HS 1811+5400 z=0.886

4000 5000 6000 7000 8000 [Å] Wavelength

020406080Flux

HS 2130+0839 z=0.947

4000 5000 6000 7000 8000 [Å] Wavelength

0100200Flux

HS 1003+4733 z=0.981

4000 5000 6000 [Å] Wavelength

0.51.5Flux

HS 0942+4646 z=0.993

4000 5000 6000 7000 [Å] Wavelength

0.51.5[10e-16]

Flux

HS 0951+4642 z=0.997

4000 5000 6000 7000 [Å] Wavelength

0123456[10e-16]

HS 0945+4630 z=1.000

4000 5000 6000 [Å] Wavelength HS 0219+0309 z=1.021

4000 5000 6000 [Å] Wavelength

0.51.5[10e-15]

HS 0240+0840 z=1.070

4000 5000 6000 7000 [Å] Wavelength HS 0734+6226 z=1.076

4000 5000 6000 [Å] Wavelength

02468[10e-16]

HS 1803+7517 z=1.083

4000 5000 6000 [Å] Wavelength HS 0804+6218 z=1.135

4000 5000 6000 [Å] Wavelength

HS 0955+4704 z=1.161

4000 5000 6000 [Å] Wavelength