Table 4. The Lines Selected For This Atlas

Ion λ(A) remark E.P.(eV) g_t f Types Plotted He II 1640.4 (7 lines) 40.81 8 0.641 O C II 1334.532 0.00 2 0.128 B, A 1335.708 (3 lines) 0.01 4 0.319 B, A C III 1175.67 (6 lines) 6.50 9 0.257 O C IV 1548.195 0.00 2 0.191 O, B 1550.770 0.00 2 0.095 O, B N IV 1718.551 16.20 3 0.179 O N V 1238.821 0.00 2 0.157 O, B0{B2.5 1242.804 0.00 2 0.078 O, B0{B2.5 O IV 1338.612 22.38 2 0.115 O 1343.460 (2 lines) 22.41 4 0.115 O O V 1371.292 19.69 3 0.156 O Mg I 2852.126 0.00 1 1.830 F Mg II 2795.528 0.00 2 0.612 B3{B9.5, A, F 2802.705 0.00 2 0.305 B3{B9.5, A, F Al II 1670.787 0.00 1 1.833 B3{B9.5 2669.155 0.00 1 1.1E-5 A, F Al III 1854.716 0.00 2 0.560 B, A 1862.790 0.00 2 0.279 B, A Si II 1526.707 0.00 2 0.230 B, A 1533.431 0.00 2 0.229 B, A Si III 1206.500 0.00 1 1.669 B, A 1895.46 0.00 1 B3{B9.5, A Si IV 1393.755 0.00 2 0.514 O, B 1402.770 0.00 2 0.255 O, B Ca II 1649.958 0.00 2 1.7E-4 A 1651.991 0.00 2 1.6E-4 A Fe II 2585.876 0.00 10 0.065 A, F 2598.370 0.05 8 0.099 A, F 2599.396 0.00 10 0.224 A, F