\def\caption#1{{\bf #1}}}
%\begin{table}
\caption{Log of MIDI observations: NGC 5995}
\begin{tabular}{| c c c c c c c c c c c c c c c}
\hline\hline
\multicolumn{8}{c}{Fringe track} & \multicolumn{3}{c}{FT QC} & PH & PH QC & \multicolumn{2}{c}{Calibration} \\
time & s & NDIT & BL & PA & g & mode & am & see & O & NGOOD & o3 & A/B & O & caltime & $\Delta$am \\
\hline
\hline
\multicolumn{15}{l}{2010-03-26: U1U2} \\
08:20:08 &  1 &  8000 &  55 &  27 & P & FT\_OF & 1.0 & 0.6 &  1 &  7438 &  0.65 & 1/1 &  0 & 08:57:57 &     -0.2\\
08:31:29 &  0 &  8000 &  56 &  28 & P & FT\_OF & 1.0 & 0.8 &  1 &  7483 &  0.53 & 1/1 &  0 & 08:57:57 &     -0.2\\
\hline
\multicolumn{15}{l}{2010-03-27: U1U4} \\
05:00:11 & -1 &  8000 &  99 &  35 & P & FT\_OF & 1.4 & 0.7 &  0 &  6219 &  0.79 & 1/1 &  1 & 05:35:11 &      0.4\\
05:12:07 &  0 &  8000 & 101 &  38 & P & FT\_OF & 1.4 & 0.7 &  1 &  6053 &  0.57 & 1/1 &  0 & 05:35:11 &      0.3\\
\hline
\multicolumn{15}{l}{2011-04-17: U2U4} \\
09:29:36 &  1 &  8000 &  70 &  90 & P & FT\_OF & 1.3 & 1.0 &  1 &  5702 &  0.52 & 0/0 & -1 & 09:49:07 &     -0.0\\
09:33:32 &  1 &  8000 &  69 &  90 & P & FT\_OF & 1.3 & 1.0 &  1 &  6212 &  0.47 & 0/0 & -1 & 09:49:07 &     -0.0\\
09:37:03 &  1 &  8000 &  68 &  91 & P & FT\_OF & 1.3 & 0.9 &  1 &  6142 &  0.58 & 0/0 & -1 & 09:49:07 &      0.0\\
09:40:37 &  1 &  8000 &  67 &  91 & P & FT\_OF & 1.4 & 0.9 &  1 &  6463 &  0.55 & 0/0 & -1 & 09:49:07 &      0.0\\
09:57:34 &  1 &  8000 &  63 &  92 & P & FT\_OF & 1.4 & 1.0 &  1 &  5860 &  0.43 & 0/0 & -1 & 09:49:07 &      0.1\\
10:01:07 &  0 &  8000 &  62 &  92 & P & FT\_OF & 1.5 & 1.0 &  1 &  6056 &  0.57 & 0/0 & -1 & 09:49:07 &      0.1\\
10:04:40 &  1 &  8000 &  61 &  93 & P & FT\_OF & 1.5 & 1.3 &  1 &  6425 &  0.49 & 0/0 & -1 & 10:15:59 &      0.0\\
10:08:05 &  0 &  8000 &  60 &  93 & P & FT\_OF & 1.5 & 1.4 &  1 &  3524 &  0.56 & 0/0 & -1 & 10:15:59 &      0.0\\
\hline
\end{tabular}
%\end{table}
