1600 1800 2000 2200 0 200 400 600 800 1000

1200

1116+2135

2400 2600 2800 3000 3200 0

10

20

30 1118+1252

2400 2600 2800 3000 3200 0

20

40

60 1127-1432

1600 1800 2000 2200 0

50

100

150

200

1130+1108