HS 1848+6705 z=2.022

4000 5000 6000 [Å] Wavelength

0.51.5[10e-15]

Flux

HS 1001+4940 z=2.025

4000 5000 6000 7000 [Å] Wavelength

012345[10e-16]

HS 0843+2734 z=2.028

4000 5000 6000 [Å] Wavelength

HS 0955+4837 z=2.037

4000 5000 6000 7000 [Å] Wavelength

0.51[10e-16]

HS 0227+0558 z=2.050

4000 5000 6000 7000 [Å] Wavelength

0.51[10e-15]

HS 1240+4706 z=2.100

4000 5000 6000 [Å] Wavelength

12345678[10e-16]

HS 1227+4537 z=2.101

4000 5000 6000 [Å] Wavelength

HS 0952+5015 z=2.107

4000 5000 6000 [Å] Wavelength

02468[10e-16]

HS 1227+4641 z=2.154

4000 5000 6000 [Å] Wavelength

HS 0958+4716 z=2.165

4000 5000 6000 7000 [Å] Wavelength HS 1249+4518 z=2.171

4000 5000 6000 [Å] Wavelength

0123[10e-16]

HS 1235+4919 z=2.179

4000 5000 6000 [Å] Wavelength

12[10e-16]