The ROSAT Wide Field Camera 2RE Source Catalogue. Pye et al. (1995) MNRAS, in press. Accepted for publication in MNRAS. This preprint version dated 1995 January 31. E-mail (Internet) contact: pye@star.le.ac.uk

Table 2. The ROSAT Wide Field Camera 2RE Source Catalogue.

RA (J2000) Dec (J2000) R90 Count Rate (ct/ks) Significance Det. Var. Counterparts

(h m s) (d m s) (^{00}) S1 err S2 err S1 S2 S1+S2 Flag Flag EUV/ Name Alternative Type Mag. ΔR Cat. Notes X-ray (^{00}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20)

00 03 55.17 +43 35 41.2 46 46 7 17 7 9.8 3.3 10.3 ps 0 W WD 16.8 42 IDP+ 00 07 32.55 +33 17 55.8 26 208 15 58 9 28.8 9.9 30.5 ps 0 WE GD 2 WD 0004+330 DA1 13.9 27 MCK ID** 00 12 31.12 +14 34 14.0 44 29 6 22 7 6.7 3.8 7.7 ps: 0 X SAO 91772 K0 8.6 37 SIM 00 14 35.21 +69 13 35.1 63 8 0 36 10 0.0 5.5 5.5 p 0 AG+68 14 F8 10.3 114 SIM 00 18 20.75 +30 57 12.1 64 16 6 23 7 3.9 4.0 5.6 ps: 0 E BD+30 34 HD 1405 G5 8.6 21 STR ID** A 00 24 44.64 �74 12 53.8 62 14 5 32 9 3.1 4.6 5.5 ps 0 W CPD�74 35 HD 2133 F7V 9.7 71 SIM 00 29 55.91 �63 24 33.8 23 660 36 1020 39 41.5 60.6 73.4 ps 0 WE DA 15.0 24 IDP+ 00 30 28.00 �48 12 31.9 59 38 0 41 11 0.0 5.4 5.4 p:s 0 E HR 120 HD 2726 F2V 5.7 29 YAL 00 35 14.45 �03 35 33.3 44 16 5 30 7 4.6 6.1 7.6 ps 0 13 Cet A HD 3196 F7V+G4V 5.2 8 STR ID** RS 00 39 39.60 +10 39 25.0 57 20 6 7 0 5.6 0.0 5.6 ps: 0 W BD+09 73 Ross 311 K5 10.6 12 LHS IDP+ 00 41 17.12 +34 25 47.1 56 23 6 25 0 6.2 0.0 6.2 ps 0 W Ge 9.5 29 IDP+ 00 42 45.25 +35 33 08.8 44 28 6 25 7 7.0 4.6 8.4 ps 0 W FF And DM+34 106 M0Ve 10.4 28 CNS ID** BY 00 43 35.69 �17 59 07.5 35 37 10 70 11 5.1 9.6 10.9 ps 0 WEX β Cet HD 4128 K0III 2.0 5 CNS ID** 00 44 03.16 +09 34 06.9 46 16 5 13 5 4.7 3.7 6.0 ps 0 W BD+08 102 AG+09 55 DA+G 10.0 71 SIM IDP+ 00 47 04.61 �11 52 15.2 37 71 8 28 8 14.1 4.5 14.8 ps 0 WEX NGC 246 PHL 0829 CSPN sdO6 11.6 35 SIM ID** 00 47 19.69 +24 16 23.1 33 30 6 41 7 7.6 8.7 11.5 ps 0 WX ζ And HD 4502 K1IIe 4.1 22 YAL ID** RS 00 53 03.62 �74 38 51.7 39 28 6 30 8 7.7 4.7 9.0 ps 0 WEX CF Tuc HD 5303 G0V+K4IV 7.5 27 STR ID** RS 00 53 18.30 �32 59 52.7 22 722 28 2193 45 50.5 110.6 121.6 ps 0 WE GD 659 WD 0050�332 DA1 13.4 5 MCK ID** 00 53 38.99 +36 01 44.5 46 24 5 16 6 7.0 3.2 7.7 ps 0 W DA 15.1 28 IDP+ 00 54 56.11 �14 26 03.8 53 14 0 34 7 0.0 6.7 6.7 ps: 0 GD 662 WD 16.0 64 MLN ID** 01 03 49.44 �72 54 46.0 58 5 0 28 6 0.0 6.0 6.0 ps: 0 01 06 49.36 �22 51 30.5 29 78 8 39 8 17.4 6.9 18.7 ps 1 WE SAO 166806 HD 6628 G5V 7.7 12 SIM IDP+ 01 08 20.53 �35 34 36.5 30 45 9 133 13 6.4 16.4 17.6 ps 0 WE GD 683 WD 0106�358 DA2 13.5 4 MCK ID** 01 16 35.25 �02 29 39.8 30 47 7 46 8 12.5 9.3 15.6 ps 0 WEX AY Cet HD 7672 G5III+WD 5.5 24 STR ID** A 01 22 48.91 +00 43 53.7 36 20 5 28 6 6.4 6.1 8.8 ps 0 WEX BD�0 210 HD 8358 G5V:+G5V: 8.6 67 STR ID** RS 01 22 55.84 +07 25 30.5 27 83 9 92 12 18.1 13.3 22.5 ps 1 WX AR Psc HD 8357 G8IV 7.3 26 CNS ID** RS 01 34 24.04 �16 06 51.6 22 270 14 693 24 45.0 69.4 82.7 ps 0 WE GD 984 WD 0131�164 DA 13.8 31 MLN ID** 01 35 01.56 �29 54 30.6 26 44 5 55 7 14.6 12.2 19.0 ps 0 WE GJ 60A HD 9770 K3V 7.1 15 CNS IDP+ A 01 37 39.20 +18 36 03.1 57 21 5 16 0 6.2 0.0 6.2 ps 0 BD+17 232 dK2e 9.9 27 SIM IDP+ 01 38 53.49 +25 23 17.7 29 60 9 60 9 11.8 10.0 15.5 ps 0 WE PG 0136+251 WD 0136+251 DA1p 15.8 24 MCK ID** 01 38 59.77 +67 54 05.4 57 5 2 12 3 3.3 4.4 5.5 p 0 01 38 59.97 �17 56 48.0 38 25 5 18 5 8.8 4.7 9.9 ps 0 WEX UV Cet Gl 65 M4Ve 13.0 23 CNS ID** 01 40 58.36 �67 53 03.2 23 257 19 211 17 27.2 22.5 35.3 ps 2 WX BL Hyi H 0139�68 CV AM Her 14.0 26 CVR ID** 01 48 07.49 �25 32 10.2 40 15 5 25 6 4.4 7.2 8.4 ps 0 WE GD 1401 Ton S 231 DA 14.4 6 SIM ID** 01 51 08.42 +67 39 34.3 28 23 4 46 5 11.1 14.7 18.4 ps 0 WE GD 421 WD 0147+674 DA2 14.4 12 MCK ID** 01 53 48.98 +60 36 09.7 48 6 2 14 4 3.3 4.6 5.7 p 0 GSC4032.01402 10.7 14 GSC 01 55 55.53 �51 36 39.2 57 26 10 32 9 3.3 4.6 5.7 ps: 0 EX Gl 81 HR 566 G8III 3.7 15 CNS 02 05 10.71 +77 16 50.1 30 47 10 63 9 5.8 8.2 10.1 p 0 WE HR 581 HD 12230 F0Vn 5.3 18 YAL IDP+ 02 14 20.23 +51 34 53.9 63 4 0 25 6 0.0 5.6 5.6 ps: 0 GSC3293.00848 14.4 78 GSC 02 18 46.63 +14 36 42.8 49 20 0 48 12 0.0 5.9 5.9 ps 0 EX WD 0216+143 PG 0216+14 DA2 14.5 39 MCK ID**

Table 2. – continued RA (J2000) Dec (J2000) R90 Count Rate (ct/ks) Significance Det. Var. Counterparts

(h m s) (d m s) (^{00}) S1 err S2 err S1 S2 S1+S2 Flag Flag EUV/ Name Alternative Type Mag. ΔR Cat. Notes X-ray (^{00}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20)

02 22 32.92 +50 34 14.3 36 14 3 17 5 6.6 4.8 8.2 ps 0 BD+49 646 AG+50 267 star 9.4 33 SIM 02 28 19.31 �61 18 13.7 22 675 35 1104 36 34.8 61.8 71.0 ps 0 WEX SAO 248569 HD 15638 DA+F3V 8.8 7 SIM ID** 02 30 52.09 �47 55 07.3 26 28 4 137 9 10.2 26.9 28.8 ps 0 WE LB 1628 JL 295 DA1 14.5 45 MLN ID** 02 32 47.15 �02 55 31.0 49 15 0 45 11 0.0 5.6 5.6 ps: 0 GSC4701.00192 14.8 17 GSC 02 34 22.85 �43 47 18.1 28 57 7 50 8 14.3 9.6 17.3 ps 0 WEX CC Eri HD 16157 M0Ve 8.7 25 CNS ID** BY 02 35 06.75 +03 44 19.3 31 20 0 1006 38 0.0 51.3 51.3 ps 0 WE Feige 24 WD 0232+035 DAWe 12.3 69 MCK ID** 02 37 25.34 �12 20 38.0 28 78 13 155 15 9.7 17.0 19.5 ps 0 WE PHL 1400 blue star 15.3 85 MLN 02 38 43.55 �52 57 08.0 42 18 5 12 4 5.4 3.7 6.5 ps 0 X HD 16699B K 7.5 9 SIM IDP+ 02 38 57.56 �58 11 22.0 34 26 9 20 9 4.4 3.4 5.6 s 0 E GJ 1049 M0 V 9.6 27 CNS 02 39 49.12 +50 04 00.7 31 27 4 41 6 11.0 11.1 15.6 ps 0 WE WD 16.0 17 IDP+ 02 41 45.25 �52 59 38.0 44 25 5 14 4 7.0 4.1 8.2 ps 0 E dMe+dMe 10.7 19 IDP+ 02 43 25.46 �37 55 09.5 34 27 5 44 7 7.6 9.0 11.8 ps 0 WEX CD�38 899 HD 17084 G6V 8.0 31 STR ID** A 02 48 42.90 +31 06 54.0 27 119 11 132 16 23.8 14.8 28.1 ps 2 WEX VY Ari HD 17433 G9V 6.9 14 CNS ID** RS 02 54 38.03 �05 19 21.5 30 65 13 127 21 6.6 8.7 10.9 ps 0 WE BD�05 541 HD 18131 K0 7.2 32 SIM IDP+ 02 55 43.00 +47 46 30.7 41 10 3 15 4 5.4 5.2 7.5 ps 0 K+K 10.3 20 IDP+ 03 08 09.62 +40 57 36.1 23 144 9 212 11 34.3 38.8 51.8 ps 1 WEX Algol HD 19356 K2IV+B8V 2.1 15 YAL ID** 03 12 01.81 �28 58 43.0 48 36 11 48 13 4.3 5.0 6.6 ps: 0 EX Gl 127 G7 V 6.7 49 CNS 03 12 22.38 �44 24 48.4 42 25 6 27 6 6.2 6.0 8.6 ps 0 W CD�44 1025 H 20121 F7III 5.9 41 YAL IDP+ 03 14 12.37 �22 34 45.8 25 195 20 266 28 15.6 14.5 21.3 ps 2 WEX EF Eri 3A 0311�227 CV AM Her 13.0 55 CVR ID** 03 17 01.57 �85 32 41.2 30 45 11 168 16 4.8 14.3 15.1 ps 0 WE LB 09802 DAp 13.9 44 MLN ID** 03 19 16.68 +03 22 56.8 41 41 9 47 18 9.0 4.5 10.1 ps 0 WX κ Cet HD 20630 G5Ve 4.8 83 CNS ID** 03 20 12.90 �76 49 10.9 55 13 5 38 11 3.2 4.6 5.6 p 0 GSC9363.00867 14.7 107 GSC 03 22 12.49 �53 44 24.7 180 77 7 213 12 19.4 32.9 38.2 ps 0 WEX LB 1663 DA 14.8 55 SIM ID** 03 24 05.01 +23 47 05.6 36 16 4 20 5 7.4 6.1 9.6 ps 0 W AC+23 368�59 Gl 140A M0V 10.3 10 CNS IDP+ A 03 26 35.20 +28 43 06.8 24 93 8 120 9 24.2 24.7 34.6 ps 0 WEX UX Ari HD 21242 G5IV+K0IV 6.5 13 STR ID** RS 03 27 08.01 +09 43 38.7 64 18 4 22 5 6.7 6.1 9.0 ps 0 WEX ξ Tau HD 21364 B9Vn 3.7 38 YAL 03 28 12.65 +04 09 36.6 36 18 4 11 4 7.6 3.3 8.3 ps 0 SAO 111210 K0 8.8 35 SIM 03 32 53.45 �09 26 46.2 35 84 13 83 25 13.2 5.2 14.2 ps 1 WEX ϵ Eri HD 22049 K2V 3.7 60 CNS ID** 03 33 14.33 +46 15 49.8 32 27 5 22 5 9.0 7.6 11.7 ps 0 WE BD+45 784 HD 21845 G5+dMe 8.5 22 SIM IDP+ 03 35 31.17 +31 13 49.9 56 8 3 13 4 3.9 4.2 5.7 ps: 0 HD 22179 G0 9.1 22 SIM IDP+ A 03 36 47.01 +00 35 35.9 22 286 14 349 15 49.2 48.9 69.4 ps 2 WEX V711 Tau HR 1099 G5IV+K1IV 5.7 20 YAL ID** RS 03 37 11.03 +25 59 26.8 25 90 8 110 9 23.1 22.8 32.5 ps 1 WE BD+25 580 HD 22403 G2V+KV 8.1 18 STR IDP+ RS 03 48 50.05 �00 58 21.8 22 256 14 509 20 44.7 56.8 72.3 ps 0 WX GD 50 WD 0346�011 DA2 14.0 5 MCK ID** 03 50 24.47 +17 15 00.1 22 309 16 1163 30 47.4 100.5 111.1 ps 2 WEX V471 Tau BD+16 516 DA2+K2V 9.7 11 CVR ID** 03 57 05.38 +28 39 12.8 36 46 9 55 10 9.8 9.1 13.4 ps 0 WE late�type 13.0 119 IDP+ 03 57 30.54 �01 09 15.0 37 18 4 13 5 7.0 4.1 8.2 ps 0 WX GJ 157A/B HD 24916 K5V+M3Ve 8.0 28 CNS 04 02 37.18 �00 16 05.1 33 34 6 41 7 9.8 9.0 13.3 ps 0 W HR 1249 HD 25457 F5V 5.4 6 CNS IDP+ 04 07 31.96 +38 04 23.2 39 34 6 19 6 9.3 4.1 10.2 ps 0 W GJ 160.1AB HD 25893 K2+dK2e 7.3 24 SIM IDP+ A 04 09 05.21 �71 17 21.9 43 17 4 25 6 5.2 6.0 7.9 ps 0 WEX VW Hyi CV dw.nova 8.5 35 CVR ID** 04 09 40.37 �07 53 36.8 26 79 8 111 10 18.5 19.0 26.5 ps 0 WEX EI Eri HD 26337 G5IV 7.0 11 CNS ID** RS

Table 2. – continued RA (J2000) Dec (J2000) R90 Count Rate (ct/ks) Significance Det. Var. Counterparts

(h m s) (d m s) (^{00}) S1 err S2 err S1 S2 S1+S2 Flag Flag EUV/ Name Alternative Type Mag. ΔR Cat. Notes X-ray (^{00} ) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20)

04 10 55.02 +59 25 00.7 47 16 5 23 5 4.3 5.8 7.2 ps 0 DA 14.4 28 IDP+ 04 15 21.42 �07 38 55.0 42 23 5 19 6 7.2 4.3 8.3 ps 0 WEX 40 Eri C BD�07 781C M5Ve 11.1 35 CNS ID** 04 15 38.39 �40 22 44.6 39 51 9 29 10 9.8 4.3 10.7 ps 0 W WD 15.7 18 IDP+ 04 18 11.04 +23 16 25.9 68 17 6 23 0 4.9 0.0 4.9 p:s 0 X HD 284303 BD+22 669 K0V 9.5 36 SIM 04 19 45.14 +15 36 37.7 69 29 8 23 0 6.6 0.0 6.6 ps 0 WX HR 1346 γ Tau K0III 3.7 71 YAL ID** 04 25 37.51 �57 13 48.1 50 21 5 4 0 6.6 0.0 6.6 ps 0 W LB 01727 AGN Seyf.1 15.1 61 SIM ID** 04 26 23.93 +15 36 32.3 92 18 6 19 0 5.2 0.0 5.2 p:s 0 X V777 Tau 71 Tau A8Vn/F0V 4.5 55 GCV ID** 04 27 34.38 +74 07 09.0 26 90 8 42 6 20.2 9.9 22.5 ps 0 WE DA 14.8 21 IDP+ 04 28 38.23 +16 58 12.7 73 15 5 27 0 4.9 0.0 4.9 p:s 0 WD 0425+168 DA2 14.2 59 MCK ID** 04 36 48.38 +27 07 54.9 26 50 6 80 10 15.5 12.1 19.7 ps 0 WEX V833 Tau HD 283750 dK5e 8.4 9 CNS ID** BY 04 37 36.73 �02 28 40.8 53 18 5 26 8 6.3 4.0 7.4 ps 0 HR 1474 HD 29391 F0V 5.2 19 YAL 04 41 19.37 +20 53 53.4 28 46 6 65 9 14.4 10.0 17.5 ps 0 WE DM+20 802 HD 29697 K3Ve 8.0 17 CNS ID* 04 43 06.69 �03 47 14.9 33 116 10 25 0 24.4 0.0 24.4 ps 0 WE DA 16.0 25 IDP+ 04 46 07.66 +76 36 22.5 47 16 5 13 4 4.6 3.9 6.1 ps: 0 HR 1468 HD 29329 F7V 6.5 31 YAL 04 47 21.91 �27 50 15.3 45 11 4 32 7 3.8 5.8 7.0 ps 0 W dMe 13.0 21 IDP+ 04 49 51.11 +06 57 36.0 34 37 5 57 10 11.8 7.4 14.0 ps 0 WX π3 Ori HD 30652 F6V 3.2 21 CNS 04 53 25.46 �42 13 47.9 42 53 9 18 7 10.0 3.3 10.5 ps 0 WE CV AM Her 19.0 ID** 04 53 29.79 �55 51 21.1 45 41 8 30 0 8.3 0.0 8.3 ps 0 WX GJ 2036A/B BPM 17964/5 M2Ve+MVe 11.1 17 CNS IDP+ 04 57 12.50 �28 08 08.5 22 113 9 2289 34 25.7 167.1 169.0 ps 0 WE DA1 14.0 18 IDP+ 04 58 16.82 +00 27 25.2 36 28 5 63 10 10.1 8.3 13.1 ps 1 WE BD+00 908 HD 31738 G5IV 7.2 10 STR ID** A 04 59 15.23 +37 53 09.0 38 15 3 12 4 7.3 3.5 8.0 ps 0 W BD+37 1005A/B HD 31647A/B A1V+F9 5.0 16 YAL 04 59 50.86 �10 16 13.5 24 65 7 216 14 18.4 26.2 32.1 ps 0 WE HR 1608 HD 32008 DA+K0IV 5.4 26 YAL ID** 05 00 03.94 �36 24 01.8 37 20 5 47 8 5.9 9.1 10.9 ps 0 WE GSC7053.00682 13.7 17 GSC 05 00 46.44 �34 51 13.1 40 14 4 21 6 4.5 5.0 6.7 ps 0 E GSC7050.00934 15.2 111 GSC 05 01 59.70 +09 58 16.3 46 18 4 17 7 7.6 3.2 8.2 ps 0 W RBTS 285 LP 476�207 M3Ve 11.5 50 CNS IDP+ 05 03 55.24 �28 54 56.5 34 2 0 107 9 0.0 20.2 20.2 ps 0 WE DOZ 13.9 20 IDP+ 05 05 30.31 +52 49 41.9 24 47 6 3208 44 14.1 198.2 198.7 ps 0 WE G191 B2B WD 0501+527 DA1 11.8 49 MCK ID** 05 05 30.62 �57 28 12.8 34 33 6 40 8 8.3 7.3 11.1 ps 0 WEX ζ Dor HD 33262 F7V 4.7 9 CNS ID** A 05 06 50.03 �21 35 04.0 30 33 5 35 7 10.4 7.1 12.6 ps 0 WE BD�21 1074 M2e 10.1 8 CNS IDP+ 05 12 06.78 �00 42 33.2 23 135 10 479 21 32.2 43.0 53.7 ps 0 W DA 13.8 26 SIM IDP+ 05 12 16.73 �11 52 14.9 51 19 4 20 7 7.9 3.4 8.6 ps 0 WX BD�12 1095B HD 33802B G5Ve 10.8 18 YAL ID* 05 12 22.96 �41 45 35.2 24 147 9 231 12 29.9 35.9 46.7 ps 0 WE DA 16.5 7 IDP+ 05 14 27.16 �15 14 41.9 67 14 3 10 0 6.4 0.0 6.4 ps: 0 GSC5902.00227 15.3 10 GSC 05 15 23.36 +32 40 45.1 21 884 23 2753 42 109.7 167.7 200.4 ps 0 WE HD 33959C KW Aur C DA+F4V 8.0 36 GCV ID** 05 16 40.37 +45 59 55.8 30 395 16 475 18 60.5 56.8 82.6 ps 0 WEX Capella α Aur G5IIIe 0.1 7 CNS ID** RS 05 17 24.21 �35 22 21.9 37 17 4 24 5 6.5 5.9 8.8 ps 0 WE dMe 13.0 33 IDP+ 05 20 35.00 �39 45 14.7 56 10 3 15 0 4.4 0.0 4.4 p:s 0 HD 35114 F6V 7.3 34 SIM 05 21 18.87 �10 29 38.5 24 42 5 211 14 14.3 26.6 30.2 ps 0 WE DA 15.6 21 IDP+ 05 24 23.40 +17 22 42.7 35 19 4 36 7 8.2 7.6 11.1 ps 0 WX DM+17 920 HD 35296 F8Ve 5.0 28 CNS 05 27 04.70 �11 54 02.9 26 53 6 78 9 17.4 14.4 22.6 ps 0 WE HR 1817 HD 35850 F7V 6.4 14 YAL IDP+

Table 2. – continued RA (J2000) Dec (J2000) R90 Count Rate (ct/ks) Significance Det. Var. Counterparts

(h m s) (d m s) (^{00}) S1 err S2 err S1 S2 S1+S2 Flag Flag EUV/ Name Alternative Type Mag. ΔR Cat. Notes X-ray (^{00}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20)

05 28 42.54 �65 26 33.7 22 125 4 138 5 49.5 50.0 70.4 ps 1 WEX AB Dor HD 36705 dK0 6.8 18 SIM ID** A 05 30 18.50 �19 16 41.6 51 8 3 16 5 4.9 3.7 6.1 ps: 0 SAO 150508 G5 9.0 11 SIM 05 31 37.26 �46 24 00.4 44 20 4 7 0 8.0 0.0 8.0 ps 0 W CV AM Her 17.0 21 IDP+ 05 32 05.86 �03 05 09.9 46 15 4 15 5 6.9 3.8 7.9 ps 0 W HBC 97 dMe 12.3 29 SIM IDP+ 05 32 16.65 +09 49 21.6 39 23 4 17 5 9.2 4.2 10.1 ps 0 WX V998 Ori Ross 42 M4e 11.5 31 CNS ID** BY 05 33 45.14 +01 55 55.4 53 17 4 17 0 7.6 0.0 7.6 ps 0 WEX V371 Ori Gl 207.1 M3Ve 11.7 48 CNS ID* 05 34 10.27 �15 16 48.9 49 8 3 19 5 4.5 4.7 6.5 ps 0 HD 36869 F5 8.0 23 SIM 05 34 16.30 �02 15 09.1 56 13 3 34 7 6.4 7.0 9.5 ps 0 W DA 16.0 68 IDP+ 05 36 34.58 +11 18 36.7 46 10 3 20 6 4.7 4.3 6.3 ps 0 W Gl 208 dMe 8.8 84 CNS IDP+ 05 36 55.65 �47 58 02.0 28 28 4 40 5 11.1 11.5 16.0 ps 0 WE CPD�48 687A HD 37572 dKe 8.2 11 SIM IDP+ 05 37 03.22 �39 33 00.6 63 10 3 15 0 5.4 0.0 5.4 p:s 0 SAO 196024 K0 9.6 40 SIM IDP+ 05 39 22.50 �19 34 13.9 63 9 3 23 0 5.0 0.0 5.0 p:s 0 GSC5925.01547 11.0 45 GSC 05 40 22.09 �19 39 37.5 49 11 3 13 5 6.1 3.6 7.0 ps: 0 SAO 150676 F5 8.7 40 SIM IDP+ 05 40 35.11 �20 18 07.2 56 15 3 3 0 7.0 0.0 7.0 ps 0 W TW Lep HD 37847 F+G8III 7.0 70 STR ID** RS 05 41 19.93 +53 29 31.8 58 14 4 14 5 5.1 3.5 6.2 ps 0 W DM+53 934 HD 37394 K1V 6.2 35 CNS 05 44 25.67 �22 25 05.9 52 7 3 22 5 3.4 5.4 6.4 ps 0 Gl 216 K2 V 6.1 12 CNS 05 45 08.03 �59 55 30.3 46 13 3 10 3 6.1 4.7 7.7 ps 0 E SAO 234124 G5 9.2 40 SIM IDP+ 05 50 37.45 +00 05 47.1 25 92 7 86 9 27.0 15.7 31.3 ps 0 WEX GD 257 WD 0548+000 DA1 15.1 13 MCK ID** 05 50 48.41 �24 09 29.9 35 21 4 16 5 9.0 4.2 9.9 ps 0 WE DA 16.2 46 IDP+ 05 52 16.59 �57 08 14.4 39 6 2 9 3 3.7 4.5 5.8 ps 0 HR 2072 HD 39937 F+G5III 5.9 73 STR ID** A 05 52 26.76 +15 52 51.1 22 598 19 2216 36 87.8 149.9 173.7 ps 0 WE GD 71 WD 0549+158 DA1 13.1 30 MCK ID** 05 53 02.59 �81 56 36.8 64 23 7 25 7 3.7 4.4 8.0 ps 0 HD 42270 K0 9.1 58 SIM 05 54 23.57 +20 16 37.8 35 47 6 36 7 15.4 6.9 16.9 ps 0 WEX χ1 Ori HD 39587 G0V 4.4 11 CNS ID** A 05 56 24.05 �14 10 38.2 53 8 3 15 5 4.4 4.1 6.1 ps 0 X Gl 225 η Lep F1V 3.7 36 CNS 05 57 49.49 �38 02 56.2 52 7 2 14 4 3.9 4.2 5.8 ps 0 TY Col G4V? 9.5 81 SIM ID** A 05 58 12.44 �37 35 03.4 44 4 0 37 6 0.0 9.5 9.5 ps 0 WE DA 14.5 46 IDP+ 06 00 03.07 +02 42 37.3 47 9 3 28 7 4.2 5.2 6.7 ps 0 E G 106�17 G 99�49 M4 11.3 16 CNS IDP+ 06 02 40.39 �00 51 53.2 53 17 4 23 0 7.5 0.0 7.5 ps 0 W BD�00 1147 HD 291095 K0 8.6 15 SIM IDP+ 06 04 46.72 �48 27 04.5 29 34 4 34 6 14.1 8.3 16.4 ps 0 WEX HR 2162 HD 41824 G6V 6.6 27 YAL IDP+ 06 04 50.29 �34 33 45.7 38 9 2 31 6 4.9 7.3 8.8 ps 0 WE dMe 13.4 106 IDP+ 06 05 03.50 �48 20 14.8 28 26 3 48 7 11.2 10.1 15.1 ps 0 WE DA 15.9 17 IDP+ 06 12 38.79 �16 48 38.5 62 15 3 29 0 6.9 0.0 6.9 ps 0 WE BD�16 1396 SAO 151224 K0 9.1 2 SIM IDP+ 06 13 10.00 �27 41 22.5 57 7 2 25 8 4.2 3.9 5.7 ps: 0 GSC6513.00291 13.3 61 GSC 06 13 44.29 �23 51 40.4 38 18 3 35 9 8.9 5.0 10.2 ps 0 W HR 2225 HD 43162 G5 6.4 16 CNS IDP+ 06 16 54.56 �64 57 24.3 44 12 0 12 2 0.0 7.9 7.9 ps 0 WE GSC8901.00179 15.5 75 GSC 06 18 29.10 �72 02 39.3 29 21 4 31 4 7.0 10.1 12.3 ps 0 WE CPD�71 427 HD 45081 K3V 9.7 6 SIM IDP+ 06 19 09.90 �03 25 41.3 62 10 3 26 10 4.5 3.1 5.4 p:s 0 W BD�03 1386 HD 43989 GO 8.5 48 SIM IDP+ 06 20 49.83 +13 24 24.9 48 14 3 33 0 7.5 0.0 7.5 ps 0 W WD 14.5 34 IDP+ 06 22 35.21 �60 13 14.4 41 7 2 10 3 4.1 4.4 6.0 ps: 0 HD 45270 CPD�60 604 G1V 6.6 26 SIM 06 22 40.24 �17 57 11.4 50 15 3 22 0 7.1 0.0 7.1 ps 0 WEX β CMa HD 44743 B1II 2.0 27 YAL ID**

Table 2. – continued RA (J2000) Dec (J2000) R90 Count Rate (ct/ks) Significance Det. Var. Counterparts

(h m s) (d m s) (^{00}) S1 err S2 err S1 S2 S1+S2 Flag Flag EUV/ Name Alternative Type Mag. ΔR Cat. Notes X-ray (^{00}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20)

06 23 12.34 �37 41 26.6 31 5 0 452 16 0.0 49.9 49.9 ps 0 WE DA 12.0 2 IDP+ 06 25 56.48 �60 03 09.0 46 10 2 11 3 5.3 4.3 6.9 ps 0 X GSC8894.00426 13.3 20 GSC 06 26 09.16 +18 45 14.6 39 26 4 34 11 10.7 4.0 11.4 ps 0 WX OU Gem HD 45088 K3V 6.8 32 CNS ID** BY 06 29 23.40 �02 48 02.7 45 20 4 24 8 8.4 3.6 9.1 ps 0 WEX Ross 614 A Gl 234A M4e 11.1 38 CNS IDP+ 06 31 02.39 +50 02 41.4 65 16 4 10 0 6.1 0.0 6.1 ps: 0 W Steph 598 dMe 11.2 16 CNS IDP+ 06 32 56.92 �05 05 32.0 23 142 9 255 15 34.0 26.8 43.3 ps 0 WE DA 15.5 20 IDP+ 06 33 40.85 +20 01 29.4 47 18 4 7 0 6.9 0.0 6.9 ps 0 W WD 17.5 24 IDP+ 06 33 50.49 +10 41 34.4 24 59 6 169 13 17.8 21.1 27.7 ps 0 WEX KPD 0631+107 WD 0631+107 DA 13.8 11 MCK ID** 06 37 58.15 �61 31 59.4 26 34 3 32 4 15.7 10.5 18.9 ps 0 WEX HR 2468 HD 48189A G1.5V 6.2 14 CNS 06 40 22.86 �03 30 52.6 46 9 3 32 8 4.7 4.9 6.8 ps: 0 HD 295290 G0 9.1 66 SIM IDP+ 06 45 09.19 �16 42 43.7 21 3299 43 9370 75 235.0 339.3 412.7 ps 0 WEX Sirius B WD 0642�166 DA2 8.3 47 CNS ID** 06 48 56.04 �25 23 57.1 23 82 7 276 14 24.9 34.7 42.8 ps 0 WE DA 14.5 9 IDP+ 06 50 48.25 �00 32 36.1 63 13 3 26 0 6.7 0.0 6.7 ps 0 W BD�00 1462 HD 49933 F2V 5.8 26 YAL 06 53 47.65 �43 05 10.7 57 11 3 12 4 4.6 3.7 5.9 ps: 0 HD 51062 G3 8.9 102 SIM IDP+ 06 54 13.65 �02 09 23.1 23 100 8 299 15 26.6 33.6 42.9 ps 0 WE GD 80 WD 0651�020 DA1 14.8 58 MCK ID** 06 58 36.98 �28 58 10.7 31 21 4 28 6 9.3 5.9 11.0 ps 0 WE ϵ CMa A HD 52089 B2I 1.5 12 YAL ID** 07 02 04.06 +12 58 04.7 24 74 7 112 11 21.8 14.9 26.4 ps 1 WE K(e) 9.9 10 IDP+ 07 02 22.53 +25 50 57.3 42 21 4 17 7 8.6 3.4 9.2 ps 0 W BD+26 1435 HD 52452 G5 7.9 16 SIM IDP+ 07 10 59.19 +45 15 43.3 60 8 3 26 7 3.1 4.7 5.6 ps: 0 HD 54402 K0 7.7 93 SIM 07 13 10.99 �05 11 34.3 39 17 4 24 6 7.1 4.7 8.5 ps 0 W dMe 12.0 9 IDP+ 07 15 12.76 �70 25 06.4 22 571 17 904 25 76.3 82.6 112.5 ps 0 WEX DA 13.7 22 IDP+ 07 20 47.26 �31 46 45.9 23 109 9 429 21 23.7 39.5 46.1 ps 0 WE DAO+dM 16.1 19 IDP+ 07 23 19.89 �27 47 16.2 22 329 16 1024 32 49.1 70.0 85.5 ps 0 WE DA 13.4 9 IDP+ 07 25 13.35 �00 25 51.1 43 15 4 18 6 6.4 4.3 7.7 ps 0 WX BD�00 1712 AG�00 1021 K5 8.9 16 SIM IDP+ 07 28 51.15 �30 14 54.0 36 36 7 37 10 8.9 5.1 10.3 ps 0 W GJ 2060 CPD�29 1747 M1Ve 10.4 21 SIM ID* 07 29 05.97 �38 48 55.3 31 61 14 108 16 7.5 10.3 12.8 ps 0 WE HR 2875 HD 59635 B5Vp 5.4 12 YAL 07 31 21.16 +15 56 18.9 42 10 3 24 6 4.7 5.1 6.9 ps 0 K5e 9.7 19 IDP+ 07 31 58.21 +36 14 07.7 42 26 5 20 6 9.3 3.9 10.1 ps 0 W VV Lyn Gl 277A dM3e 10.6 17 CNS IDP+ 07 34 37.31 +31 52 49.4 27 65 7 90 10 18.3 13.5 22.8 ps 0 WEX YY Gem HD 60179C M1Ve 9.1 38 CNS ID** BY 07 34 55.76 +14 45 51.0 59 8 3 19 6 3.8 4.2 5.7 p 0 dMe 10.8 12 IDP+ 07 38 31.69 +24 00 41.5 53 6 3 38 7 3.2 7.0 7.7 ps 2 W dMe 12.7 39 IDP+ 07 39 18.44 +05 13 51.8 23 115 9 191 14 27.5 25.6 37.6 ps 0 WEX Procyon HD 61421 F5IV 0.4 46 CNS ID** 07 43 17.88 +28 53 04.1 23 135 9 210 13 31.2 27.7 41.8 ps 0 WEX σ Gem HD 62044 K1III 4.1 15 YAL ID** RS 07 43 35.17 +22 42 28.1 56 12 3 4 0 5.9 0.0 5.9 ps 0 X SAO 79647 K0 10.0 21 SIM IDP+ 07 43 45.66 �39 11 54.4 35 44 9 74 12 8.6 9.4 12.8 ps 0 WE GSC7645.02813 14.5 118 GSC 07 44 40.78 +03 33 29.0 30 36 6 44 9 10.9 7.6 13.3 ps 0 WEX YZ CMi Gl 285 M4Ve 11.2 17 CNS ID** 07 49 22.58 �76 41 49.8 40 18 5 24 5 4.9 6.0 7.8 ps 0 E dMe 12.3 33 IDP+ 07 51 19.06 +14 44 43.5 53 19 4 6 0 7.5 0.0 7.5 ps 0 WE PQ Gem CV int.polar 14.5 33 IDP+ 08 08 11.93 +21 06 08.0 70 14 4 27 0 5.9 0.0 5.9 ps: 0 BD+21 1764A/B LHS 5133/4 K5e+dMe 8.1 40 CNS IDP+ 08 08 55.01 +32 50 14.0 35 19 4 29 6 7.3 6.9 10.0 ps 0 W GJ 1108A/B BD+33 1646A/B M0.5Ve+M3Ve 10.3 58 CNS IDP+

Table 2. – continued RA (J2000) Dec (J2000) R90 Count Rate (ct/ks) Significance Det. Var. Counterparts

(h m s) (d m s) (^{00}) S1 err S2 err S1 S2 S1+S2 Flag Flag EUV/ Name Alternative Type Mag. ΔR Cat. Notes X-ray (^{00}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20)

08 09 29.98 �73 00 01.1 43 17 6 63 13 4.0 7.1 8.1 ps 0 WE DA 15.3 47 IDP+ 08 13 48.33 �07 38 14.3 57 14 6 55 16 3.2 4.5 5.5 ps: 0 SAO 135659 K0 8.8 40 SIM 08 15 05.55 �19 03 10.1 23 248 15 282 16 37.4 34.9 51.1 ps 2 WX VV Pup CV AM Her 14.0 18 CVR ID** 08 15 18.38 �49 13 54.5 35 11 3 33 5 4.9 9.1 10.3 ps 0 WE IX Vel CPD�48 1577 CV nova�like 9.1 38 CVR ID** 08 23 33.37 �25 25 40.2 27 52 7 83 9 13.7 15.0 20.3 ps 0 WE late�type 11.0 38 IDP+ A 08 25 50.60 �16 24 46.0 72 12 5 21 6 3.7 4.2 5.6 ps: 0 GSC5998.01783 12.9 34 GSC 08 27 04.95 +28 44 07.4 36 48 8 55 9 12.4 9.5 15.7 ps 0 W PG 0824+289 DA 14.7 10 SUB ID** 08 31 52.15 �53 40 33.9 28 26 5 58 6 7.7 15.1 16.9 ps 0 WE WD 14.5 5 IDP+ 08 33 00.82 �34 38 19.3 52 16 4 26 0 6.4 0.0 6.4 ps: 0 HR 3385 HD 72688 K0III 6.4 89 STR ID** A 08 38 56.17 �43 09 13.2 59 23 5 7 0 5.5 0.0 5.5 p 0 WX Vela SNR SNR knot ID** 08 39 15.53 +65 01 49.1 48 16 5 18 5 4.7 5.2 7.0 ps 0 EX Gl 311 G1 V 5.6 43 CNS 08 41 03.53 +03 21 14.0 22 228 15 447 21 36.7 39.4 53.9 ps 0 WE WD 15.0 5 IDP+ 08 43 16.64 �38 53 36.5 52 13 3 13 0 6.1 0.0 6.1 ps: 0 E Gl 320 K1 V 6.6 37 CNS 08 45 49.48 +48 52 55.0 22 226 12 663 23 41.3 69.2 80.5 ps 0 WE BD+49 1766B HD 74389B DA 15.5 27 SIM ID** 08 46 47.27 +06 25 04.9 73 18 5 32 0 5.7 0.0 5.7 ps: 0 WE ϵ Hya HD 74874 G5III 3.4 10 YAL ID** A 08 53 11.48 �07 43 24.7 42 23 5 16 5 8.1 4.1 9.1 ps 0 WE BD�07 2647 HD 75997 G5 9.2 10 SIM IDP+ 08 58 55.15 +08 27 54.8 34 32 6 43 8 9.6 8.0 12.5 ps 0 WE G41�14 LHS 6158 dMe 10.9 47 CNS IDP+ 08 59 41.78 �27 48 53.0 39 27 5 38 8 9.7 6.7 11.8 ps 0 WE TY Pyx HD 77137 G5IV+G5IV 6.9 16 CNS ID** RS 09 01 27.52 �52 29 25.9 45 10 4 16 5 3.1 4.7 5.6 p 0 GSC8177.00389 14.1 83 GSC 09 02 17.64 �04 06 31.1 34 25 5 38 7 8.8 7.4 11.5 ps 0 WE DA 12.4 25 IDP+ 09 07 49.24 +50 58 05.5 40 38 0 55 8 0.0 12.0 12.0 ps 0 W PG 0904+511 WD 0904+511 DA2 16.1 31 MCK ID** 09 08 16.88 �37 06 18.3 41 17 4 23 5 7.8 6.5 10.2 ps 0 WE SAO 200016 HD 78644 G3V 8.3 36 SIM IDP+ 09 09 53.57 +42 39 40.2 50 43 11 45 0 5.6 0.0 5.6 p 0 GSC2990.00341 14.9 114 GSC 09 14 21.35 +02 18 25.8 26 52 7 148 12 14.7 23.2 27.4 ps 0 WE HR 3665 HD 79469 B9.5V 3.9 27 YAL 09 16 55.69 �19 46 49.5 31 58 7 23 6 15.3 5.3 16.2 ps 0 WE WD 17.3 39 IDP+ 09 22 26.50 +40 12 10.6 30 48 8 95 13 8.5 9.5 12.7 ps 0 WEX BD+40 2197 HD 80715 K2V 7.7 13 CNS ID** BY 09 24 47.63 �23 49 34.2 50 18 4 13 4 6.8 4.0 7.9 ps 0 WE IL Hya HD 81410 K1III 7.4 19 STR ID** RS 09 25 35.63 �53 15 11.2 51 11 5 23 6 3.3 5.3 6.2 ps 0 X HD 81734 F7V 7.1 11 SIM 09 30 36.86 +10 35 13.0 41 15 4 39 7 6.5 7.5 9.9 ps 0 WE BD+11 2052A/B SAO 98614/5 G5+G5 7.6 53 SIM IDP+ A 09 32 24.19 �11 10 56.1 30 42 6 45 7 13.9 9.5 16.8 ps 0 WEX DM�10 2857 HD 82558 K0V 7.8 31 CNS ID**BY 09 32 44.48 +26 59 39.4 58 8 3 30 7 3.6 5.7 6.8 ps 0 E Gl 354.1 dG9 7.0 21 CNS 09 33 48.11 +62 49 28.2 34 24 5 32 6 7.4 7.8 10.8 ps 0 W BD+63 848 HD 82286 G5 8.2 19 SIM IDP+ RS 09 34 25.68 +69 50 17.8 30 49 7 52 7 11.9 11.9 16.9 ps 0 WEX DK UMa HD 82210 G4III 4.6 35 CNS ID** A 09 40 21.93 +50 21 02.4 32 52 10 107 17 6.6 8.3 10.6 ps 0 WE PG 0937+506 WD 0937+505 DA1 16.0 9 MCK ID** 09 51 23.76 �14 49 25.8 49 10 3 12 4 4.8 3.6 6.0 ps: 0 X HR 3903 G7III 4.1 108 YAL IDP+ 09 57 48.95 +85 29 49.2 25 66 5 50 6 20.6 13.3 24.5 ps 0 WE DA 16.4 11 IDP+ 09 58 31.01 �46 25 21.5 34 30 6 36 7 8.5 8.2 11.8 ps 0 W DM�45 5627 Gl 375 M5V 11.6 31 CNS 10 00 00.89 +24 33 03.3 29 44 6 49 8 13.0 8.7 15.7 ps 0 WEX DH Leo HD 86590 K0V 7.8 19 CNS ID** BY 10 14 17.71 +21 04 00.5 61 17 4 14 0 6.7 0.0 6.7 ps 0 W DK Leo GJ 2079 M0Ve 9.3 51 CNS ID** 10 16 27.78 �05 20 43.8 22 486 18 590 22 69.9 61.2 92.9 ps 0 WE DAO+dM 14.3 15 IDP+

Table 2. – continued RA (J2000) Dec (J2000) R90 Count Rate (ct/ks) Significance Det. Var. Counterparts

(h m s) (d m s) (^{00}) S1 err S2 err S1 S2 S1+S2 Flag Flag EUV/ Name Alternative Type Mag. ΔR Cat. Notes X-ray (^{00}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20)

10 19 36.04 +19 52 09.3 31 46 6 66 9 14.3 10.2 17.5 ps 0 WEX AD Leo Gl 388 M4Ve 9.4 10 CNS ID** 10 19 51.67 �14 07 48.4 28 36 6 78 8 10.9 16.6 19.9 ps 0 WE DA 15.3 17 IDP+ 10 24 03.69 +26 20 36.9 36 33 5 19 7 10.3 3.3 10.8 ps 0 WE BD+27 1888 HD 90052 G5 9.6 42 SIM 10 24 45.22 �30 20 51.7 26 60 8 142 12 14.2 21.8 26.0 ps 0 W DA 15.8 16 IDP+ 10 27 13.96 +32 23 56.9 48 15 4 23 7 5.5 4.1 6.9 ps: 0 WE DA+G 13.2 37 ID** 10 29 42.87 +45 06 31.8 26 34 5 91 9 11.4 17.0 20.4 ps 0 WE PG 1026+454 WD 1026+453 DA1 16.1 37 MCK ID** 10 31 01.96 +82 33 41.3 23 8 3 12 4 3.9 5.0 6.4 s 0 Gl 392.1 F2 V 5.3 11 CNS 10 32 08.74 +53 29 24.7 21 1073 24 2810 38 117.0 188.7 222.1 ps 0 WE DA 14.5 17 IDP+ 10 33 42.40 �11 41 26.2 28 38 7 85 9 9.2 15.5 18.1 ps 0 WE EG 070 WD 1031�115 DA2 13.0 28 SIM ID** 10 34 39.95 +39 38 06.6 55 23 5 16 0 6.8 0.0 6.8 ps 0 W X12325 ZWG 212 025 AGN Seyf. 15.6 27 CAT IDP+ 10 36 24.14 +46 08 11.4 25 58 6 215 13 17.2 30.5 35.0 ps 0 WE GD 123 WD 1033+464 DA4+K 13.2 29 MCK ID** 10 43 10.20 +49 02 02.3 22 228 11 464 18 44.2 52.6 68.7 ps 0 WE WD 16.1 43 IDP+ 10 43 31.26 +44 52 37.1 46 23 5 15 5 7.5 3.5 8.3 ps 0 WE PG 1040+451 DA: 16.0 58 SUB ID** 10 44 43.90 +57 44 57.7 25 50 6 126 9 12.9 23.0 26.4 ps 0 WE PG 1041+580 WD 1041+580 DA2 14.6 21 MCK ID** 10 46 45.50 �49 25 07.3 33 38 7 57 10 8.7 9.5 12.9 ps 0 WEX μ Vel HD 93497 G5III 2.7 8 YAL ID** A 10 51 06.04 +56 13 28.8 51 9 4 18 5 3.1 4.8 5.8 ps: 0 HD 93847 BD+57 1293 B9 7.4 48 SIM 10 51 31.56 +54 03 58.7 48 33 6 13 0 9.3 0.0 9.3 ps 0 WEX EK UMa 1E 1048+542 CV AM Her 18.0 50 CVR ID** 10 54 04.86 +56 08 57.4 71 19 5 4 0 6.0 0.0 6.0 ps: 0 GSC3826.00232 11.0 75 GSC 10 55 39.39 +60 28 03.1 45 12 4 15 5 4.3 3.5 5.5 ps: 0 X DM UMa SAO 15338 K0IV 9.6 35 STR ID** RS 10 56 29.74 +07 00 51.5 55 12 0 34 7 0.0 7.1 7.1 ps 0 WEX CN Leo Wolf 359 M6Ve 13.5 43 CNS ID** 10 58 18.42 �38 44 23.3 27 48 8 131 12 10.4 20.0 22.5 ps 0 WE DA 13.5 24 IDP+ 10 59 15.22 +51 24 22.1 22 593 22 1052 27 66.9 88.3 110.8 ps 0 WE LB 01919 DA 16.8 24 MLN IDP+ 11 00 38.35 +71 38 04.3 24 150 20 362 19 10.8 35.8 37.4 ps 0 WE PG 1057+719 WD 1057+719 DA1 15.0 24 MCK ID** 11 01 59.74 +22 35 09.2 49 11 5 38 9 3.3 5.9 6.7 ps: 0 HD 95559 G5 8.7 54 SIM IDP+ A 11 04 24.36 +38 12 03.1 36 85 9 16 0 18.0 0.0 18.0 ps 0 WEX Mkn 421 QSO 1101+384 AGN BL Lac 13.5 48 CAT ID** 11 04 24.37 +45 03 02.1 23 180 11 262 16 34.5 29.5 45.3 ps 2 WEX AN UMa PG 1101+453 CV AM Her 15.2 21 CVR ID** 11 04 41.70 �04 13 14.0 42 28 5 27 7 8.7 5.5 10.3 ps 0 W BD�03 3040A/B HD 96064 G5e+M3Ve 7.6 3 SIM IDP+ 11 11 39.26 �22 49 01.3 22 151 13 459 22 26.2 43.7 50.9 ps 0 WE β Crt HD 97277 DA+A2IV 12.6 29 CNS ID** 11 12 37.41 +24 08 37.9 28 88 12 92 12 13.5 11.9 18.0 ps 0 WE TON 61 WD 1109+244 DA2 15.3 31 MCK ID** 11 16 45.59 +44 54 17.7 44 14 5 30 7 4.2 5.5 6.9 ps 0 GSC3012.02468 10.9 43 GSC 11 18 10.06 +31 31 43.2 32 78 10 92 14 15.0 10.6 18.3 ps 0 WEX ξ UMa B HD 98230 G0Ve 4.9 12 CNS ID** RS 11 22 53.81 +43 43 30.8 40 13 5 41 8 4.0 7.2 8.3 ps 0 W PG 1120+439 WD 1120+439 DA1 15.8 39 MCK ID** 11 26 17.85 �68 40 44.6 66 19 8 52 15 3.9 5.0 6.3 ps 0 N.Mus 1991 GU Mus LMXB 13.2 51 SIM ID** 11 26 18.92 +18 39 15.4 22 184 12 627 21 34.5 64.9 73.5 ps 0 WE PG 1123+189 WD 1123+189 DA4 13.1 67 MCK ID** 11 28 13.84 �02 50 17.4 35 22 5 49 8 7.4 9.1 11.7 ps 0 W PG 1125�026 WD 1125�025 DA3 15.3 11 MCK ID** 11 29 10.81 +38 09 09.7 50 6 0 29 8 0.0 5.7 5.7 ps: 0 WD 1126+384 Feige 43 DA3 14.7 18 MCK ID** 11 32 46.38 +12 11 00.5 54 17 4 14 0 6.7 0.0 6.7 ps 0 W BD+12 2343 SAO 99656 G5 8.9 58 SIM IDP+ 11 35 50.35 �63 01 25.1 55 21 5 12 0 6.3 0.0 6.3 ps: 0 EX λ Cen HR 4467 B9III 3.1 28 YAL 11 39 47.39 �43 08 08.2 54 20 9 32 11 3.5 4.4 5.6 p 0 GSC7752.00099 14.6 112 GSC 11 47 32.79 +44 19 28.3 56 8 0 36 8 0.0 6.5 6.5 ps 0 WE PG 1145+446 MVe 15.4 98 SIM ID*

Table 2. – continued RA (J2000) Dec (J2000) R90 Count Rate (ct/ks) Significance Det. Var. Counterparts

(h m s) (d m s) (^{00}) S1 err S2 err S1 S2 S1+S2 Flag Flag EUV/ Name Alternative Type Mag. ΔR Cat. Notes X-ray (^{00}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20)

11 47 46.45 +12 54 04.0 49 13 4 19 6 4.9 4.2 6.5 ps 0 BPM 87617 K4 10.7 10 SIM IDP+ 11 47 57.00 +20 14 02.1 35 30 5 24 6 10.2 5.8 11.7 ps 0 WX DQ Leo HD 102509 F2IV+G5III 4.5 61 YAL ID** RS 11 48 02.52 +18 30 59.3 27 37 6 99 10 11.8 16.3 20.1 ps 0 W PG 1145+188 WD 1145+187 DA2 14.2 22 MCK ID** 11 49 55.54 +28 45 08.7 24 149 11 112 10 30.2 19.4 35.9 ps 2 WE CV AM Her 17.0 2 IDP+ 11 58 02.60 +14 02 08.8 41 22 5 25 6 8.0 5.4 9.6 ps 0 W BD+14 2457 HD 103914 G5 8.4 24 SIM IDP+ 12 01 42.85 �03 45 42.3 39 20 5 20 6 6.4 4.8 8.0 ps 0 WEX PG 1159�035 GW Vir DOZ1 14.8 44 MCK ID** 12 12 25.96 +77 36 53.2 62 13 0 18 5 0.0 4.6 4.6 p:s 0 HR 4646 HD 106112 A5m 5.1 46 YAL 12 19 06.04 +16 33 01.1 45 14 4 16 6 6.4 4.0 7.5 ps 0 W BD+17 2462 HD 107146 G2V 7.1 10 SIM IDP+ A 12 22 35.76 �39 04 10.0 66 15 6 23 9 4.1 3.7 5.5 p 0 12 25 02.14 +25 33 50.7 52 19 4 17 0 7.3 0.0 7.3 ps 0 WEX BD+26 2347 HD 108102 F8V+F8V 8.2 17 STR ID** RS 12 35 19.67 +23 34 07.4 50 15 4 17 5 6.0 4.0 7.3 ps 0 WE PG 1232+238 WD 1232+238 DA 15.7 60 MCK ID** 12 36 44.33 +47 55 28.3 22 541 20 1448 31 65.1 117.9 134.7 ps 0 WE PG 1234+482 WD 1234+482 DA 14.5 9 SUB ID** 12 37 35.85 +26 43 29.9 69 17 4 5 0 6.4 0.0 6.4 ps: 0 W IC 3599 ZWG 159.034 AGN Seyf.1 15.6 95 SIM IDP+ 12 41 40.99 �01 26 32.5 38 37 9 47 14 6.3 5.1 8.1 p 0 EX Gl 482 F0 V 3.5 32 CNS 12 48 33.21 +60 18 32.1 47 13 4 14 5 4.7 3.6 6.0 p 0 X Wo 9417 F6 V 5.8 57 CNS 12 51 41.05 +27 32 33.7 34 16 4 42 7 6.4 9.5 11.5 ps 0 WEX 31 Com HD 111812 G0III 4.9 14 YAL ID** A 12 52 23.97 �29 15 06.8 29 58 9 51 10 11.4 8.0 13.9 ps 0 WX EX Hya CV int.polar 11.0 12 CVR ID** 12 53 59.49 +27 05 20.6 180 5 0 10 4 0.0 6.5 6.5 p 0 NGC 4787 galaxy, S0a 15.5 119 SIM 12 55 33.30 +25 53 54.4 35 7 3 54 7 3.1 13.0 13.3 ps 0 WE IN Com HD 112313 WD+G5III in PN 8.7 26 CVR ID** 12 57 02.29 +22 01 48.0 21 1448 32 5019 55 130.7 269.5 299.5 ps 0 WEX EG 187 WD 1254+223 DA1 13.4 12 MCK ID** 12 57 39.25 +35 13 16.8 45 18 4 22 5 6.1 5.5 8.2 ps 0 WEX BF CVn Gl 490A M0Ve 10.7 4 CNS ID** BY 12 59 42.89 +60 39 42.6 52 13 4 16 5 5.0 4.9 7.0 ps 0 LB 02513 blue star 16.7 35 MLN 13 00 44.97 +12 23 08.2 44 28 8 22 7 5.1 4.6 6.9 ps 0 EX Gl 494 dM1.5 9.8 46 CNS 13 03 20.82 �40 56 54.6 68 11 0 30 7 0.0 5.6 5.6 ps: 0 13 07 55.93 +53 51 44.8 31 54 7 28 5 13.3 7.8 15.4 ps 1 W CV AM Her 17.0 24 IDP+ 13 09 28.14 +08 15 03.6 73 4 0 29 7 0.0 6.1 6.1 ps: 0 W GSC0884.00380 11.5 66 GSC 13 16 21.21 +29 06 11.8 21 14559 100 37036 142 469.2 851.6 972.3 ps 0 WEX HZ 43 WD 1314+293 DA1 12.9 7 MCK ID** 13 16 48.13 +09 25 42.2 47 19 6 22 6 4.8 5.2 7.1 ps 0 WEX HR 5011 HD 115383 G0V 5.2 21 CNS ID** A 13 25 08.96 �11 11 17.0 45 25 6 24 0 6.4 0.0 6.4 ps: 0 WX Spica α Vir B1III�IV 1.0 101 YAL ID** 13 32 43.17 +22 30 26.7 44 24 5 25 6 7.3 6.3 9.6 ps 0 WE BD+23 2581 dKe 9.7 23 SIM IDP+ 13 34 44.33 �08 20 31.3 51 24 6 15 7 6.2 3.1 6.9 ps: 0 WX EQ Vir HD 118100 K5Ve 9.3 7 CNS ID** 13 34 48.85 +37 11 29.1 26 33 5 48 6 10.3 14.4 17.7 ps 0 WEX BH CVn HD 118216 F2IV+K2IV 5.0 35 YAL ID** RS 13 36 14.25 +69 49 30.3 37 11 3 25 5 4.8 7.0 8.5 ps 0 W PG 1335+701 WD 1335+700 DA2 15.3 30 MCK IDP+ 13 44 00.53 �61 22 16.1 53 26 7 8 0 5.6 0.0 5.6 p 0 X CP�60 4913 HD 119285 K2IV 7.9 18 STR ID** RS 13 45 43.25 �33 02 49.2 49 16 4 13 5 7.1 3.7 8.0 ps 0 W HR 5168 HD 119756 F2V 4.2 28 CNS 14 05 00.97 +10 00 03.9 49 11 4 19 6 4.0 4.7 6.2 p 0 X HD 123034 SAO 100840 G5 8.5 65 SIM 14 15 59.24 �05 59 05.7 73 14 5 13 5 4.7 3.3 5.8 p 0 Wo 9473 HR 5338 F6III 4.1 57 CNS 14 17 49.78 �68 02 17.4 52 9 3 14 5 4.2 3.6 5.5 ps: 0 HD 124672 F6V 7.3 30 SIM 14 25 13.21 +51 51 26.8 26 38 5 33 4 13.2 13.3 18.8 ps 0 WEX θ Boo A HD 126660 F6V 4.1 20 CNS ID** 14 26 42.62 +50 06 44.7 25 33 4 49 5 12.3 17.6 21.5 ps 0 WE DA+dMe 14.0 19 IDP+

Table 2. – continued RA (J2000) Dec (J2000) R90 Count Rate (ct/ks) Significance Det. Var. Counterparts

(h m s) (d m s) (^{00}) S1 err S2 err S1 S2 S1+S2 Flag Flag EUV/ Name Alternative Type Mag. ΔR Cat. Notes X-ray (^{00}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20)

14 26 46.56 +02 55 12.7 63 13 4 13 5 4.4 3.5 5.6 p 0 GSC0321.00127 13.7 118 GSC 14 28 11.10 �02 13 21.0 58 10 3 12 5 4.7 3.4 5.8 p 0 Gl 550.2A/B HD 126868 G2IV+G4V 4.8 23 CNS 14 28 36.47 +42 41 16.7 71 18 4 12 9 6.3 3.4 7.1 ps: 0 WEX 1H 1430+423 AGN BL Lac 16.5 ID** 14 29 46.83 �62 40 31.1 33 33 5 38 7 10.5 8.0 13.2 ps 0 WX Proxima Cen Gl 551 MVe 11.1 28 CNS ID** 14 31 56.40 +37 06 19.9 32 28 5 30 6 9.7 6.8 11.9 ps 0 W GD 336 WD 1429+373 DA1 15.3 10 MCK ID** 14 34 15.23 �60 24 41.0 55 22 5 17 0 7.7 0.0 7.7 ps 0 WE CP�59 5631 HD 127535 K1IV 8.6 15 STR ID** RS 14 38 58.10 +64 17 39.4 30 19 3 28 4 8.2 9.6 12.6 ps 0 WE DM+64 1017 HD 129333 G0Ve 7.5 15 CNS 14 39 41.92 �60 50 00.1 23 125 10 287 15 28.0 38.4 47.5 ps 0 WEX α Cen A/B HD 128620/1 G2V+K2V �0.1 16 CNS ID** 14 40 00.94 +75 05 44.9 24 98 10 107 9 13.8 15.5 20.7 ps 0 WE DA 15.4 23 IDP+ 14 42 06.57 +35 26 00.5 36 66 7 18 0 18.9 0.0 18.9 ps 1 W Mkn 478 QSO 1440+356 AGN Seyf.1 14.6 25 VER IDP+ 14 46 02.31 +63 29 29.1 29 31 5 36 5 10.3 11.9 15.7 ps 0 WE DA 16.0 21 SIM IDP+ 14 50 20.54 �32 10 21.3 60 25 8 15 0 5.5 0.0 5.5 p 0 GSC7301.01288 14.6 85 GSC 14 51 22.54 +19 05 38.3 27 45 7 70 9 11.7 13.3 17.7 ps 0 WEX ξ Boo A/B HD 131156A/B G8Ve+K4Ve 4.6 27 CNS ID** 15 01 10.83 �43 40 55.2 61 21 5 23 6 6.4 5.1 8.1 ps 0 WE dMe 11.9 102 IDP+ 15 02 07.47 +66 12 21.4 21 4782 37 7267 43 391.0 491.2 627.8 ps 0 WEX H 1504+65 WD 1501+664 DZ1 15.9 5 MCK ID** 15 03 45.72 +47 39 01.3 23 106 7 112 8 25.8 21.5 33.6 ps 0 WEX 44i Boo B Gl 575B G2V 5.3 23 CNS ID** W 15 07 48.83 +76 12 25.2 46 77 0 48 8 0.0 7.0 7.0 ps 0 EX HD 135363 G5 9.2 44 SIM IDP+ 15 11 47.29 +61 52 01.9 34 13 3 17 3 5.6 7.9 9.7 ps 0 WE BV/BW Dra F7V+G0V 7.9 38 GCV ID** W 15 21 45.18 +52 21 53.7 27 45 5 41 6 14.2 9.9 17.3 ps 0 WE PG 1520+525 WD 1520+525 DOZ1 15.7 18 MCK ID** 15 29 22.80 +80 27 20.5 34 15 3 21 3 6.9 9.6 11.8 ps 0 WE ADS 9696A/B HD 139777/813 G0V+G5 6.6 39 YAL IDP+ A 15 29 42.87 +48 36 13.3 30 20 4 47 7 8.5 10.4 13.5 ps 0 W DA 14.5 3 IDP+ 15 35 20.76 +60 06 06.6 47 8 0 9 2 0.0 5.8 5.8 ps 0 HD 139477 K5 8.0 48 SIM 15 38 57.10 �57 41 58.9 34 26 5 39 6 7.5 9.6 12.2 ps 0 WE V343 Nor HD 139084 K0V 8.1 24 SIM ID** A 15 45 48.22 �30 20 29.8 36 27 5 26 6 9.9 6.0 11.5 ps 0 WE SAO 206946 HD 140637 K2Ve 9.4 25 SIM IDP+ 15 46 58.78 �36 46 45.9 28 73 8 61 9 19.3 10.1 21.8 ps 0 WE WD 16.6 62 IDP+ 15 53 27.17 �42 14 53.3 42 19 5 20 5 6.4 4.9 8.0 ps 0 W SAO 226339 HD 141943 G1V 7.5 70 SIM IDP+ A 16 01 33.72 +66 48 05.3 48 10 2 4 0 6.0 0.0 6.0 ps 0 X AG Dra SAO 16931 K3IIIe 9.8 43 GCV ID** 16 01 45.33 +51 20 31.2 34 20 4 25 5 8.4 7.7 11.4 ps 0 WE BD+51 2051 HD 144110 G5 8.5 30 SIM IDP+ A 16 01 53.94 +58 33 32.6 37 21 3 11 3 9.4 4.3 10.4 ps 0 WX θ Dra HD 144284 F8IV 4.0 19 CNS 16 03 34.32 �57 45 32.6 34 48 7 32 7 10.1 6.7 12.1 ps 0 WE SAO 243278 CPD�57 7500C G 8.0 65 YAL IDP+ RS 16 04 01.48 �21 55 12.0 52 11 4 24 6 3.6 4.9 6.1 ps 0 E HD 143937 K0 8.6 41 SIM IDP+ A 16 05 53.40 +10 41 27.1 54 23 5 18 0 6.6 0.0 6.6 ps 0 W AG+10 1883 HD 144515 G8V 8.3 24 LHS IDP+ A 16 14 40.73 +33 51 31.6 22 208 10 331 13 44.9 51.0 67.9 ps 0 WEX σ2 CrB TZ CrB F6V+G0Ve 5.7 4 CNS ID** RS 16 17 02.19 +55 16 02.4 39 15 3 16 4 7.0 5.3 8.8 ps 0 WEX CR Dra Gl 616.2 M1Ve 10.0 41 CNS ID* 16 19 55.80 �15 38 24.1 29 36 6 81 8 10.9 15.6 19.1 ps 0 WE Sco X�1 V818 Sco LMXB 12.0 12 CNS ID** 16 19 55.96 +39 42 09.4 51 12 4 14 5 4.5 3.5 5.7 ps: 0 Wo 9557 HD 147365 F3V 5.5 22 CNS 16 21 17.40 +18 57 18.8 47 17 5 15 5 4.5 3.3 5.6 p 0 GSC1513.00024 14.8 6 GSC 16 23 34.73 �39 13 25.9 22 232 15 577 22 31.3 64.1 71.3 ps 0 WE CD�38 10980 WD 1620�391 DA2 11.0 31 CNS ID** 16 25 14.26 �49 08 29.0 69 23 6 18 0 5.8 0.0 5.8 ps 0 WE CD�48 10809 HD 147633 G2IV 7.1 43 SIM IDP+ 16 29 11.23 +78 04 43.5 21 1008 15 1472 18 166.9 212.7 270.4 ps 0 WEX DA+dMe 13.0 4 ID**

Table 2. – continued RA (J2000) Dec (J2000) R90 Count Rate (ct/ks) Significance Det. Var. Counterparts

(h m s) (d m s) (^{00}) S1 err S2 err S1 S2 S1+S2 Flag Flag EUV/ Name Alternative Type Mag. ΔR Cat. Notes X-ray (^{00}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20)

16 36 13.59 +52 53 47.0 42 12 4 46 11 4.7 6.5 8.0 ps 0 WE ADS 10129C HD 150100 B9.5V 5.5 24 YAL 16 38 27.26 +35 00 19.7 29 57 7 54 7 11.7 10.7 15.9 ps 0 WE KUV 433�3 WD 1636+351 DA1 15.0 8 MCK ID** 16 50 20.95 +40 37 35.9 33 19 5 34 6 5.2 7.4 9.1 ps 0 WE DA 14.5 17 IDP+ 16 55 30.29 �08 19 36.1 26 74 8 116 12 14.9 15.2 21.3 ps 1 WEX Gl 644A/B Wolf 630A/B M3Ve+M4Ve 9.0 32 CNS ID** BY 16 56 03.85 +65 07 52.7 44 7 2 9 2 4.7 5.9 7.5 ps 0 WE 19 Dra HD 153597 F6V 4.9 21 CNS ID** A 16 56 44.83 �39 07 19.0 48 41 8 32 9 8.7 5.0 10.0 ps 0 WE BPM 61550 GJ 2123A M3Ve 11.4 111 GCV ID* 16 57 50.54 +35 20 53.3 34 93 8 14 0 17.6 0.0 17.6 ps 2 WEX Her X�1 HZ Her HMXB 13.0 21 GCV ID** 16 59 48.66 +44 01 36.8 24 64 7 235 11 13.0 37.5 39.8 ps 0 WE H 1659+44 WD 1658+440 DA2p 14.9 30 MCK ID** 17 11 26.55 +66 45 49.9 40 10 1 6 0 9.2 0.0 9.2 p 0 WE WD 17.1 22 IDP+ 17 17 24.85 �66 56 33.7 39 60 14 77 14 5.8 8.2 10.1 ps 2 WE V824 Ara HD 155555 G5IV+K0IV 6.7 23 STR ID** RS 17 17 35.60 +10 25 08.9 41 27 7 23 8 4.6 3.7 5.9 p 0 HD 156498 G5 8.4 87 SIM IDP+ 17 26 43.67 +58 37 37.0 39 32 4 10 0 10.8 0.0 10.8 ps 0 WE PG 1725+587 WD 1725+586 DA1 15.5 11 MCK ID** 17 27 37.24 �36 00 05.0 29 48 8 89 11 9.8 12.2 15.6 ps 0 WE sdO? 15.6 60 MK 17 32 45.97 +74 13 53.3 29 18 2 9 2 12.7 6.2 14.2 ps 0 WEX DR Dra HD 160538 K0III+DB 6.6 25 STR ID** RS 17 34 53.89 +61 52 38.8 53 6 0 12 3 0.0 5.0 5.0 p:s 0 E Gl 684 K3 V 8.1 35 CNS 17 36 53.50 +68 45 43.6 26 11 1 14 1 10.8 11.3 15.6 ps 0 WEX ω Dra HD 160922 F5V 4.8 24 CNS ID** A 17 37 58.96 +66 53 46.2 38 3 1 5 1 4.6 6.0 7.6 ps 0 W DA 14.6 19 IDP+ 17 38 41.49 +61 14 46.6 31 15 3 20 3 6.1 7.5 9.7 ps 0 WEX AC+61 27026 HD 160934 K8V 10.3 35 CNS ID** A 17 46 15.32 �70 38 21.5 27 141 20 274 26 11.5 18.3 21.6 ps 0 WE DA 16.2 36 IDP+ 17 55 25.45 +36 11 50.3 28 30 4 46 6 10.7 9.9 14.6 ps 0 WEX BD+36 2975 HD 163621 G8V+K7V 7.9 31 CNS ID** A 17 57 47.59 +29 15 53.4 36 21 5 28 7 5.9 4.8 7.6 ps 0 E HR 6703 HD 163993 G8III 3.7 65 YAL 18 00 09.89 +68 36 14.2 22 53 2 21 1 50.7 21.9 55.2 ps 0 WEX KUV 18004+6836 DA 14.6 20 SUB ID** 18 02 14.51 +64 15 48.0 42 3 1 5 1 3.4 5.3 6.3 p 0 EX G 227� 22 dMe 12.9 15 SIM IDP+ 18 05 51.29 +21 27 27.3 36 43 8 42 13 6.6 3.6 7.5 p 0 WEX V772 Her HD 165590 G0V 7.1 41 STR ID** RS 18 08 16.66 +29 41 44.0 27 55 6 86 14 14.9 7.8 16.8 ps 0 WE V815 Her HD 166181 G5V+M0V 7.7 19 STR ID** RS 18 09 19.57 +29 57 55.4 34 26 4 51 13 8.8 4.8 10.0 ps 0 W BD+29 3190 HD 166435 G0 6.8 57 SIM IDP+ 18 13 53.91 +64 24 08.7 35 6 1 5 1 6.6 4.5 8.0 ps 0 WX 36 Dra HD 168151 F5V 5.0 21 CNS 18 16 17.66 +54 10 29.5 39 6 1 5 2 6.3 3.5 7.2 ps 0 W dKe 12.0 11 IDP+ 18 20 31.18 +58 04 36.1 22 103 4 116 4 57.7 49.8 76.3 ps 0 WE DA 13.0 13 IDP+ 18 21 49.34 +64 21 54.7 35 11 1 33 0 12.5 0.0 12.5 p 0 WEX K1�16 WD 1821+643 CSPN D0Z1 15.0 12 MCK ID** 18 29 02.64 +34 59 03.5 67 9 2 3 0 5.6 0.0 5.6 ps: 0 18 33 56.23 +51 43 13.7 23 52 3 60 4 27.2 24.2 36.5 ps 0 WEX BY Dra HD 234677 M0Ve 8.3 16 CNS ID** BY 18 34 21.05 +18 41 14.1 26 39 5 33 6 13.3 8.5 15.8 ps 0 WE BD+18 3734 HD 171488 G0V 7.3 18 SIM IDP+ 18 44 50.09 �74 18 53.6 55 117 22 74 23 7.1 4.3 8.3 ps 0 WE CV AM Her 17.6 23 IDP+ 18 45 06.77 +68 22 53.4 24 30 2 29 2 20.3 17.9 27.0 ps 0 WE KUV 18453+6819 DA 15.0 25 SIM 18 46 09.56 +19 13 01.6 55 11 3 19 0 5.9 0.0 5.9 ps 0 BPM 93474 K4 11.4 45 SIM IDP+ 18 47 39.16 +01 57 31.9 22 243 13 816 26 43.2 70.8 83.0 ps 0 WE BPM 93487 WD 1845+019 DA2 13.0 39 MCK ID** 18 47 56.87 �22 19 37.9 35 31 8 66 11 5.7 8.5 10.2 ps 0 WE DA 14.0 8 IDP+ 18 55 27.62 +08 24 20.7 36 19 4 14 5 8.7 3.2 9.2 ps 0 WX Gl 735 V1285 Aql M2Ve 10.1 11 CNS ID* 18 55 53.72 +23 33 34.6 27 36 4 58 7 15.2 12.2 19.5 ps 0 WEX Wo 9638 HD 175742 K2V 8.1 13 CNS

Table 2. – continued RA (J2000) Dec (J2000) R90 Count Rate (ct/ks) Significance Det. Var. Counterparts

(h m s) (d m s) (^{00}) S1 err S2 err S1 S2 S1+S2 Flag Flag EUV/ Name Alternative Type Mag. ΔR Cat. Notes X-ray (^{00}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20)

19 06 24.35 +27 43 08.4 48 28 5 24 6 7.9 5.0 9.4 ps 0 W BD+27 3245 HD 337518 K0 8.6 38 SIM IDP+ 19 07 32.74 +30 15 23.1 29 43 6 46 7 10.3 8.6 13.4 ps 0 WE V478 Lyr HD 178450 G6V+G8V 7.7 12 STR ID** RS 19 18 23.69 +59 59 55.3 31 11 2 17 3 7.8 7.9 11.1 ps 0 WE LB 00342 blue star 14.3 17 MLN 19 25 59.59 �56 33 27.2 23 710 38 697 40 39.4 34.4 52.3 ps 0 WEX DA+G 10.6 12 ID** 19 29 40.68 �23 02 24.4 44 16 6 28 9 3.5 4.3 5.6 p 0 19 38 35.68 �46 12 59.4 23 424 21 302 18 43.9 32.2 54.4 ps 2 WEX CV AM Her 15.2 2 IDP+ 19 43 41.70 +50 05 01.6 28 22 4 29 4 8.5 8.9 12.4 ps 0 WE DA 14.8 33 IDP+ 19 50 02.74 +26 08 27.1 56 25 7 49 19 4.7 3.2 5.7 p 0 GSC2144.00087 13.1 54 GSC 20 00 19.69 �33 41 40.3 40 38 8 33 9 7.7 4.5 8.9 ps 0 WE HR 7631 HD 189245 F7V 5.7 33 CNS 20 04 17.98 �56 02 46.8 47 17 0 45 10 0.0 6.5 6.5 ps 0 WE AOO 2000�56 WD 2000�562 DA 15.2 1 SIM ID** 20 05 41.43 +22 40 26.8 23 454 19 147 13 52.8 18.8 56.1 ps 2 WEX QQ Vul E 2003+225 CV AM Her 14.0 23 CVR ID** 20 09 05.73 �60 25 28.6 22 1320 46 2478 66 67.7 93.2 115.2 ps 0 WE DA 13.4 14 IDP+ 20 13 09.68 +40 02 40.4 27 63 6 34 5 18.2 8.8 20.3 ps 0 WE DAO+dM 14.6 18 IDP+ 20 18 54.51 �57 21 45.8 48 26 9 43 10 3.9 6.2 7.3 ps 0 WE L210�114 WD 2014�575 DA 13.0 15 MCK IDP+ 20 24 00.01 �42 24 04.3 28 62 10 191 19 10.5 17.2 20.2 ps 0 WE HR 7787 HD 193807 A5V 5.6 108 YAL 20 24 14.47 +20 01 02.0 39 24 5 18 5 7.5 4.6 8.8 ps 0 WE DA+dM 16.4 27 IDP+ 20 29 53.27 +39 13 58.6 35 24 5 30 6 7.1 6.3 9.5 ps 0 W GD 391 WD 2028+390 DA2 13.0 38 MCK ID** 20 31 13.78 +05 13 16.9 39 22 5 22 6 7.3 4.8 8.8 ps 0 HD 195434 K0 11.0 30 SIM IDP+ 20 37 20.80 +75 35 51.5 27 26 4 34 4 11.6 11.9 16.6 ps 0 WEX VW Cep HD 197433 K0V 7.4 7 CNS ID** W 20 41 50.59 �32 25 03.0 37 46 9 90 14 9.6 8.6 12.9 ps 0 WE AT Mic Gl 799 M4Ve 10.3 38 CNS ID** BY 20 45 10.33 �31 20 00.9 25 161 14 119 17 26.2 10.0 28.1 ps 2 WEX AU Mic Gl 803 M0Ve 8.6 25 CNS ID** BY 20 47 46.01 �36 35 43.0 31 25 6 118 15 7.7 12.2 14.4 ps 2 W SAO 212437 HD 197890 K0V 9.3 58 SIM IDP+ A 20 51 18.65 �13 41 32.1 72 4 0 29 7 0.0 6.0 6.0 ps: 0 20 55 47.07 �17 06 22.6 31 44 7 55 8 10.0 11.2 15.0 ps 0 WEX BD�17 6127 HD 199143 F8V 7.1 26 SIM IDP+ 20 57 30.23 +31 11 30.7 58 25 6 24 0 6.1 0.0 6.1 ps: 0 Cyg.Loop SNR SNR knot ID** 21 00 05.27 +40 05 18.8 38 15 3 20 5 7.5 4.7 8.9 ps 0 WEX V1396 Cyg Gl 815A M3Ve 10.1 57 CNS ID** BY 21 02 24.94 +27 49 08.3 28 53 7 56 9 11.2 8.6 14.1 ps 0 WEX ER Vul HD 200391 G0V+G5V 7.3 45 STR ID** RS 21 06 51.28 +38 43 59.7 55 12 3 21 0 6.0 0.0 6.0 ps 0 X Gl 820 K5 V 5.2 14 CNS 21 06 51.31 +16 44 31.5 67 31 7 19 0 6.0 0.0 6.0 p 0 GSC1649.00256 12.9 57 GSC 21 07 55.57 �05 16 30.3 52 24 5 6 0 8.4 0.0 8.4 ps 0 WE CV AM Her 15.3 79 IDP+ 21 12 44.33 +50 06 21.5 21 402 13 1292 21 73.1 164.9 180.3 ps 0 WE GD 394 WD 2111+498 DA2 13.1 17 MCK ID** 21 16 53.01 +73 50 37.0 26 83 7 82 10 22.0 13.4 25.7 ps 0 WE KUV 21168+7338 DA 15.0 5 SIM ID** 21 21 01.06 +40 20 52.8 44 18 4 11 4 7.6 3.8 8.5 ps 0 WE HR 8170 HD 203454 F8V 6.4 10 YAL 21 22 13.90 �16 49 52.8 47 22 5 16 5 7.4 4.3 8.5 ps 0 WX ι Cap HD 203387 G7III 4.3 17 YAL ID** A 21 25 00.24 +28 26 11.6 43 16 4 18 6 5.4 3.8 6.6 ps 0 DA 14.0 27 IDP+ 21 26 26.09 +19 23 00.5 23 263 16 757 25 30.9 62.4 69.6 ps 0 WE HR 8210 IK Peg DA+A8m 6.1 29 GCV ID** 21 27 43.51 �22 11 28.4 28 57 8 95 10 14.0 17.4 22.3 ps 0 WE DA 14.6 22 IDP+ 21 33 57.16 +45 35 48.2 51 9 3 9 3 4.2 4.2 5.9 ps: 0 HR 8252 HD 205435 G8III 4.0 25 YAL 21 37 33.90 �80 05 51.9 52 28 11 38 11 3.4 4.4 5.5 p 0 21 42 44.08 +43 35 24.0 23 375 13 61 6 66.6 18.6 69.2 ps 2 WX SS Cyg BD+42 4189A CV dw.nova 11.4 22 CVR ID**

Table 2. – continued RA (J2000) Dec (J2000) R90 Count Rate (ct/ks) Significance Det. Var. Counterparts

(h m s) (d m s) (^{00}) S1 err S2 err S1 S2 S1+S2 Flag Flag EUV/ Name Alternative Type Mag. ΔR Cat. Notes X-ray (^{00}) (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11) (12) (13) (14) (15) (16) (17) (18) (19) (20)

21 47 03.25 �16 06 39.5 35 45 9 63 10 8.1 9.3 12.3 ps 0 WE δ Cap HD 207098 AmIV+? 2.8 57 CNS ID** 21 54 52.52 �30 29 09.6 35 30 6 84 10 8.6 13.7 16.1 ps 0 WE DA 14.4 13 IDP+ 21 56 21.12 �54 38 04.9 21 1401 34 3693 59 108.1 178.1 208.3 ps 0 WEX DA 14.3 19 IDP+ 21 56 35.84 �41 42 00.8 23 157 12 193 13 28.9 28.6 40.7 ps 0 WE DA 15.7 20 IDP+ 21 57 38.57 �50 59 45.6 42 30 6 39 7 8.5 9.7 12.6 ps 0 W Gl 841A CD�51 13128 dM4e 10.4 74 CNS ID** 21 58 34.21 +82 52 59.0 28 52 8 77 9 7.7 11.2 13.6 p 1 WEX ADS 15571B HD 209943 G5V 7.5 63 YAL ID** RS 21 58 52.40 �30 13 27.3 33 180 12 17 0 31.2 0.0 31.2 ps 0 WEX PKS 2155�304 QSO 2155�304 AGN BL Lac 14.0 7 SIM ID** 22 01 11.62 +28 18 49.5 48 7 3 11 3 4.0 4.3 5.8 p 0 G 188�38 M? 12.0 33 CNS 22 06 30.35 +63 46 11.1 42 12 4 17 5 4.1 5.2 6.6 ps: 0 GSC4271.01011 14.6 62 GSC 22 07 45.52 +25 20 17.3 30 23 4 55 6 9.3 15.6 18.2 ps 0 WE DA 14.4 11 IDP+ 22 08 41.20 +45 44 39.0 23 119 8 193 11 27.6 34.4 44.1 ps 1 WEX AR Lac HD 210334 G2IV+K0IV 6.1 8 STR ID** RS 22 10 28.37 �30 05 14.5 33 67 10 140 14 10.6 17.5 20.5 ps 0 WE DA 12.9 30 IDP+ 22 14 11.85 �49 19 08.5 29 12 4 1089 29 3.8 93.0 93.1 ps 0 WE DA 11.7 17 IDP+ 22 20 09.27 +49 30 05.9 33 27 5 33 5 8.1 8.5 11.8 ps 0 WE BD+48 3686 SAO 51891 K0 8.1 29 SIM IDP+ A 22 23 29.19 +32 28 00.6 39 24 5 29 6 7.7 7.1 10.5 ps 0 W GJ 856A/B Wolf 1225 M0Ve 11.4 27 CNS ID** 22 34 28.31 +08 12 45.5 51 22 5 9 0 6.5 0.0 6.5 p 0 GSC1151.00552 14.4 81 GSC 22 38 23.22 �65 22 43.9 40 16 5 44 9 4.8 7.1 8.6 ps 1 W GJ 865 L 119�21 dMe 11.5 36 CNS IDP+ 22 38 45.89 �20 36 55.3 36 83 16 102 16 7.0 8.8 11.3 ps 0 WEX FK/FL Aqr Gl 867A/B M2Ve+M3Ve 9.1 49 CNS ID** BY 22 44 42.75 �32 18 58.2 42 26 0 76 13 0.0 8.1 8.1 ps 0 WE PHL 0396 TON S 72 star 16.3 47 MLN 22 46 51.15 +44 20 11.8 23 117 9 148 10 24.2 27.1 36.4 ps 2 WE EV Lac Gl 873 M4.5Ve 10.1 11 CNS ID** 22 48 39.99 �51 09 28.8 51 18 5 10 0 5.7 0.0 5.7 ps 0 W AGN Seyf.1 15.0 28 IDP+ 22 49 52.92 +58 34 48.5 35 71 8 17 6 15.5 3.8 15.9 ps 0 WE LAN 23 blue star 14.0 7 SIM 23 00 34.72 �07 04 23.4 34 42 9 43 9 8.3 7.4 11.1 ps 0 WE BD�07 5906 HD 217411 DA+G5 9.8 18 SIM ID** 23 08 31.22 +57 22 39.9 45 3 0 26 6 0.0 6.3 6.3 p 0 GSC4006.01709 12.5 71 GSC 23 09 53.64 +47 57 35.3 34 49 8 25 6 10.0 6.0 11.7 ps 0 WEX KZ And HD 218738 dK2+dK2 8.0 25 CNS ID** BY 23 12 21.32 +10 47 01.3 21 1672 36 4653 56 120.0 224.8 254.9 ps 0 WE GD 246 WD 2309+105 DA1 13.1 3 MCK ID** 23 13 23.97 +02 40 13.7 74 28 7 22 0 6.1 0.0 6.1 ps: 0 X SZ Psc HD 219113 F8IV+K1IV 7.2 16 STR ID** RS 23 19 24.76 +79 00 05.5 25 62 7 81 6 12.2 18.5 22.1 ps 0 WEX V368 Cep HD 220140 G9V 7.5 6 SIM ID** A 23 24 29.94 �54 41 02.1 23 308 22 667 30 28.4 50.1 57.6 ps 0 WE DA 15.0 34 IDP+ 23 29 22.80 +41 28 44.5 56 18 6 16 6 4.5 3.6 5.8 ps 0 EX G 190�28 dM2e 11.9 38 CNS IDP+ 23 31 51.75 +19 56 14.4 32 33 9 81 11 5.1 10.4 11.6 ps 0 WEX EQ Peg A/B Gl 896A/B M4Ve+M6Ve 10.4 8 CNS ID** 23 34 01.19 �47 13 54.8 34 41 0 396 31 0.0 23.9 23.9 ps 0 WE DA 13.1 32 IDP+ 23 37 33.49 +46 27 58.7 24 150 13 174 13 22.2 24.1 32.7 ps 0 WEX λ And HD 222107 G8III 3.8 29 CNS ID** RS 23 39 30.71 �69 11 32.0 52 20 5 18 0 6.0 0.0 6.0 ps 0 WE CPD�69 3329A/B HD 222259 G5IV+? 8.0 45 SIM IDP+ A 23 52 23.96 +75 32 20.5 40 8 2 18 3 4.5 7.1 8.4 ps 0 WEX Gl 909A/B HD 223778 K3V+M2 6.4 22 CNS IDP+ 23 53 03.36 �24 31 52.5 35 45 10 71 10 6.3 10.1 11.9 ps 0 WE DA 15.4 12 IDP+ 23 53 03.55 �70 23 07.0 24 80 8 711 23 16.1 73.2 75.0 ps 0 WE CPD�71 2778 HD 223816 DA+F5IV 8.8 21 SIM ID** 23 55 03.11 +28 38 06.2 24 131 12 203 17 19.8 26.4 33.0 ps 0 WEX II Peg HD 224085 K2IV 7.4 13 CNS ID** RS 23 55 41.59 +25 08 14.1 26 13 5 21 7 3.5 5.0 6.1 s 0 HD 224168 G5 8.7 29 SIM