Table 1. UBVRI polarimetric observations

Observed Intracluster Star^a HD/BD/H^b filter Pλ ϵp θλ ϵθ n^c Pλ ϵp θλ ϵθ % ffi % ffi

25 U 4.54 5.92 73.9 26.2 4 .... .... .... .... B 11.49 3.03 80.8 7.4 .... .... .... .... V 5.64 0.91 52.5 4.6 .... .... .... .... R 4.03 0.80 53.3 5.6 .... .... .... .... I 5.24 1.30 65.4 7.0 .... .... .... ....

150 BD -13ffi4921 U 3.39 0.67 56.1 5.6 4 2.42 0.67 45.0 7.7 H 10 B 3.19 0.95 79.9 8.3 1.49 0.95 85.3 17.8 V 2.40 0.31 72.1 3.6 0.58 0.31 61.7 15.0 R 2.64 0.36 67.5 3.8 1.03 0.36 53.4 9.8 I 2.79 0.45 76.2 4.6 1.19 0.45 77.4 10.6 166 U 4.55 0.57 88.8 3.5 4 3.31 0.57 94.6 4.84 B 4.58 0.82 77.1 5.1 2.84 0.82 78.2 8.1 V 3.10 0.41 60.1 3.8 1.76 0.41 43.9 6.5 R 3.86 0.43 62.6 3.2 2.36 0.43 53.0 5.1 I 4.19 0.49 54.0 3.3 3.21 0.49 44.1 4.3 175 BD -13ffi4923 U 5.52 1.37 59.4 7.0 4 4.34 1.37 54.2 8.8 B 5.37 0.71 60.1 3.7 3.97 0.70 53.7 4.9 V 4.64 0.60 51.5 3.7 3.65 0.60 40.4 4.6 R 4.21 0.58 47.2 3.9 3.54 0.58 34.7 4.6 I 2.54 0.90 49.6 9.7 1.99 0.90 30.1 12.7 197 HD 168075 U 1.04 0.53 108.5 13.5 4 1.42 0.53 144.3 10.5 BD -13ffi4925 B 1.35 0.53 92.3 10.7 0.98 0.53 140.1 15.1 V 1.64 0.69 88.5 11.5 0.83 0.69 134.8 23.3 R 1.61 0.66 81.8 11.1 0.43 0.66 136.9 43.0 I 1.98 0.70 77.8 9.7 0.41 0.70 87.7 47.8 205 HD 168076 U 2.28 0.30 78.4 3.7 4 0.83 0.30 83.9 10.14 BD -13ffi4926 B 1.88 0.36 76.5 5.5 0.16 0.36 90.3 63.0 V 1.97 0.29 67.2 4.2 0.55 0.29 31.6 14.8 R 2.35 0.14 62.8 1.7 1.05 0.14 39.5 3.7 I 2.14 0.22 62.9 3.0 1.96 0.22 40.8 6.4 213 U 20.56 3.12 27.2 4.3 4 .... .... .... .... B 4.99 2.29 36.8 12.3 .... .... .... .... V 4.18 0.45 63.1 3.0 .... .... .... .... R 4.93 0.25 62.4 1.5 .... .... .... .... I 4.05 0.56 66.0 4.0 .... .... .... ....

223 U 3.00 0.08 62.1 0.8 8 1.80 0.08 51.4 1.2 B 3.83 0.09 61.4 0.7 2.43 0.09 51.7 1.0 V 4.18 0.45 63.1 3.0 2.38 0.10 48.2 1.2 R 3.90 0.03 62.4 0.2 2.41 0.03 52.9 0.3 I 3.51 0.05 63.7 0.4 2.14 0.05 55.1 0.6 231 H 17 U 3.91 0.17 71.1 1.2 20 2.46 0.17 68.6 1.9 B 4.96 0.15 68.5 0.9 3.30 0.15 64.9 1.3 V 5.11 0.07 65.5 0.4 3.41 0.07 60.2 0.6 R 5.22 0.09 67.8 0.5 3.51 0.09 64.0 0.7 I 4.81 0.15 70.7 0.9 3.25 0.15 68.4 1.3 235 U 3.92 0.22 71.1 1.6 8 2.47 0.22 68.6 2.5 B 4.59 0.24 69.8 1.5 2.90 0.24 66.5 2.3 V 4.76 0.17 68.5 1.0 2.97 0.17 64.2 1.6 R 5.07 0.16 71.0 0.9 3.30 0.16 68.7 1.3 I 4.42 0.15 72.9 1.0 2.83 0.15 71.5 1.5

Table 1. continued

Observed Intracluster Star^a HD/BD/H^b filter Pλ ϵp θλ ϵθ n^c Pλ ϵp θλ ϵθ % ffi % ffi

245 U 9.97 1.90 59.3 5.4 4 8.78 1.90 56.1 6.1 B 4.67 1.30 68.4 7.8 3.01 1.30 64.4 12.1 V 3.75 0.63 68.1 4.7 2.00 0.63 61.4 8.8 R 2.44 1.05 70.9 11.6 0.71 1.05 59.5 41.4 I 2.49 1.50 62.2 15.5 1.27 1.50 45.3 33.1 246 BD -13ffi4927 U 3.94 0.26 68.5 1.9 4 2.53 0.26 64.6 2.9 H 7 B 4.09 0.32 69.0 2.2 2.42 0.32 64.5 3.7 V 4.19 0.18 64.2 1.2 2.56 0.18 56.2 2.0 R 4.37 0.17 66.9 1.1 2.70 0.17 61.3 1.8 I 3.89 0.15 67.1 1.1 2.40 0.15 61.7 1.8 251 U 5.55 0.40 71.9 2.1 8 4.09 0.40 70.7 2.7 B 5.22 0.42 69.7 2.3 3.53 0.42 67.0 3.3 V 5.25 0.46 63.9 2.5 3.60 0.46 58.1 3.6 R 5.07 0.45 68.9 2.5 3.33 0.45 65.5 3.8 I 5.54 0.56 76.6 2.9 3.94 0.56 77.1 4.0 254 U 2.44 0.24 71.6 2.9 8 1.00 0.24 66.1 6.7 B 2.80 0.07 69.2 0.8 1.15 0.07 59.9 1.7 V 2.62 0.12 68.7 1.3 0.91 0.12 54.7 3.7 R 2.75 0.07 67.9 0.7 1.11 0.07 55.6 1.8 I 2.26 0.10 68.6 1.2 0.79 0.10 54.7 3.5 259 U 3.90 0.26 80.5 1.9 2 2.46 0.26 83.6 2.9 B 4.62 0.26 85.8 1.6 3.06 0.26 91.7 2.4 V 3.91 0.28 72.5 2.0 2.06 0.28 70.0 3.8 R 4.53 0.15 68.2 0.9 2.82 0.14 63.7 1.4 I 4.07 0.26 68.8 1.8 2.54 0.26 64.7 2.9 275 U 2.54 0.27 95.8 3.0 4 1.72 0.27 112.9 4.4 B 2.07 0.21 91.5 2.9 1.11 0.21 120.2 5.3 V 2.53 0.09 81.2 1.0 0.80 0.09 95.5 3.1 R 2.86 0.16 76.6 1.6 1.06 0.16 78.8 4.2 I 2.28 0.32 76.3 4.0 0.68 0.32 78.6 13.2 280 BD -13ffi4928 U 5.26 2.40 46.4 12.3 6 4.64 2.40 38.6 14.5 B 3.92 1.38 61.5 9.7 2.51 1.38 52.1 15.4 V 3.44 1.30 62.7 10.4 1.92 1.30 50.5 19.0 R 4.73 1.38 55.1 8.1 3.56 1.38 45.5 10.9 I 3.03 1.45 48.8 12.8 2.43 1.45 33.0 16.7 296 U 3.90 2.03 69.3 13.8 4 .... .... .... .... B 3.95 1.72 84.7 11.8 .... .... .... .... V 1.20 0.75 60.9 15.9 .... .... .... .... R 1.92 1.05 82.4 14.3 .... .... .... .... I 3.59 0.89 67.7 7.0 .... .... .... ....

297 U 3.21 0.38 69.1 3.3 21 1.79 0.38 64.0 5.9 B 4.22 0.23 67.9 1.6 2.58 0.23 62.9 2.5 V 3.67 0.14 69.0 1.1 1.89 0.14 62.8 2.1 R 3.93 0.13 70.7 1.0 2.17 0.13 66.9 1.7 I 3.54 0.25 71.4 2.0 1.96 0.25 68.2 3.6 301 U 2.01 0.15 71.2 2.2 8 0.59 0.15 60.7 7.1 B 2.82 0.13 75.8 1.3 1.08 0.13 76.6 3.4 V 2.72 0.08 71.4 0.8 0.91 0.08 63.3 2.5 R 2.52 0.06 73.8 0.6 0.73 0.06 70.1 1.9 I 2.17 0.10 76.8 1.3 0.58 0.10 81.0 4.8

Table 1. continued

Observed Intracluster Star^a HD/BD/H^b filter Pλ ϵp θλ ϵθ n^c Pλ ϵp θλ ϵθ % ffi % ffi

306 U 3.37 0.33 77.2 2.8 12 1.91 0.33 78.7 4.8 B 3.84 0.20 76.6 1.5 2.10 0.20 77.7 2.7 V 3.61 0.20 73.8 1.6 1.75 0.20 72.2 3.2 R 3.58 0.16 74.1 1.3 1.78 0.16 72.9 2.5 I 2.77 0.21 72.4 2.2 1.19 0.21 68.5 4.9 307 H 21 U 4.18 3.39 44.0 19.5 4 .... .... .... .... B 2.67 2.08 69.3 19.0 .... .... .... .... V 2.42 0.67 55.4 7.8 .... .... .... .... R 2.13 0.45 65.2 5.9 .... .... .... .... I 2.87 0.89 47.5 8.6 .... .... .... ....

311 U 1.85 0.22 69.8 3.4 12 0.49 0.22 52.2 12.6 B 3.10 0.19 64.5 1.8 1.62 0.19 52.8 3.3 V 2.96 0.15 63.7 1.5 1.45 0.15 48.4 3.1 R 3.06 0.10 65.8 0.9 1.48 0.10 54.1 1.9 I 2.76 0.16 67.8 1.6 1.29 0.16 58.4 3.5 313 U 1.48 0.29 75.9 5.4 8 0.03 0.28 113.1 26.1 B 2.06 0.24 77.2 3.3 0.34 0.24 87.0 19.8 V 2.37 0.10 74.6 1.3 0.50 0.10 72.0 5.6 R 2.25 0.07 77.3 0.9 0.47 0.07 85.1 4.2 I 2.23 0.26 80.7 3.3 0.72 0.26 92.9 10.1 314 BD -13ffi4929 U 2.60 0.23 80.5 2.5 4 1.18 0.23 87.0 5.5 H 9 B 3.15 0.08 75.5 0.7 1.41 0.08 75.7 1.6 V 3.36 0.11 73.7 0.9 1.50 0.11 71.7 2.1 R 3.34 0.08 77.3 0.7 1.55 0.08 79.6 1.4 I 2.94 0.08 79.3 0.8 1.38 0.08 83.9 1.6 343 U 2.04 0.48 69.5 6.6 16 0.66 0.48 56.2 20.4 B 3.19 0.29 71.4 2.6 1.49 0.29 66.2 5.4 V 3.50 0.17 69.6 1.4 1.70 0.17 63.3 2.8 R 3.52 0.20 73.5 1.6 1.73 0.20 71.6 3.2 I 3.41 0.21 76.0 1.7 1.81 0.21 76.6 3.2 349* U 1.77 0.35 77.4 5.7 22 .... .... .... .... B 1.62 0.08 80.4 1.4 .... .... .... .... V 1.65 0.02 76.8 0.4 .... .... .... .... R 1.76 0.02 80.4 0.3 .... .... .... .... I 1.55 0.04 81.2 0.7 .... .... .... ....

351 U 2.09 0.55 71.1 7.3 8 0.67 0.55 61.7 23.0 B 3.18 0.49 88.7 4.4 1.81 0.49 101.6 7.6 V 3.42 0.59 80.2 4.9 1.61 0.59 85.9 10.3 R 3.07 0.60 83.2 5.6 1.42 0.60 93.3 11.8 I 2.39 0.58 68.2 6.8 0.92 0.58 55.7 17.7 367* BD -13ffi4930 U 1.70 0.31 87.9 5.2 4 .... .... .... .... H 5 B 1.96 0.17 86.7 2.5 .... .... .... .... V 2.13 0.27 76.4 3.7 .... .... .... .... R 2.11 0.17 68.9 2.3 .... .... .... .... I 2.10 0.29 65.5 4.0 .... .... .... ....

371 U 2.99 0.94 88.0 8.7 8 .... .... .... .... B 1.91 0.95 84.8 13.2 .... .... .... .... V 1.59 0.53 53.0 9.3 .... .... .... .... R 2.33 0.71 58.7 8.5 .... .... .... .... I 2.04 1.46 104.1 17.8 .... .... .... ....

Table 1. continued

Observed Intracluster Star^a HD/BD/H^b filter Pλ ϵp θλ ϵθ n^c Pλ ϵp θλ ϵθ % ffi % ffi

374* U 3.09 0.65 74.1 6.0 16 .... .... .... .... B 1.86 0.29 72.0 4.5 .... .... .... .... V 1.94 0.07 71.2 1.1 .... .... .... .... R 1.96 0.06 73.8 0.8 .... .... .... .... I 1.82 0.10 76.0 1.6 .... .... .... ....

388 U 5.26 1.89 94.7 9.9 8 .... .... .... .... B 3.40 1.25 75.0 10.1 .... .... .... .... V 1.36 0.41 73.3 8.4 .... .... .... .... R 2.87 0.27 83.2 2.7 .... .... .... .... I 1.21 0.61 38.9 13.4 .... .... .... ....

401 HD 168137 U 2.60 0.20 60.4 2.2 4 1.51 0.20 45.9 3.7 BD -13ffi4932 B 2.61 0.15 88.6 1.7 1.31 0.15 106.8 3.2 H 4 V 3.30 0.19 90.1 1.7 1.92 0.19 104.5 2.8 R 3.03 0.18 75.3 1.7 1.23 0.18 75.3 4.1 I 2.64 0.10 82.5 1.0 1.16 0.10 92.5 2.4 402 U 2.31 0.67 140.9 8.1 10 .... .... .... .... B 0.76 0.41 137.1 4.2 .... .... .... .... V 0.51 0.23 86.1 11.9 .... .... .... .... R 0.60 0.19 93.2 8.8 .... .... .... .... I 0.75 0.18 87.1 6.7 .... .... .... ....

406 U 2.87 1.87 90.0 16.5 4 1.75 1.87 102.2 29.9 B 1.79 0.25 99.7 4.0 1.46 0.25 131.7 4.8 V 2.27 0.35 87.0 4.4 0.93 0.35 113.6 10.5 R 2.33 0.23 81.8 2.8 0.70 0.23 99.5 9.2 I 2.22 0.27 74.9 3.5 0.62 0.27 73.9 12.2 411 U 4.33 0.88 82.8 5.7 10 .... .... .... .... B 2.09 0.11 73.0 1.5 .... .... .... .... V 1.88 0.03 78.4 0.4 .... .... .... .... R 1.89 0.02 77.8 0.3 .... .... .... .... I 1.66 0.04 78.2 0.8 .... .... .... ....

444 BD -13ffi4934 U 2.69 1.47 92.6 14.4 4 1.69 1.47 107.4 24.3 H 6 B 4.07 1.10 88.2 7.6 2.61 1.10 96.6 11.8 V 3.14 0.67 67.4 6.0 1.44 0.67 57.0 13.0 R 3.90 1.16 58.6 0.3 2.59 1.16 47.4 12.5 I 2.10 1.13 45.1 14.1 1.91 1.13 21.8 16.4 455* U 1.38 0.24 83.2 4.9 4 .... .... .... .... B 1.65 0.13 77.2 2.3 .... .... .... .... V 1.51 0.06 76.8 1.1 .... .... .... .... R 1.56 0.08 76.5 1.4 .... .... .... .... I 1.00 0.13 77.0 3.6 .... .... .... ....

503 BD -13ffi4936 U 0.76 0.42 98.0 14.7 4 1.09 0.43 150.5 11.0 B 0.80 0.17 89.2 6.1 1.10 0.17 155.3 4.3 V 0.74 0.10 89.4 4.1 1.27 0.10 157.4 2.2 R 0.73 0.08 96.4 3.2 1.35 0.08 154.7 1.7 I 0.51 0.06 102.8 3.4 1.37 0.06 156.3 1.2

a Walker 1961.

b Identifications from Henry Draper, Bonner Durchmusterung or Hoag et. al. 1961 c number of integrations.