2400 2600 2800 3000 3200 0

20

40

60

1416+0642

2400 2600 2800 3000 3200 0

50

100

150 1424-1150

1600 1800 2000 2200 0 50 100 150 200 250

1425+2645

1600 1800 2000 2200 0

100

200

300 1427+4800