Table 3. Basic Properties of Atlas Stars No. HD Type V B � V E_B�_V M_V m � M T_{eff} BC M_{bol} M� R� Γ_e V_{esc} V_{rad} V sin i 1 93250 O3 V((f)) 7.38 0.15 0.48 -6.1 12.1 48500 4.36 -10.5 82.0 15.6 0.38 1112 –0.5 70 2 303308 O3 V((f)) 8.17 0.13 0.46 -5.3 12.1 48500 4.36 -9.7 60.0 10.8 0.25 1261 3 66811 O4 I(n)f 2.25 -0.28 0.03 -6.1 8.0 42400 3.93 -10.0 59.0 16.7 0.34 945 –24.1 208 4 46223 O4 V((f)) 7.25 0.22 0.55 -5.3 10.9 46400 4.21 -9.5 52.0 11.0 0.25 1161 +41.1 95 5 96715 O4 V((f)) 8.26 0.07 0.40 -6.3 13.4 46400 4.21 -10.5 81.0 17.4 0.41 1025 6 14947 O5 If+ 8.00 0.45 0.76 -6.1 11.8 40300 3.78 -9.9 52.0 17.3 0.33 875 –56.2 130 7 15558 O5 III(f) 7.81 0.52 0.84 -6.4 11.7 42300 3.92 -10.3 68.0 19.2 0.38 914 –41.9 SB1O 145 8 15629 O5 V((f)) 8.43 0.42 0.75 -5.5 11.7 44300 4.06 -9.6 50.0 12.3 0.28 1058 9 46150 O5 V((f)) 6.72 0.13 0.46 -5.5 10.9 44300 4.06 -9.6 50.0 12.3 0.28 1058 +38.8 118 10 93204 O5 V((f)) 8.42 0.10 0.43 -4.9 12.1 44300 4.06 -9.0 42.0 9.4 0.19 1179 11 210839 O6 I(n)fp 5.05 0.25 0.56 -6.3 9.5 38200 3.62 -9.9 51.0 19.6 0.35 802 –70.7 214 12 108 O6: f?pe 7.40 0.18 0.49 -6.1 12.0 38200 3.62 -9.7 48.0 17.9 0.31 840 –67.9 100 13 93130 O6 III(f) 8.06 0.22 0.54 -5.6 12.0 40200 3.78 -9.4 43.0 13.8 0.25 942 14 39680 O6 V:[n]pe 7.99 0.02 0.35 -5.3 12.2 42200 3.91 -9.2 42.0 11.6 0.24 1028 +53.4 122 15 91572 O6 V((f)) 8.20 0.05 0.38 -4.9 12.0 42200 3.91 -8.8 38.0 9.6 0.18 1110 16 93146 O6 V((f)) 8.80 0.00 0.33 -4.2 12.0 42200 3.91 -8.1 31.0 7.0 0.12 1224 17 101190 O6 V((f)) 7.32 0.06 0.39 -5.7 11.9 42200 3.91 -9.6 48.0 13.9 0.30 960 +0.7 190 18 163758 O6.5 Iaf 7.31 0.03 0.34 -6.3 12.5 37200 3.56 -9.9 50.0 20.1 0.34 792 –47.7 95 19 148937 O6.5 f?p 6.71 0.34 0.65 -6.0 10.7 37200 3.56 -9.6 44.0 17.5 0.29 823 –43.5 200 20 69464 O6.5 Ib(f) 8.84 0.31 0.62 -6.3 13.2 37200 3.56 -9.9 49.0 20.1 0.35 779 21 190864 O6.5 III(f) 7.76 0.20 0.52 -5.6 11.8 39200 3.70 -9.3 42.0 14.0 0.24 932 –1.1 SB1? 69 22 5005A O6.5 V((f)) 7.76 0.09 0.41 -6.4 12.9 41200 3.85 -10.3 64.0 19.6 0.41 860 –24.8 95 23 12993 O6.5 V 8.95 0.20 0.52 -4.4 11.8 41200 3.85 -8.3 31.0 7.8 0.13 1146 24 42088 O6.5 V 7.55 0.07 0.39 -4.5 10.9 41200 3.85 -8.4 32.0 8.2 0.14 1133 +23.1 136 25 54662 O6.5 V 6.21 0.03 0.35 -5.4 10.6 41200 3.85 -9.3 42.0 12.4 0.25 988 +58.5 70 26 101436 O6.5 V 7.67 0.07 0.39 -5.4 11.9 41200 3.85 -9.3 42.0 12.4 0.25 988 –3.7 SB1? 270 27 192639 O7 Ib(f) 7.11 0.35 0.66 -6.2 11.3 36100 3.48 -9.7 43.0 19.6 0.34 745 –5.3 103 28 34656 O7 II(f) 6.79 0.02 0.34 -4.8 10.6 38100 3.62 -8.4 30.0 9.9 0.15 993 –9.2 106 29 151515 O7 II(f) 7.16 0.18 0.50 -5.7 11.4 38100 3.62 -9.3 41.0 14.9 0.25 885 –8.6 SB1? 115 30 36879 O7 V(n) 7.56 0.22 0.54 -5.5 11.4 40100 3.77 -9.3 41.0 13.2 0.26 939 +25.1 200

Table3. (continued) No. HD Type V B � V E_B�_V M_V m � M T_{eff} BC M_{bol} M� R� Γ_e V_{esc} V_{rad} V sin i 31 91824 O7 V((f)) 8.16 -0.06 0.26 -4.8 12.2 40100 3.77 -8.6 33.0 9.5 0.17 1048 32 162978 O7.5 II((f)) 6.18 0.05 0.36 -5.8 10.9 37100 3.55 -9.4 40.0 16.0 0.27 838 –6.9 50 33 186980 O7.5 III((f) 7.45 0.08 0.39 -5.5 11.7 37100 3.55 -9.1 35.0 13.9 0.23 860 +3.3 70 34 53975 O7.5 V 6.47 -0.10 0.22 -4.8 10.6 39100 3.70 -8.5 31.0 9.7 0.17 1007 +39.7 SB1? 147 35 152590 O7.5 V 8.42 0.14 0.46 -4.4 11.4 39100 3.70 -8.1 28.0 8.1 0.13 1073 36 152408 O8: Iafpe 5.77 0.16 0.45 -7.0 11.4 34000 3.31 -10.3 60.0 29.6 0.42 673 –71.6 130: 37 151804 O8 Iaf 5.22 0.07 0.36 -7.3 11.4 34000 3.31 -10.6 70.0 34.0 0.47 646 –46.7 50 38 175754 O8 II((f)) 7.04 -0.07 0.24 -5.5 11.8 36000 3.46 -9.0 34.0 14.2 0.22 846 +0.5 161 39 36861 O8 III((f)) 3.66 -0.19 0.12 -5.2 8.5 36000 3.46 -8.7 30.0 12.3 0.19 868 +32.8 53 40 46966 O8 V 6.88 -0.04 0.28 -4.8 10.9 38000 3.62 -8.4 29.0 9.9 0.17 964 +35.6 60 41 48279 O8 V 7.97 0.11 0.43 -4.5 11.2 38000 3.62 -8.1 28.0 8.6 0.13 1037 +32.2 SB1? 123 42 101413 O8 V 8.36 0.08 0.40 -4.7 11.9 38000 3.62 -8.3 29.0 9.5 0.15 995 43 14633 ON8 V 7.47 -0.21 0.11 -4.4 11.6 38000 3.62 -8.0 27.0 8.3 0.12 1046 –37.8 SB1? 111 44 112244 O8.5 Iab(f) 5.33 0.01 0.29 -6.6 11.0 33000 3.23 -9.8 46.0 25.2 0.35 674 +18.8 SB1? 70 45 74194 O8.5 Ib(f) 7.54 0.23 0.51 -5.4 11.3 33000 3.23 -8.6 28.0 14.5 0.19 773 –0.2 SB1? 170 46 96917 O8.5 Ib(f) 7.09 0.09 0.37 -6.6 12.5 33000 3.23 -9.8 46.0 25.2 0.35 674 +1.9 SB1? 130 47 46149 O8.5 V 7.61 0.19 0.50 -4.8 10.9 37000 3.54 -8.3 28.0 10.1 0.16 943 +41.1 51 48 149404 O9 Ia 5.50 0.40 0.67 -7.2 10.7 32000 3.14 -10.3 60.0 33.9 0.43 622 –28.0 SB2O 45 49 210809 O9 Iab 7.55 0.05 0.32 -6.2 12.7 32000 3.14 -9.3 38.0 21.4 0.27 705 –81.5 101 50 37043 O9 III 2.77 -0.24 0.07 -5.9 8.5 34000 3.31 -9.2 36.0 17.7 0.25 763 +26.6 SB2O 71 51 46202 O9 V 8.17 0.17 0.48 -4.2 10.9 35900 3.46 -7.7 23.0 7.8 0.10 1002 52 93028 O9 V 8.36 -0.06 0.25 -4.4 12.0 35900 3.46 -7.9 24.0 8.6 0.12 969 53 214680 O9 V 4.87 -0.20 0.11 -4.4 8.9 35900 3.46 -7.9 24.0 8.6 0.12 969 –9.3 32 54 12323 ON9 V 8.90 -0.12 0.19 -3.5 11.8 35900 3.46 -7.0 21.0 5.7 0.06 1152 55 201345 ON9 V 7.66 -0.13 0.18 -4.2 11.3 35900 3.46 -7.7 23.0 7.8 0.10 1002 +21.6 54 56 30614 O9.5 Ia 4.29 0.03 0.28 -6.7 10.2 30900 3.04 -9.7 43.0 27.6 0.34 626 +10.7 85 57 188209 O9.5 Iab 5.64 -0.08 0.17 -6.7 11.8 30900 3.04 -9.7 43.0 27.6 0.34 626 –5.1 70 58 218915 O9.5 Iab 7.18 0.02 0.27 -6.7 13.1 30900 3.04 -9.7 43.0 27.6 0.34 626 –66.9 110 59 209975 O9.5 Ib 5.11 0.09 0.35 -5.7 9.5 30900 3.04 -8.7 29.0 17.4 0.20 713 –15.2 75 60 189957 O9.5 III 7.22 -0.06 0.24 -5.5 12.0 32900 3.22 -8.7 29.0 15.2 0.20 764 +39.1

Table3. (continued) No. HD Type V B � V E_B�_V M_V m � M T_{eff} BC M_{bol} M� R� Γ_e V_{esc} V_{rad} V sin i 61 34078 O9.5 V 5.81 0.46 0.76 -5.0 8.5 34900 3.39 -8.4 27.0 11.6 0.17 859 +54.4 27 62 38666 O9.5 V 5.16 -0.29 0.01 -3.4 8.5 34900 3.39 -6.8 19.0 5.6 0.06 1111 +109.8 97 63 149038 O9.7 Iab 4.89 0.09 0.33 -6.7 10.6 30500 3.00 -9.7 43.0 27.8 0.33 629 +6.5 85 64 152405 O9.7 Ib-II 7.20 0.11 0.38 -5.4 11.4 30500 3.00 -8.4 25.0 15.3 0.17 720 –7.2 SB2? 65 152424 OC9.7 Ia 6.35 0.37 0.61 -7.1 11.4 30500 3.00 -10.1 52.0 33.4 0.39 600 –42.3 SB1? 85 66 105056 ON9.7 Iae 7.55 0.06 0.30 -6.7 13.3 30500 3.00 -9.7 43.0 27.8 0.33 629 –3.4 40 67 123008 ON9.7 Iab 8.83 0.39 0.63 -6.7 13.5 30500 3.00 -9.7 43.0 27.8 0.33 629 68 37128 B0 Iae 1.70 -0.19 0.04 -6.9 8.5c 26000 2.49 -9.4 34.0 33.1 0.30 522 +26 SB 87 69 91969 B0 Ia 6.51 0.01 0.24 -6.1 11.9c 26000 2.49 -8.6 25.0 22.9 0.20 578 –2 96 70 164402 B0 Ib 5.77 0.00 0.24 -6.3 11.3c 26000 2.49 -8.8 27.0 25.1 0.22 566 –13 100 71 204172 B0 Ib 5.94 -0.08 0.16 -5.8 11.2 26000 2.49 -8.3 23.0 20.0 0.16 607 +3 80 72 43818 B0 II 6.92 0.29 0.58 -5.4 10.5 27500 2.69 -8.1 22.0 16.3 0.15 661 +18 99 73 48434 B0 III 5.90 -0.02 0.27 -4.4 9.5 29000 2.88 -7.3 17.0 10.1 0.09 763 +35 70 74 74753 B0 IIIn 5.16 -0.20 0.09 -4.4 9.3 29000 2.88 -7.3 17.0 10.1 0.09 763 +28 288 75 36512 B0 V 4.62 -0.26 0.04 -4.0 8.5c 30000 3.16 -7.2 17.0 8.9 0.09 815 +17V 20 76 149438 B0 V 2.82 -0.25 0.05 -3.3 6.0c 30000 3.16 -6.5 15.0 6.5 0.05 917 +2V 24 77 38771 B0.5 Ia 2.06 -0.17 0.04 -6.6 8.5c 23400 2.18 -8.8 26.0 30.9 0.23 496 +21V? 82 78 150898 B0.5 Ia 5.58 -0.08 0.13 -6.9 12.1 23400 2.18 -9.1 28.0 35.5 0.29 464 –53V 128 79 167756 B0.5 Ia 6.30 -0.11 0.10 -6.9 12.9 23400 2.18 -9.1 28.0 35.5 0.29 464 –25 80 64760 B0.5 Ib 4.24 -0.14 0.08 -6.0 10.0 23400 2.18 -8.2 21.0 23.4 0.17 534 +41 238 81 91943 B0.5 Ib 6.71 0.07 0.29 -6.1 11.9c 23400 2.18 -8.3 21.0 24.5 0.18 517 –7 69 82 213087 B0.5 Ibe 5.46 0.37 0.59 -6.0 9.6 23400 2.18 -8.2 21.0 23.4 0.17 534 –15V 83 184915 B0.5 III 4.36 0.00 0.28 -4.8 8.3 26500 2.43 -7.2 17.0 11.8 0.09 707 –19V 259 84 219188 B0.5 III 7.09 0.06 0.34 -4.8 10.8 26500 2.43 -7.2 17.0 11.8 0.09 707 +62V 265 85 34816 B0.5 IV 4.29 -0.26 0.02 -4.3 8.5c 27700 2.93 -7.2 17.0 10.8 0.09 739 +20 67 86 37061 B0/1 V 6.83 0.26 0.54 -3.6 8.8 27700 2.93 -6.5 15.0 7.8 0.05 832 +40 160 87 96248 B1 Iabe 6.56 0.19 0.38 -6.9 12.3 20800 1.87 -8.8 25.0 38.9 0.23 434 –25 93 88 152236 B1 Iape 4.73 0.49 0.68 -7.8 10.4c 20800 1.87 -9.7 34.0 58.9 0.39 366 –26V 57 89 152235 B1 Iae 6.32 0.50 0.69 -6.9 11.1 20800 1.87 -8.8 26.0 38.9 0.22 445 –36 90 154090 B1 Iae 4.87 0.26 0.45 -6.9 10.4 20800 1.87 -8.8 26.0 38.9 0.22 445 +4V? 91

Table3. (continued) No. HD Type V B � V E_B�_V M_V m � M T_{eff} BC M_{bol} M� R� Γ_e V_{esc} V_{rad} V sin i 91 109867 B1 Ia 6.25 0.06 0.25 -6.9 12.4 20800 1.87 -8.8 26.0 38.9 0.22 445 –16 88 92 47240 B1 Ib 6.15 0.14 0.34 -5.8 10.9c 20800 1.87 -7.7 17.0 23.4 0.12 492 +33V 126 93 52382 B1 Ib 6.49 0.21 0.41 -5.5 10.7c 20800 1.87 -7.4 17.0 20.4 0.09 536 +51 87 94 73658 B1 Ibe 6.88 0.05 0.25 -5.8 11.9 20800 1.87 -7.7 17.0 23.4 0.12 492 95 157246 B1 Ib 3.34 -0.13 0.07 -5.8 8.9 20800 1.87 -7.7 17.0 23.4 0.12 492 –3V 281 96 214080 B1 Ib 6.83 -0.13 0.07 -5.8 12.4 20800 1.87 -7.7 17.0 23.4 0.12 492 +12V 100 97 165793 B1 II 6.58 -0.03 0.23 -5.4 11.3 20800 1.87 -7.3 17.0 19.5 0.09 549 +39V? 98 36591 B1 IV 5.35 -0.19 0.07 -3.8 8.9 25400 2.70 -6.5 14.0 9.2 0.06 741 +34 29 99 50707 B1 IV 4.83 -0.21 0.05 -3.8 8.5 25400 2.70 -6.5 14.0 9.2 0.06 741 +28V 49 100 52918 B1 IV 4.99 -0.20 0.06 -3.8 8.6 25400 2.70 -6.5 14.0 9.2 0.06 741 +25V? 336 101 37303 B1 Vv 6.05 -0.22 0.04 -3.2 9.1 25400 2.70 -5.9 12.0 7.0 0.04 796 +29 260 102 144470 B1 V 3.96 -0.04 0.22 -3.2 6.5 25400 2.70 -5.9 12.0 7.0 0.04 796 –3V 142 103 106343 B1.5 Ia 6.22 0.12 0.30 -6.9 12.2 19700 1.73 -8.6 24.0 40.7 0.23 416 –7 100 104 148379 B1.5 Iape 5.35 0.56 0.74 -6.9 10.0 19700 1.73 -8.6 24.0 40.7 0.23 416 –12V 66 105 190603 B1.5 Iae 5.64 0.54 0.72 -6.9 10.3 19700 1.73 -8.6 24.0 40.7 0.23 416 +21V 29 106 74575 B1.5 III 3.68 -0.18 0.07 -4.2 7.7 22100 2.20 -6.4 13.0 11.6 0.06 637 +15V? 19 107 37481 B1.5 IV 5.96 -0.23 0.02 -3.5 9.4 23700 2.52 -6.0 12.0 8.4 0.04 721 +15V 105 108 136298 B1.5 IV 3.22 -0.22 0.03 -3.5 6.6 23700 2.52 -6.0 12.0 8.4 0.04 721 +0V? 221 109 35299 B1.5 V 5.70 -0.21 0.04 -2.8 8.4 23700 2.52 -5.3 10.0 6.1 0.03 779 +22V 36 110 37744 B1.5 V 6.22 -0.20 0.05 -2.8 8.9 23700 2.52 -5.3 10.0 6.1 0.03 779 +29 35 111 39777 B1.5 V 6.57 -0.18 0.07 -2.8 9.2 23700 2.52 -5.3 10.0 6.1 0.03 779 +25 20 112 74273 B1.5 V 5.90 -0.21 0.04 -2.8 8.6 23700 2.52 -5.3 10.0 6.1 0.03 779 +18 181 113 41117 B2 Iave 4.63 0.28 0.44 -6.9 10.2 18500 1.58 -8.5 25.0 43.4 0.19 422 +17V 36 114 165024 B2 Ib 3.66 -0.08 0.10 -5.7 9.1 18500 1.58 -7.3 16.0 24.8 0.10 471 +3 117 115 206165 B2 Ib 4.73 0.30 0.48 -6.5 9.7c 18500 1.58 -8.1 19.0 35.8 0.18 408 –13V? 36 116 52089 B2 II 1.50 -0.21 0.02 -4.8 6.2 18500 1.58 -6.4 12.0 16.4 0.06 513 +27 44 117 92936 B2 III 7.05 -0.04 0.20 -3.9 10.3 20300 2.02 -5.9 11.0 11.0 0.04 605 –16 118 106490 B2 IV 2.80 -0.23 0.01 -3.1 5.9 22000 2.35 -5.4 10.0 7.5 0.03 701 +22V? 194 119 37356 B2 IV-V 6.19 -0.04 0.20 -2.8 8.4 22000 2.35 -5.2 10.0 6.6 0.02 754 +29 10 120 37776 B2 IV-V 6.96 -0.14 0.10 -2.8 9.5 22000 2.35 -5.2 10.0 6.6 0.02 754 +28 157

Table3. (continued) No. HD Type V B � V E_B�_V M_V m � M T_{eff} BC M_{bol} M� R� Γ_e V_{esc} V_{rad} V sin i 121 39291 B2 IV-V 5.35 -0.20 0.04 -2.8 8.0 22000 2.35 -5.2 10.0 6.6 0.02 754 +20V 164 122 142669 B2 IV-V 3.88 -0.20 0.04 -2.8 6.6 22000 2.35 -5.2 10.0 6.6 0.02 754 –0V? 156 123 36166 B2 V 5.78 -0.20 0.04 -2.5 8.2 22000 2.35 -4.8 9.0 5.7 0.02 768 +12V 175 124 36430 B2 V 6.22 -0.17 0.07 -2.5 8.5 22000 2.35 -4.8 9.0 5.7 0.02 768 +23 25 125 74234 B2 V 6.95 -0.16 0.08 -2.5 9.2 22000 2.35 -4.8 9.0 5.7 0.02 768 +8 233 126 108483 B2 V 3.91 -0.19 0.05 -2.5 6.3 22000 2.35 -4.8 9.0 5.7 0.02 768 +8V 245 127 145482 B2 V 4.59 -0.16 0.08 -2.5 6.8 22000 2.35 -4.8 9.0 5.7 0.02 768 +10V 225 128 148605 B2 V 4.79 -0.11 0.13 -2.5 6.9 22000 2.35 -4.8 9.0 5.7 0.02 768 +4V 232 129 212978 B2 V 6.14 -0.14 0.10 -2.5 8.3 22000 2.35 -4.8 9.0 5.7 0.02 768 –17 115 130 92964 B2.5 Iae 5.38 0.26 0.40 -7.8 11.9c 17400 1.42 -9.2 29.0 68.4 0.33 329 –2 68 131 42087 B2.5 Ibe 5.75 0.21 0.36 -6.2 10.9c 17400 1.42 -7.6 17.0 32.7 0.13 415 +16V 37 132 116084 B2.5 Ib 5.83 0.12 0.27 -5.6 10.6 17400 1.42 -7.0 15.0 24.8 0.08 459 –15 133 166596 B2.5 III 5.47 -0.17 0.05 -3.5 8.8 18700 1.81 -5.3 9.7 9.8 0.03 607 –15V? 197 134 125238 B2.5 IV 3.55 -0.18 0.04 -2.7 6.1 20400 2.15 -4.9 10.0 6.8 0.17 671 +22 370 135 36779 B2.5 V 6.22 -0.17 0.05 -2.0 8.1 20400 2.15 -4.2 8.3 4.9 0.01 799 +4 227 136 175191 B2.5 V 2.02 -0.22 0.00 -2.0 4.0 20400 2.15 -4.2 8.3 4.9 0.01 799 –11V 201 137 144294 B2.5 Vn 4.23 -0.17 0.05 -2.0 6.1 20400 2.15 -4.2 8.3 4.9 0.01 799 +15 309 138 168905 B2.5 Vn 5.25 -0.19 0.03 -2.0 7.2 20400 2.15 -4.2 8.3 4.9 0.01 799 +0 297 139 225094 B3 Iae 6.24 0.33 0.45 -7.2 12.0c 16300 1.26 -8.5 23.0 54.9 0.21 356 –43V? 140 198478 B3 Iae 4.84 0.41 0.53 -6.3 9.5c 16300 1.26 -7.6 17.0 36.3 0.12 396 –7V 35 141 75149 B3 Ia 5.46 0.27 0.39 -7.1 11.4c 16300 1.26 -8.4 23.0 52.4 0.19 368 +26 73 142 53138 B3 Iab 3.02 -0.08 0.05 -6.5 9.4c 16300 1.26 -7.8 19.0 39.8 0.13 398 +48 SB 44 143 43384 B3 Ib 6.25 0.45 0.59 -6.5 10.9c 16300 1.26 -7.8 19.0 39.8 0.13 398 +13V 51 144 51309 B3 II 4.37 -0.07 0.13 -4.5 8.5 16700 1.43 -5.9 11.0 16.3 0.04 496 +41 29 145 21483 B3 III 7.06 0.36 0.56 -3.0 8.3 17100 1.60 -4.6 8.4 8.4 0.02 611 –5 146 198820 B3 III 6.44 -0.15 0.05 -3.0 9.3 17100 1.60 -4.6 8.4 8.4 0.02 611 –18V? 147 209008 B3 III 6.00 -0.12 0.08 -3.0 8.8 17100 1.60 -4.6 8.4 8.4 0.02 611 –7V? 78 148 157038 B4 Ia 6.41 0.64 0.74 -7.0 11.1 14900 1.10 -8.1 20.0 55.7 0.17 337 –14 149 58350 B5 Ia 2.45 -0.08 0.00 -7.0 9.4c 13600 0.95 -7.9 18.0 62.4 0.17 303 +41V 45 150 79186 B5 Ia 5.00 0.23 0.31 -7.0 11.0 13600 0.95 -7.9 18.0 62.4 0.17 303 +34V 61

Table3. (continued) No. HD Type V B � V E_B�_V M_V m � M T_{eff} BC M_{bol} M� R� Γ_e V_{esc} V_{rad} V sin i 151 36371 B5 Iab 4.76 0.34 0.44 -7.2 10.6c 13600 0.95 -8.1 19.0 68.4 0.19 293 –0 SB 41 152 75129 B5 Ib 6.87 0.26 0.36 -5.4 11.2 13600 0.95 -6.3 12.0 29.9 0.06 380 153 86440 B5 Ib 3.54 -0.08 0.02 -5.4 8.9 13600 0.95 -6.3 12.0 29.9 0.06 380 +14 45 154 164353 B5 Ib 3.97 0.02 0.12 -5.4 9.0 13600 0.95 -6.3 12.0 29.9 0.06 380 –4V 22 155 83183 B5 II 4.08 0.01 0.17 -4.0 7.6 14300 1.12 -5.1 9.2 15.3 0.02 473 +22V 0 156 175156 B5 II 5.10 0.17 0.33 -4.0 8.1 14300 1.12 -5.1 9.2 15.3 0.02 473 –3V 19 157 45057 B5 III 6.86 -0.14 0.03 -2.2 9.0 15000 1.30 -3.5 6.8 6.6 0.01 624 +29 86 158 72232 B5 III 5.99 -0.15 0.02 -2.2 8.1 15000 1.30 -3.5 6.8 6.6 0.01 624 +12 159 72798 B5 III 6.45 -0.14 0.03 -2.2 8.6 15000 1.30 -3.5 6.8 6.6 0.01 624 +22V 160 209419 B5 III 5.78 -0.11 0.06 -2.2 7.8 15300 1.30 -3.5 6.8 6.3 0.01 637 –22V? 161 74371 B6 Iae 5.23 0.21 0.27 -7.0 11.4 12600 0.83 -7.8 17.0 68.8 0.16 282 +24 53 162 125288 B6 Ib 4.33 0.12 0.20 -5.3 9.0 12600 0.83 -6.1 11.0 31.4 0.05 356 +4V 10 163 155763 B6 III 3.17 -0.12 0.03 -1.8 4.9 14100 1.13 -2.9 5.9 5.7 0.00 624 –17V 31 164 91619 B7 Iae 6.14 0.35 0.39 -7.0 11.9c 12200 0.78 -7.8 18.0 71.7 0.14 287 +7 52 165 1279 B7 III 5.89 -0.09 0.04 -1.5 7.3 13200 0.97 -2.5 5.4 5.3 0.00 622 –9V 0 166 142514 B7 III 5.75 -0.06 0.07 -1.5 7.0 13200 0.97 -2.5 5.4 5.3 0.00 622 0 167 210424 B7 III 5.46 -0.12 0.01 -1.5 6.9 13200 0.97 -2.5 5.4 5.3 0.00 622 +3V? 18 168 34085 B8 Iae 0.12 -0.03 0.00 -8.4 8.5c 11200 0.66 -9.1 26.0 153.3 0.32 210 +21 SB 33 169 166937 B8 Iape 3.86 0.23 0.25 -8.2 11.3c 11200 0.66 -8.9 25.0 139.8 0.28 222 –6 SB ¡54 170 199478 B8 Iae 5.67 0.47 0.49 -7.1 11.3 11200 0.66 -7.8 18.0 84.3 0.14 265 –15V 171 12301 B8 Ib 5.58 0.38 0.42 -5.2 9.5 11200 0.66 -5.9 11.0 35.1 0.04 339 –20 172 46769 B8 Ib 5.80 0.00 0.04 -5.2 10.9 11200 0.66 -5.9 11.0 35.1 0.04 339 +10 173 208501 B8 Ib 5.80 0.73 0.77 -6.3 9.7c 11200 0.66 -7.0 12.0 58.3 0.10 266 –15V 53 174 53244 B8 II 4.12 -0.12 0.00 -3.1 7.2 11800 0.74 -3.8 7.3 12.5 0.01 470 +32V 27 175 47670 B8 III 3.17 -0.11 0.00 -1.2 4.4 12400 0.82 -2.0 4.8 4.9 0.00 611 +28 SB 228 176 202850 B9 Iab 4.23 0.12 0.14 -6.2 10.0 10300 0.52 -6.7 11.0 61.7 0.09 249 –4 SB 28 177 212593 B9 Iab 4.57 0.09 0.11 -6.2 10.4 10300 0.52 -6.7 11.0 61.7 0.09 249 –26 27 178 46885 B9 III 6.55 -0.06 0.01 -0.6 7.1 11000 0.71 -1.3 4.1 4.5 0.00 590 +13V 35 179 100841 B9 III 3.13 -0.04 0.03 -0.6 3.6 11000 0.71 -1.3 4.1 4.5 0.00 590 –1V 0 180 144206 B9 III 4.76 -0.11 0.00 -0.6 5.4 11000 0.71 -1.3 4.1 4.5 0.00 590 +3 6

Table3. (continued) No. HD Type V B � V E_B�_V M_V m � M T_{eff} BC M_{bol} M� R� Γ_e V_{esc} V_{rad} V sin i 181 176437 B9 III 3.24 -0.05 0.02 -0.6 3.8 11000 0.71 -1.3 4.1 4.5 0.00 590 –21V 76 182 192907 B9 III 4.39 -0.05 0.02 -0.6 4.9 11000 0.71 -1.3 4.1 4.5 0.00 590 –23V 18 183 198667 B9 III 5.55 -0.08 0.00 -0.6 6.2 11000 0.71 -1.3 4.1 4.5 0.00 590 –2V 50 184 169022 B9.5 III 1.85 -0.03 0.02 -0.3 2.1 10000 0.46 -0.8 3.7 4.2 0.00 579 –15 140 185 21389 A0 Iae 4.54 0.56 0.54 -7.2 10.1c 9730 0.41 -7.6 14.0 104.2 0.08 217 –6 SB 6 186 92207 A0 Iae 5.45 0.50 0.48 -7.9 11.9c 9730 0.41 -8.3 22.0 143.8 0.09 230 –9 SB 56 187 223960 A0 Iae 6.90 0.71 0.69 -7.2 12.0c 9730 0.41 -7.6 14.0 104.2 0.08 217 –48V 188 46300 A0 Ib 4.50 0.00 0.01 -4.8 9.3c 9730 0.41 -5.2 9.5 34.5 0.01 322 +12 17 189 87737 A0 Ib 3.52 -0.03 0.00 -5.2 8.7 9730 0.41 -5.6 10.0 41.5 0.02 301 +3V 20 190 175687 A0 II 5.08 0.13 0.16 -3.0 7.6 9910 0.42 -3.4 6.7 14.6 0.00 418 +2 14 191 12953 A1 Iae 5.79 0.61 0.59 -7.8 11.8c 9230 0.32 -8.1 19.0 146.4 0.09 212 –36V 18 192 14433 A1-3 Ia 6.39 0.58 0.55 -7.1 11.8c 9080 0.28 -7.4 17.0 107.6 0.05 239 –47V ¡45 193 197345 A2 Iae 1.25 0.09 0.06 -8.4 9.5c 9080 0.28 -8.7 24.0 195.8 0.12 203 –5V 21 194 14489 A2 Ia 5.17 0.37 0.34 -7.7 11.8c 9080 0.28 -8.0 20.0 141.9 0.08 223 –15 25 195 207260 A2 Ia 4.29 0.52 0.49 -6.9 9.7c 9080 0.28 -7.2 16.0 98.2 0.05 244 –21V 33 196 62623 A2 Iabe 3.96 0.18 0.15 -6.5 10.0 9080 0.28 -6.8 15.0 81.6 0.03 260 +25 SB 73 197 182564 A2 IIIs 4.59 0.02 0.00 0.3 4.3 9000 0.20 0.1 3.0 3.5 0.00 572 –29 27 198 223385 A3 Iae 5.43 0.67 0.62 -8.5 12.0c 8770 0.21 -8.7 25.0 212.9 0.12 199 –46 SB? 50 199 17378 A5 Ia 6.25 0.89 0.80 -8.0 11.8c 8510 0.13 -8.1 20.0 173.1 0.09 201 –38V 37 200 59612 A5 Ib 4.85 0.23 0.14 -5.1 9.5 8510 0.13 -5.2 9.5 45.5 0.01 280 +37 26 201 34578 A5 II 5.03 0.27 0.16 -2.8 7.3 8300 0.14 -2.9 5.9 16.7 0.00 367 –5 16 202 74272 A5 II 4.77 0.12 0.01 -2.8 7.5 8300 0.14 -2.9 5.9 16.7 0.00 367 +17 SB 0 203 147084 A5 II 4.55 0.84 0.73 -2.8 5.1 8300 0.14 -2.9 5.9 16.7 0.00 367 –8 7 204 97534 A6 Iae 4.60 0.55 0.45 -7.5 10.7 8330 0.10 -7.6 17.0 141.5 0.06 207 –8 34 205 73634 A6 II 4.14 0.11 0.00 -2.7 6.8 8100 0.09 -2.8 5.7 16.3 0.00 364 +19 0 206 148743 A7 Ib 6.50 0.37 0.24 -5.1 10.9 8150 0.06 -5.2 9.4 48.1 0.01 272 +2 SB? 30 207 80404 A8 Ib 2.25 0.18 0.04 -5.1 7.2 7950 0.03 -5.1 9.4 49.8 0.01 267 +13 0 208 85123 A8 Ib 2.96 0.27 0.13 -5.1 7.7 7950 0.03 -5.1 9.4 49.8 0.01 267 +14 0 209 196379 A9 II 6.11 0.41 0.20 -2.5 8.0 7560 0.06 -2.6 5.4 16.9 0.00 349 –13 3 210 7927 F0 Ia 4.98 0.68 0.51 -8.0 11.4 7700 0.01 -8.0 19.0 200.0 0.00 190 –24 SB 27

Table3. (continued) No. HD Type V B � V E_B�_V M_V m � M T_{eff} BC M_{bol} M� R� Γ_e V_{esc} V_{rad} V sin i 211 36673 F0 Ib 2.58 0.21 0.02 -5.1 7.6 7700 0.01 -5.1 9.3 52.6 0.00 260 +24 13 212 45348 F0 II -0.72 0.15 0.00 -2.5 1.8 7420 0.06 -2.6 5.5 17.5 0.00 346 +21 0 213 135153 F1 II 4.91 0.37 0.10 -2.4 7.0 7200 0.06 -2.5 5.3 17.8 0.00 337 –23 0 214 159532 F1 II 1.87 0.40 0.13 -2.4 3.9 7200 0.06 -2.5 5.3 17.8 0.00 337 +1 105 215 182835 F2 Ib 4.66 0.60 0.37 -5.1 8.6 7350 0.00 -5.1 9.2 57.5 0.00 247 –1 13 216 90853 F2 II 3.82 0.31 0.01 -2.4 6.2 7110 0.06 -2.5 5.3 18.2 0.00 333 +9 22 217 164136 F2 II 4.41 0.39 0.09 -2.4 6.5 7100 0.06 -2.5 5.3 18.3 0.00 333 –22 28 218 74180 F3 Ia 3.84 0.71 0.46 -9.0 11.4c 7200 0.00 -9.0 27.0 360.9 0.00 169 +25V 38 219 112374 F3 Ia 6.62 0.68 0.43 -8.0 13.3 7200 0.00 -8.0 20.0 227.7 0.00 183 –24 220 161796 F3 Ib 7.04 0.46 0.20 -5.1 11.5 7200 0.00 -5.1 9.3 59.9 0.00 243 –53V 221 20902 F5 Ib 1.79 0.48 0.15 -5.1 6.4 6900 0.03 -5.1 9.3 66.1 0.00 232 –2 18 222 198726 F5 Ib 5.77 0.72 0.39 -5.1 9.7 6900 0.03 -5.1 9.3 66.1 0.00 232 –1 SB 223 23230 F5 II 3.77 0.42 0.04 -2.3 5.9 6900 0.03 -2.3 5.2 18.2 0.00 330 –13 44 224 37350 F6 Ia 3.76 0.82 0.43 -8.0 10.4 6600 0.03 -8.0 20.0 274.8 0.00 167 +7V 0 225 187929 F6 Ibv 3.90 0.89 0.48 -5.1 7.5 6600 0.03 -5.1 9.3 72.3 0.00 222 –15 SB 0 226 57623 F6 II 3.98 0.79 0.34 -2.3 5.2 6490 0.08 -2.4 5.2 21.1 0.00 307 +23 0 227 171635 F7 Ib 4.77 0.61 0.13 -5.1 9.5 6400 0.07 -5.2 9.4 78.3 0.00 214 –12V 18 228 8890 F7 Ib-III 2.02 0.60 0.10 -2.3 4.0 6400 0.07 -2.4 5.2 21.6 0.00 303 –17 SB 17 229 65228 F7 II 4.20 0.72 0.22 -2.3 5.8 6330 0.11 -2.4 5.2 22.5 0.00 297 +14 21 230 54605 F8 Ia 1.84 0.68 0.12 -7.9 9.4c 6100 0.09 -8.0 19.0 315.8 0.00 152 +34 SB 28 231 194093 F8 Ib 2.20 0.68 0.12 -5.1 6.9 6100 0.09 -5.2 9.4 87.0 0.00 203 –8 20 232 172365 F8 Ib-II 6.38 0.78 0.21 -3.7 9.4 6100 0.09 -3.8 7.2 45.6 0.00 245 –19