HS 1232+4645 z=2.215

4000 5000 6000 [Å] Wavelength

0.20.40.6Flux

HS 1250+4521 z=2.238

4000 5000 6000 [Å] Wavelength

13579[10e-16]

Flux

HS 0940+4806 z=2.243

4000 5000 6000 7000 [Å] Wavelength

012345[10e-16]

HS 1703+5350 z=2.367

5000 6000 [Å] Wavelength

0100200Flux

HS 1002+4820 z=2.370

4000 5000 6000 7000 [Å] Wavelength

0.51[10e-15]

HS 0727+6342 z=2.371

4000 5000 6000 [Å] Wavelength

0123456[10e-16]

HS 1404+3203 z=2.394

4000 5000 6000 7000 [Å] Wavelength

0100300Flux

HS 0131+0832 z=2.407

4000 5000 6000 [Å] Wavelength

0100300500Flux

HS 0211+1858 z=2.471

4000 5000 6000 [Å] Wavelength

02468[10e-16]

HS 1234+4550 z=2.552

4000 5000 6000 [Å] Wavelength HS 0751+6107 z=2.607

4000 5000 6000 [Å] Wavelength

HS 0202+1848 z=2.703

4000 5000 6000 [Å] Wavelength