2400 2600 2800 3000 3200 0

20

40

60 1305+0658

1600 1800 2000 2200 0

100

200

300 1309+3531

2400 2600 2800 3000 3200 0

50

100

150 1317+2743

2400 2600 2800 3000 3200 0

50

100

150

1317+5203