1600 1800 2000 2200 0

200

400

600 2112+0556

1600 1800 2000 2200 0 200 400 600 800 1000 2128-1220

1600 1800 2000 2200 0

100

200

300

400 2135-1446

1600 1800 2000 2200 0 100 200 300 400 500

2141+1730