HS 1231+4814 z=0.380

4000 5000 6000 [Å] Wavelength

1234[10e-16]

Flux

HS 0940+4820 z=0.393

4000 5000 6000 7000 [Å] Wavelength

-11357[10e-16]

HS 0956+4819 z=0.400

4000 5000 6000 7000 [Å] Wavelength

01234[10e-16]

HS 0959+4944 z=0.403

4000 5000 6000 [Å] Wavelength

0510Flux

HS 0955+4753 z=0.418

4000 5000 6000 7000 [Å] Wavelength

0123456[10e-16]

HS 0041+0117 z=0.428

4000 5000 6000 [Å] Wavelength

02468[10e-16]

HS 1706+6901 z=0.449

4000 5000 6000 7000 [Å] Wavelength

012[10e-15]

HS 0239+0732 z=0.450

4000 5000 6000 7000 [Å] Wavelength

0.51[10e-15]

HS 1638+6121 z=0.456

4000 5000 6000 [Å] Wavelength

HS 1251+4825 z=0.503

4000 5000 6000 [Å] Wavelength HS 1232+3410 z=0.526

4000 5000 6000 [Å] Wavelength

0123Flux

HS 1001+4840 z=0.562

4000 5000 6000 [Å] Wavelength