&1\\
  23242-0357& 23 24 15.81&  -03 57 36.3&   19.56&  0.189& 11.40&    -0.09&   0.22 &   0.46&  0.72&1\\
  23257-1123& 23 25 46.91&  -11 23 35.1& 20.12&    0.233&  11.82&   -0.09 &   -0.17&   0.78 &  1.62&1\\
  23295-0521& 23 29 31.01&  -05 21 24.6& 19.51&    0.267&   11.62&  -0.06&   -0.13 &   0.37 &  0.76&1\\
  23411+0228& 23 41 06.13&   02 28 24.5&   17.77&   0.0940& 11.47&   -0.11&   0.48 &   2.28 &  2.69&7\\
  23451-1538& 23 45 11.70&  -15 38 03.0& 19.26&    0.241&   11.56&  -0.15&  -0.09&   0.40 &  0.58&1\\
  23515-2917& 23 51 31.59&  -29 17 42.4&  19.66&    0.336& 12.07&   -0.06&  -0.09 &   0.65 &  1.01&9\\
  23515-2421& 23 51 35.63&  -24 21 07.1& 17.98&    0.153&   11.46&  -0.16 &   0.21 &   0.83 &  1.37&11\\
  23529-2119& 23 52 58.85&  -21 19 41.5& 19.04&    0.430&   12.01&  -0.08&  -0.13 &  0.33  &  0.5&1\\
  23574-2355& 23 57 28.82&  -23 55 54.8& 18.36&    0.144&   11.59&  -0.13&  -0.18&   1.25 &  1.9&1\\
\end{tabular}
\end{table}
\end{document}




\documentstyle[11pt]{article}
\setlength {\topmargin}{-5mm}
\setlength {\textwidth}{160mm}
\setlength {\textheight}{230mm}
\setlength {\oddsidemargin}{10mm}
\setlength {\evensidemargin}{10mm}
\pagestyle{plain}
\begin{document}
\begin{table}
\begin{tabular}{rrrrrcc} \hline
  RA(1950)&DEC(1950)&       B$_J$&     F60&    F100&     z& Log(L60) (L$_{\odot}$) \\ \hline
   00 03 18.13&  -03 50 10.2&   19.23&    0.37&   -0.61&    0.075&   10.49\\
   00 03 41.08&  -11 58 08.3&   19.04&    0.51&    0.65&    0.091&   10.80\\
   00 07 59.55&  -12 02 35.6&   18.07&    0.80&    1.42&    0.064&   10.68\\
   00 09 05.17&  -00 54 51.3&   19.55&    0.42&   -0.82&    0.194&   11.38\\
   00 09 53.14&  -01 04 58.8&   18.31&    1.05&   -0.91&    0.073&   10.92\\
   00 11 31.16&  -12 29 49.5&   18.98&    0.32&    0.59&    0.203&   11.31\\
   00 13 37.34&  -11 46 48.9&   18.01&    0.68&    1.11&    0.115&   11.12\\
   00 19 09.95&   00 01 05.7&   18.96&    0.34&   -0.42&    0.143&   11.02\\
   00 20 09.41&  -29 27 22.0&   17.71&    0.95&    1.39&    0.124&   11.34\\
   00 21 11.39&  -01 17 05.8&   18.65&    0.85&    1.38&    0.067&   10.74\\
   00 26 58.64$^*$&  -25 52 17.9&   18.01&    0.60&    1.22&    0.080&   10.70\\
   00 28 38.30&  -04 32 48.6&   19.55&    0.45&    1.02&    0.096&   10.79\\
   00 30 31.34&  -00 25 02.8&   19.96&    0.33&   -0.45&    0.215&   11.37\\
   00 31 28.55&  -23 19 14.2&   21.08&    0.38&   -0.75&    0.081&   10.56\\
   00 34 20.07&  -05 30 23.4&   18.58&    0.44&   -0.63&    0.083&   10.65\\
   00 35 28.42$^*$&  -13 01 50.3&   17.96&    0.71&    1.44&    0.127&   11.20\\
   00 37 17.56$^*$&  -00 15 03.5&   18.03&    0.76&    1.60&    0.072&   10.80\\
   00 40 22.23&  -23 09 38.9&   19.61&    0.33&    0.73&    0.220&   11.39\\
   00 42 47.78&  -18 39 33.5&   17.76&    0.83&    1.02&    0.059&   10.62\\
   00 46 05.66&  -06 39 40.0&   19.09&    0.41&    1.00&    0.058&   10.30\\
   00 47 14.19&  -16 33 30.0&   19.17&    0.51&    0.81&    0.161&   11.30\\
   00 47 19.08&  -06 43 51.9&   18.34&    0.41&   -0.71&    0.073&   10.50\\
   00 47 55.72&  -06 20 04.9&   17.97&    0.91&    1.46&    0.102&   11.14\\
   00 49 44.29&  -03 09 18.9&   19.24&    0.39&    0.53&    0.174&   11.25\\
   00 52 06.04&  -08 50 24.0&   18.13&    0.86&   -0.71&    0.097&   11.08\\
   00 53 15.38&  -29 16 57.5&   19.54&    0.32&   -0.43&    0.162&   11.10\\
   00 54 28.78&  -05 25 28.8&   18.44&    0.54&   -1.37&    0.035&    9.98\\
   00 56 38.86&  -18 57 04.3&   18.12&    0.60&   -0.92&    0.118&   11.09\\
   00 58 17.42&  -02 58 26.0&   17.40&    1.21&    1.00&    0.085&   11.11\\
   00 59 42.98&  -03 20 12.7&   19.35&    0.36&   -0.55&    0.186&   11.28\\
   01 02 36.21&  -05 48 22.3&   18.47&    0.50&   -1.00&    0.128&   11.09\\
   01 02 56.56&  -09 19 59.5&   18.35&    0.39&   -1.25&    0.076&   10.52\\
   01 04 31.09&  -03 38 45.6&   18.41&    0.42&   -0.61&    0.055&   10.26\\
   01 07 38.20&  -08 13 03.6&   18.43&    0.31&   -0.49&    0.114&   10.78\\
   01 08 45.79&  -04 19 50.8&   18.46&    1.10&    0.75&    0.115&   11.34\\
   01 09 22.45&  -10 01 54.5&   20.94&    0.93&    1.40&    0.131&   11.38\\
   01 13 41.80&  -16 43 50.3&   19.06&    0.45&    0.53&    0.106&   10.87\\
   01 16 57.14&  -00 14 59.0&   18.95&    0.46&   -0.72&    0.064&   10.45\\
   01 18 36.33&  -18 45 52.3&   19.19&    0.33&   -0.55&    0.099&   10.68\\
   01 23 11.52&  -07 18 03.7&   18.20&    0.64&    1.00&    0.091&   10.89\\
   01 23 48.54&   01 40 12.3&   19.25&    0.31&   -0.51&    0.174&   11.15\\
   01 24 34.94&  -02 59 46.1&   18.78&    0.80&    0.94&    0.132&   11.32\\
   01 25 16.58&  -30 54 59.3&   18.76&    0.55&    0.70&    0.077&   10.68\\
   01 27 09.89&  -14 57 27.9&   19.40&    0.54&    0.79&    0.117&   11.04\\
   01 28 04.46&  -05 08 23.5&   19.35&    0.38&   -0.53&    0.155&   11.14\\
\end{tabular}

Table A1: Basic information for non-ultaluminous objects discovered in
this survey.

Notes: Fluxes are in Jy, a negative value indicates an upper limit.
$^*$ indicates an additional object.
\end{table}
\begin{table}
\begin{tabular}{cccccccc} \hline
  RA(1950)&DEC(1950)&       B$_J$&     F60&    F100&     z& Log(L60) (L$_{\odot}$) \\ \hline
   01 31 27.17&  -03 44 42.4&   20.32&    0.32&    0.59&    0.159&   11.09\\
   01 32 55.41&  -25 38 33.6&   19.11&    0.35&    0.65&    0.165&   11.16\\
   01 33 05.95&  -08 48 05.9&   19.56&    0.36&   -0.43&    0.117&   10.86\\
   01 36 04.90&   00 16 35.3&   19.94&    0.46&    0.77&    0.147&   11.17\\
   01 36 14.66&  -00 17 34.3&   19.38&    0.46&   -0.50&    0.075&   10.58\\
   01 38 09.61&  -09 31 10.0&   18.81&    0.69&    1.10&    0.120&   11.17\\
   01 38 27.72&  -26 34 18.7&   18.74&    0.56&    0.91&    0.140&   11.22\\
   01 40 07.25&  -05 06 46.6&   16.30&    4.12&    5.31&    0.036&   10.88\\
   01 40 32.00&  -16 21 10.4&   18.79&    0.56&   -0.74&    0.100&   10.92\\
   01 47 49.58&  -22 30 57.2&   18.96&    0.56&    0.98&    0.130&   11.15\\
   01 48 57.97&  -07 42 56.9&   18.92&    0.54&    0.85&    0.097&   10.88\\
   01 50 28.03&  -12 57 27.1&   17.95&    0.73&    1.07&    0.085&   10.89\\
   01 56 06.73&   00 04 50.0&   20.07&    0.31&   -0.66&    0.173&   11.15\\
   01 58 43.88&  -02 52 07.0&   19.07&    0.34&    0.49&    0.176&   11.20\\
   01 59 21.84&  -15 41 59.3&   19.81&    0.49&    0.59&    0.174&   11.35\\
   02 01 39.21&  -01 08 08.2&   19.35&    0.46&    0.83&    0.108&   10.90\\
   02 01 54.39&  -09 52 18.4&   18.69&    0.34&   -0.53&    0.192&   11.28\\
   02 02 23.30&  -02 23 10.7&   19.54&    0.41&    0.62&    0.177&   11.29\\
   02 20 23.33&  -00 34 26.9&   20.23&    0.33&   -0.56&    0.068&   10.34\\
   02 06 45.28&  -05 01 27.6&   19.83&    0.54&    0.93&    0.165&   11.35\\
   02 16 02.18&  -06 50 01.5&   16.55&    3.83&    4.83&    0.043&   11.02\\
   02 18 03.88&  -04 24 41.3&   18.83&    0.69&    1.34&    0.074&   10.74\\
   02 23 40.91&  -01 19 47.7&   19.40&    0.31&    0.63&    0.179&   11.18\\
   02 26 25.95&  -17 13 26.9&   19.16&    0.32&   -0.30&    0.184&   11.22\\
   02 26 54.02&  -04 03 58.7&   20.02&    0.35&    0.65&    0.178&   11.23\\
   02 38 32.72&   01 29 11.1&   18.83&    0.45&    0.61&    0.067&   10.47\\
   02 39 30.08$^*$&  -00 31 33.1&   19.01&    0.31&    0.64&    0.219&   11.36\\
   02 40 01.59&  -19 21 46.7&   18.61&    0.40&   -1.18&    0.155&   11.16\\
   02 42 12.94&  -19 44 52.3&   18.40&    0.69&    1.14&    0.129&   11.23\\
   02 45 51.26&  -03 31 44.9&   18.95&    0.51&    0.75&    0.139&   11.17\\
   02 47 06.30&  -05 22 22.4&   19.14&    0.49&    0.59&    0.080&   10.66\\
   02 47 41.48&  -17 58 07.9&   17.98&    0.70&    0.64&    0.068&   10.67\\
   02 48 43.23&  -28 21 25.0&   18.61&    0.52&   -0.89&    0.146&   11.22\\
   02 51 03.82&  -01 17 36.3&   19.82&    0.38&    0.92&    0.136&   11.02\\
   02 55 14.10&  -10 02 01.9&   19.05&    1.11&    1.18&    0.119&   11.37\\
   02 55 39.28&  -09 15 24.7&   19.91&    0.36&   -0.50&    0.124&   10.92\\
   02 56 13.01&  -09 42 31.1&   18.57&    0.32&   -0.48&    0.143&   10.99\\
   03 00 37.68&  -02 57 48.4&   18.48&    0.36&   -0.79&    0.112&   10.83\\
   03 02 28.48&  -07 40 41.6&   19.96&    0.32&   -0.43&    0.171&   11.15\\
   03 03 10.79&  -09 43 02.1&   18.59&    0.51&   -0.87&    0.112&   10.98\\
   03 04 07.44&  -23 33 44.1&   19.50&    0.38&   -0.35&    0.191&   11.33\\
   03 05 11.83&  -11 10 05.9&   19.16&    0.45&    0.61&    0.076&   10.58\\
   03 07 31.3&   -09 53 41.7&   18.60&    0.43&    0.64&    0.168&   11.26\\
   03 07 40.57&  -14 41 00.5&   18.93&    0.35&    0.65&    0.174&   11.21\\
\end{tabular}
\end{table}
\begin{table}
\begin{tabular}{cccccccc} \hline
  RA(1950)&DEC(1950)&       B$_J$&     F60&    F100&     z& Log(L60) (L$_{\odot}$) \\ \hline
   03 07 49.81&  -06 37 24.9&   17.81&    1.01&    1.24&    0.068&   10.83\\
   03 08 00.38&  -05 20 31.8&   18.41&    0.38&   -0.62&    0.123&   10.93\\
   03 20 57.19&  -16 14 40.7&   19.28&    0.31&    0.69&    0.216&   11.35\\
   03 22 16.5&   -31 53 40.5&   19.78&    0.96&    1.54&    0.116&   11.28\\
   03 30 17.78&  -31 12 54.3&   18.24&    0.49&    0.56&    0.127&   11.07\\
  21 46 54.20&  -30 06 37.0&   19.03&    0.34&   -0.47&    0.124&   10.89\\
  21 50 58.33&  -27 24 45.6&   19.67&    0.36&    0.52&    0.176&   11.23\\
  21 56 10.53&  -24 27 59.4&   18.59&    0.32&   -0.58&    0.124&   10.86\\
  22 01 38.47&  -24 05 08.5&   18.20&    0.72&    1.26&    0.127&   11.24\\
  22 09 06.65&  -19 48 20.0&   18.04&    0.62&    0.81&    0.052&   10.38\\
  22 11 55.44&  -26 09 50.5&   17.78&    0.57&    0.61&    0.092&   10.85\\
  22 16 33.94&  -10 17 16.8&   19.53&    0.31&    0.52&    0.209&   11.32\\
  22 18 38.84&  -16 27 24.3&   19.59&    0.61&    0.86&    0.114&   11.07\\
  22 19 11.88$^*$&  -14 00 08.8&   18.00&    0.64&    1.07&    0.078&   10.80\\
  22 19 26.92&  -31 27 58.4&   19.28&    0.43&    0.91&    0.119&   10.96\\
  22 24 49.45&  -31 30 38.7&   18.70&    0.33&    0.41&    0.058&   10.21\\
  22 26 52.19&  -10 04 17.9&   21.16&    0.40&   -0.48&    0.079&   10.56\\
  22 27 54.80&  -13 04 51.6&   18.70&    0.36&   -0.69&    0.114&   10.84\\
  22 27 57.16&  -11 12 48.3&   19.29&    0.77&    0.98&    0.089&   10.95\\
  22 30 33.53$^*$&  -30 32 59.8&   19.07&    0.32&    0.80&    0.115&   10.80\\
  22 32 09.17&  -15 36 37.8&   18.42&    0.59&    0.74&    0.075&   10.68\\
  22 35 29.70&  -07 30 75.2&   18.59&    0.38&    0.61&    0.100&   10.75\\
  22 39 16.02&  -16 20 43.9&   18.71&    0.77&    0.77&    0.118&   11.20\\
  22 40 45.73$^*$&  -10 06 21.5&   18.62&    0.41&    1.16&    0.114&   10.90\\
  22 41 21.11&  -31 10 42.8&   18.12&    0.35&   -0.45&    0.066&   10.35\\
  22 42 40.91$^*$&  -26 59 56.4&   18.63&    0.34&    0.78&    0.118&   10.80\\
  22 45 17.09&  -17 57 25.6&   19.06&    0.42&    0.55&    0.136&   11.07\\
  22 52 14.42&   00 01 44.6&   18.62&    0.43&    0.79&    0.079&   10.59\\
  22 54 24.53&  -23 10 24.0&   18.95&    0.35&    0.62&    0.130&   10.95\\
  23 01 19.52&   00 41 21.0&   18.41&    0.56&   -0.71&    0.054&   10.37\\
  23 03 30.87&  -03 41 13.8&   18.21&    0.51&    0.66&    0.095&   10.83\\
  23 05 19.34&  -09 17 08.9&   18.56&    0.38&   -0.43&    0.061&   10.31\\
  23 06 31.80&  -29 23 15.5&   19.01&    0.40&    0.55&    0.193&   11.36\\
  23 09 49.70&  -30 08 39.0&   18.62&    0.47&    0.92&    0.116&   10.97\\
  23 10 27.38&  -28 03 18.5&   18.41&    0.57&   -0.70&    0.119&   11.08\\
  23 11 33.45&   02 24 05.8&   19.21&    0.33&   -0.50&    0.204&   11.32\\
  23 14 45.15&  -04 54 07.4&   18.70&    0.38&   -0.48&    0.175&   11.25\\
  23 15 20.68&   00 55 07.6&   19.25&    0.36&   -0.49&    0.074&   10.46\\
  23 18 48.48&   00 54 13.2&   19.18&    0.41&    0.77&    0.138&   11.07\\
  23 21 03.23&   00 57 48.3&   18.24&    0.74&    1.12&    0.028&    9.92\\
  23 22 43.98&  -17 50 36.0&   18.62&    0.41&    0.75&    0.176&   11.29\\
  23 24 38.94&  -09 49 16.6&   18.63&    0.58&    0.65&    0.085&   10.79\\
  23 24 50.73&  -15 53 22.9&   18.77&    0.59&    0.79&    0.132&   11.19\\
  23 27 27.80&  -17 15 03.3&   18.33&    0.33&   -0.42&    0.082&   10.51\\
  23 29 07.32&  -07 36 14.1&   18.20&    0.73&    1.19&    0.120&   11.19\\
  23 31 17.10&  -18 39 08.1&   17.96&    0.64&   -0.47&    0.054&   10.43\\
\end{tabular}
\end{table}
\begin{table}
\begin{tabular}{cccccccc} \hline
  RA(1950)&DEC(1950)&       B$_J$&     F60&    F100&     z& Log(L60) (L$_{\odot}$) \\ \hline
  23 31 37.67&   01 24 36.5&   20.05&    0.47&    0.84&    0.135&   11.11\\
  23 32 28.05&   00 40 29.9&   18.44&    0.62&    0.94&    0.083&   10.80\\
  23 33 48.95&  -00 43 27.6&   19.02&    0.55&    0.69&    0.077&   10.68\\
  23 37 14.26&  -25 35 06.0&   19.28&    0.46&    0.59&    0.181&   11.36\\
  23 39 32.43&  -03 45 07.2&   18.02&    0.93&    1.38&    0.120&   11.30\\
  23 40 37.44&  -00 11 14.6&   18.18&    0.42&   -0.50&    0.098&   10.78\\
  23 47 28.63&  -15 56 38.7&   17.92&    0.53&    0.57&    0.077&   10.66\\
  23 49 41.16&  -04 48 52.4&   19.99&    0.40&   -0.50&    0.157&   11.17\\
  23 49 47.89&  -11 21 05.0&   18.62&    0.37&   -0.51&    0.125&   10.93\\
  23 50 55.73&  -22 31 27.5&   20.34&    0.43&    0.50&    0.108&   10.87\\
  23 53 44.6&   -26 16 03.4&   19.78&    0.33&    0.79&    0.186&   11.24\\
  23 54 18.45&   00 04 22.7&   18.06&    0.40&   -0.49&    0.074&   10.51\\
  23 56 34.52&  -17 56 50.6&   19.26&    0.43&   -0.68&    0.145&   11.13\\
  23 56 40.20&  -08 33 26.3&   17.23&    2.20&    3.39&    0.050&   10.90\\
  23 57 28.55&  -04 44 47.4&   17.45&    0.75&    0.87&    0.102&   11.06\\
  23 57 32.07&  -08 52 51.6&   18.65&    0.39&   -0.68&    0.156&   11.16\\
  23 58 00.15&  -04 45 37.4&   19.00&    0.43&   -0.61&    0.075&   10.55\\
  23 58 20.9&   -27 27 36.5&   20.74&    0.47&    0.55&    0.103&   10.87\\
  23 58 39.67&  -01 16 15.2&   18.99&    0.59&    1.05&    0.081&   10.75\\
\end{tabular}
\end{table}
\end{document}
