Table 3. Maximum luminosity (Vmax) and corresponding colors for the program stars; standard deviations (œ) for the v-c and ck-c V-band differential magnitudes for each series of N nights; inferred spectral classification (Spectral Type)

Program Vmax U-B B-V V-Rc V-Ic œ œ N Spectral Star (v-c) (ck-c) Type HD 5303 7.56 0.17 0.68 0.43 0.89 95 6 14 G0 V/IV + K4 V/IV HD 8435 8.83 0.32 0.77 0.42 0.89 14 6 8 G7/8 V/IV + K3/5 V HD 16157 8.70 1.09 1.35 0.86 1.79 39 4 6 K7 V + M1 V HD 32918 7.93 0.67 1.05 0.57 1.14 62 3 6 K1 III HD 155555 6.85 0.39 0.81 0.47 0.92 37 6 9 G5 IV + K0 IV HD 174429 8.44 0.30 0.79 0.45 0.87 11 6 12 K0 (PMS) HD 197481 8.70 1.13 1.47 0.94 2.06 25 10 7 M1 Ve HD 214479 9.09 1.08 1.46 0.94 2.19 16 5 12 M2 Ve HD 217344 8.46 0.20 0.71 0.41 0.81 11 3 8 G5/6 IV + ?

Table 4. V magnitude and colors for the c and ck stars derived via standard stars. Errors are of the order of 0.01 magnitudes. The symbol ”:” denotes errors of the order of 0.02 magnitudes

c or ck V U-B B-V V-Rc V-Ic HD 5210 8.70 0.08: 0.60 0.32 0.66 HD 6446 7.24 1.37: 1.38 0.72 1.44 HD 8617 8.98 1.02: 1.12 0.57 1.11 HD 9896 6.00 -.02: 0.38 0.21 0.44 HD 16371 8.09 0.57: 0.89 0.47 0.92 SAO 215945 9.74 -.01: 0.37 0.21 0.43 HD 33747 8.75 0.74: 1.00 0.52 1.02 HD 33763 8.38 0.50: 0.90 0.48 0.95 HD 154775 7.60 1.97: 1.59 0.86 1.75 HD 156427 7.41 1.71: 1.49 0.80 1.55 HD 173560 8.71 0.11: 0.64 0.36 0.70 HD 176557 7.20 1.77: 1.48 0.78 1.48 HD 197237 9.00 0.84: 0.99 0.50 0.96 HD 197339 7.39 1.44: 1.30 0.66 1.24 HD 214046 7.54 1.78 1.43 0.76 1.48 HD 214380 9.21 -.02 0.48 0.30 0.57 HD 217108 9.17 0.03: 0.53 0.29 0.58 HD 217935 8.59 0.72: 0.97 0.50 0.96

This article was processed by the author using Springer-Verlag

LATEX A&A style file L-AA version 3.