\def\caption#1{{\bf #1}}}
%\begin{table}
\caption{Log of MIDI observations: NGC 424}
\begin{tabular}{| c c c c c c c c c c c c c c c}
\hline\hline
\multicolumn{8}{c}{Fringe track} & \multicolumn{3}{c}{FT QC} & PH & PH QC & \multicolumn{2}{c}{Calibration} \\
time & s & NDIT & BL & PA & g & mode & am & see & O & NGOOD & o3 & A/B & O & caltime & $\Delta$am \\
\hline
\hline
\multicolumn{15}{l}{2007-10-22: U3U4} \\
04:06:30 &  1 &  8000 &  62 & 113 & P & FT\_OF & 1.0 & 0.8 &  1 &  1762 &  0.59 & 0/0 & -1 & 23:44:01 &     -0.2\\
04:22:17 &  0 &  8000 &  62 & 115 & P & FT\_OF & 1.0 & 0.8 &  1 &  1287 &  0.41 & 0/0 & -1 & 23:44:01 &     -0.2\\
\hline
\multicolumn{15}{l}{2007-10-23: U3U4} \\
01:53:39 &  0 &  8000 &  56 &  94 & P & FT\_OF & 1.1 & 1.2 &  1 &  6154 &  0.49 & 0/0 & -1 & 02:43:50 &     -0.0\\
03:41:12 &  1 &  8000 &  62 & 109 & P & FT\_OF & 1.0 & 0.9 &  1 &  6850 &  0.57 & 0/0 & -1 & 02:43:50 &     -0.1\\
03:57:08 &  1 &  8000 &  62 & 112 & P & FT\_OF & 1.0 & 0.8 &  1 &  6446 &  0.56 & 0/0 & -1 & 02:43:50 &     -0.1\\
04:13:58 &  0 &  8000 &  62 & 114 & P & FT\_OF & 1.0 & 0.8 &  1 &  6947 &  0.55 & 0/0 & -1 & 02:43:50 &     -0.1\\
\hline
\multicolumn{15}{l}{2007-10-24: U2U3} \\
04:00:08 &  0 &  8000 &  45 &  43 & P & FT\_OF & 1.0 & 1.5 &  1 &  6710 &  0.59 & 0/0 & -1 & 02:30:02 &     -0.0\\
\hline
\multicolumn{15}{l}{2007-10-25: U2U3} \\
04:27:44 &  0 &  8000 &  44 &  46 & P & FT\_OF & 1.0 & 1.7 &  1 &  6983 &  0.47 & 0/0 & -1 & 03:47:41 &     -0.2\\
\hline
\multicolumn{15}{l}{2009-08-01: U3U4} \\
06:30:35 &  1 &  8000 &  50 &  86 & P & FT\_OF & 1.2 & 0.7 &  1 &  7401 &  0.49 & 1/1 &  0 & 07:04:12 &      0.1\\
06:43:27 &  1 &  8000 &  52 &  89 & P & FT\_OF & 1.2 & 0.6 &  1 &  7276 &  0.51 & 1/1 &  0 & 07:04:12 &      0.0\\
07:27:41 &  0 &  8000 &  57 &  95 & P & FT\_OF & 1.1 & 0.5 &  1 &  7426 &  0.53 & 1/1 &  1 & 07:04:12 &     -0.1\\
07:47:16 &  0 &  8000 &  58 &  98 & P & FT\_OF & 1.1 & 0.6 &  1 &  7495 &  0.54 & 1/1 &  1 & 07:04:12 &     -0.1\\
08:48:46 &  1 &  8000 &  61 & 107 & P & FT\_OF & 1.0 & 0.5 &  1 &  7434 &  0.57 & 1/1 &  1 & 08:29:02 &     -0.1\\
09:37:01 &  1 &  8000 &  62 & 114 & P & FT\_OF & 1.0 & 0.6 &  1 &  7424 &  0.54 & 1/1 &  1 & 08:29:02 &     -0.1\\
09:48:38 &  0 &  8000 &  62 & 116 & P & FT\_OF & 1.0 & 0.8 &  1 &  7423 &  0.58 & 1/1 &  1 & 08:29:02 &     -0.1\\
\hline
\multicolumn{15}{l}{2009-08-02: U1U2} \\
06:24:57 &  1 &  8000 &  56 &   5 & P & FT\_OF & 1.2 & 0.4 &  1 &  7533 &  0.52 & 1/1 &  1 & 06:55:40 &      0.1\\
06:36:38 &  1 &  8000 &  56 &   7 & P & FT\_OF & 1.2 & 0.5 &  1 &  7506 &  0.51 & 1/1 &  1 & 06:55:40 &      0.0\\
07:13:22 &  0 &  8000 &  56 &  12 & P & FT\_OF & 1.1 & 0.6 &  1 &  7521 &  0.55 & 1/1 &  1 & 06:55:40 &     -0.1\\
07:25:15 &  0 &  8000 &  56 &  13 & P & FT\_OF & 1.1 & 0.6 &  1 &  7476 &  0.52 & 1/1 &  1 & 06:55:40 &     -0.1\\
08:20:57 &  1 &  8000 &  55 &  21 & P & FT\_OF & 1.0 & 0.6 &  1 &  7503 &  0.49 & 1/1 &  1 & 08:03:38 &     -0.1\\
08:32:46 &  0 &  8000 &  55 &  22 & P & FT\_OF & 1.0 & 0.7 &  1 &  7445 &  0.55 & 1/1 &  1 & 08:03:38 &     -0.1\\
09:44:35 &  1 &  8000 &  54 &  31 & P & FT\_OF & 1.0 & 0.7 &  1 &  7539 &  0.53 & 1/1 &  1 & 08:03:38 &     -0.1\\
09:56:04 &  0 &  8000 &  54 &  32 & P & FT\_OF & 1.0 & 0.7 &  1 &  7317 &  0.55 & 1/1 &  1 & 08:03:38 &     -0.1\\
\hline
\multicolumn{15}{l}{2009-08-03: U1U3} \\
06:23:43 &  1 &  8000 & 102 &  10 & P & FT\_OF & 1.2 & 0.7 &  1 &  4137 &  0.47 & 0/0 & -1 & 07:11:18 &      0.1\\
06:35:26 &  1 &  8000 & 102 &  12 & P & FT\_OF & 1.2 & 0.7 &  1 &  2995 &  0.56 & 0/0 & -1 & 07:11:18 &      0.1\\
06:50:23 &  0 &  8000 & 102 &  15 & P & FT\_OF & 1.2 & 0.8 &  1 &  1131 &  0.47 & 0/0 & -1 & 07:11:18 &      0.0\\
07:31:26 &  1 &  8000 & 102 &  21 & P & FT\_OF & 1.1 & 1.1 &  1 &  6071 &  0.59 & 0/0 & -1 & 07:11:18 &     -0.0\\
07:43:00 &  0 &  8000 & 102 &  22 & P & FT\_OF & 1.1 & 1.1 &  1 &  6463 &  0.49 & 0/0 & -1 & 07:11:18 &     -0.1\\
08:44:53 &  1 &  8000 & 100 &  31 & P & FT\_OF & 1.0 & 1.0 &  1 &  5967 &  0.53 & 0/0 & -1 & 08:22:19 &     -0.1\\
08:56:51 &  1 &  8000 & 100 &  32 & P & FT\_OF & 1.0 & 0.9 &  1 &  6897 &  0.59 & 0/0 & -1 & 08:22:19 &     -0.1\\
09:00:32 &  1 &  8000 & 100 &  33 & P & FT\_OF & 1.0 & 1.0 &  1 &  5654 &  0.64 & 0/0 & -1 & 08:22:19 &     -0.1\\
09:40:12 &  0 &  8000 &  98 &  37 & P & FT\_OF & 1.0 & 0.8 &  1 &  6755 &  0.63 & 0/0 & -1 & 08:22:19 &     -0.1\\
09:51:51 &  0 &  8000 &  97 &  38 & P & FT\_OF & 1.0 & 0.9 &  1 &  6098 &  0.62 & 0/0 & -1 & 08:22:19 &     -0.1\\
\hline
\end{tabular}
%\end{table}

\clearpage

%\begin{table}
\caption{Log of observations: NGC 424 (continued)}
\begin{tabular}{| c c c c c c c c c c c c c c c}
\hline\hline
\multicolumn{8}{c}{Fringe track} & \multicolumn{3}{c}{FT QC} & PH & PH QC & \multicolumn{2}{c}{Calibration} \\
time & s & NDIT & BL & PA & g & mode & am & see & Good? & NGOOD & o3 & A/B & O & caltime & $\Delta$am \\
\hline
\hline
\multicolumn{15}{l}{2009-08-04: U1U4} \\
05:33:06 &  1 &  8000 & 121 &  24 & P & FT\_OF & 1.4 & 0.5 &  1 &  6855 &  0.51 & 1/1 &  0 & 05:11:14 &     -0.2\\
05:44:45 &  0 &  8000 & 122 &  26 & P & FT\_OF & 1.4 & 0.6 &  1 &  6712 &  0.54 & 1/1 &  0 & 05:11:14 &     -0.3\\
06:25:05 &  1 &  8000 & 125 &  35 & P & FT\_OF & 1.2 & 0.6 &  1 &  7204 &  0.52 & 1/1 &  1 & 06:57:51 &      0.1\\
06:36:31 &  1 &  8000 & 126 &  37 & P & FT\_OF & 1.2 & 0.7 &  1 &  7007 &  0.50 & 1/1 &  1 & 06:57:51 &      0.0\\
07:17:02 &  0 &  8000 & 128 &  45 & P & FT\_OF & 1.1 & 0.7 &  1 &  7500 &  0.56 & 1/1 &  1 & 06:57:51 &     -0.0\\
07:28:21 &  0 &  8000 & 129 &  47 & P & FT\_OF & 1.1 & 0.8 &  1 &  7329 &  0.58 & 1/1 &  1 & 06:57:51 &     -0.1\\
08:30:20 &  1 &  8000 & 130 &  57 & P & FT\_OF & 1.0 & 0.9 &  1 &  7300 &  0.56 & 1/1 &  1 & 08:08:22 &     -0.1\\
09:08:35 &  0 &  8000 & 128 &  62 & P & FT\_OF & 1.0 & 1.1 &  1 &  7438 &  0.61 & 1/1 &  1 & 08:08:22 &     -0.1\\
\hline
\multicolumn{15}{l}{2010-10-18: U1U3} \\
01:31:49 &  0 &  8000 & 102 &  11 & P & FT\_OF & 1.2 & 0.8 &  1 &  5718 &  0.53 & 0/0 & -1 & 00:55:13 &     -0.2\\
02:29:21 &  1 &  8000 & 102 &  20 & P & FT\_OF & 1.1 & 0.8 &  1 &  5822 &  0.60 & 0/0 & -1 & 03:02:35 &      0.0\\
02:40:59 &  0 &  8000 & 102 &  22 & P & FT\_OF & 1.1 & 0.9 &  1 &  6147 &  0.57 & 0/0 & -1 & 03:02:35 &      0.0\\
\hline
\multicolumn{15}{l}{2010-10-18: U3U4} \\
06:05:27 &  0 &  8000 &  60 & 130 & P & FT\_OF & 1.1 & 0.6 &  1 &  6663 &  0.56 & 0/0 & -1 & 05:35:02 &      0.1\\
06:16:50 &  0 &  8000 &  59 & 132 & P & FT\_OF & 1.2 & 0.8 &  1 &  6411 &  0.49 & 0/0 & -1 & 06:40:32 &     -0.1\\
07:01:16 &  1 &  8000 &  57 & 142 & P & FT\_OF & 1.3 & 0.7 &  1 &  6198 &  0.49 & 0/0 & -1 & 07:36:24 &     -0.1\\
07:15:35 &  1 &  8000 &  56 & 145 & P & FT\_OF & 1.4 & 0.8 &  1 &  2780 &  0.65 & 0/0 & -1 & 07:36:24 &     -0.0\\
07:56:54 &  0 &  8000 &  54 & 155 & P & FT\_OF & 1.6 & 0.7 &  1 &  6748 &  0.44 & 0/0 & -1 & 07:36:24 &      0.2\\
08:08:25 &  0 &  8000 &  53 & 158 & P & FT\_OF & 1.7 & 0.7 &  1 &  5810 &  0.51 & 0/0 & -1 & 07:36:24 &      0.3\\
\hline
\multicolumn{15}{l}{2010-10-19: U2U4} \\
00:54:15 &  1 &  8000 &  76 &  47 & P & FT\_OF & 1.3 & 0.6 &  1 &  6202 &  0.45 & 0/0 & -1 & 01:33:35 &      0.1\\
01:05:42 & -1 &  8000 &  78 &  50 & P & FT\_OF & 1.3 & 0.5 &  0 &   147 &  0.96 & 0/0 & -1 & 01:33:35 &      0.1\\
01:17:17 &  1 &  8000 &  79 &  53 & P & FT\_OF & 1.2 & 0.8 &  1 &  7075 &  0.55 & 0/0 & -1 & 01:33:35 &      0.0\\
01:52:05 &  0 &  8000 &  83 &  60 & P & FT\_OF & 1.2 & 0.6 &  1 &  6131 &  0.64 & 0/0 & -1 & 01:33:35 &     -0.1\\
02:03:33 &  0 &  8000 &  84 &  62 & P & FT\_OF & 1.1 & 0.6 &  1 &  5702 &  0.50 & 0/0 & -1 & 01:33:35 &     -0.1\\
02:44:04 &  1 &  8000 &  87 &  69 & P & FT\_OF & 1.1 & 0.6 &  1 &  7080 &  0.62 & 0/0 & -1 & 03:16:18 &      0.0\\
02:55:32 &  1 &  8000 &  88 &  71 & P & FT\_OF & 1.1 & 0.6 &  1 &  6758 &  0.56 & 0/0 & -1 & 03:16:18 &      0.0\\
03:37:02 &  0 &  8000 &  89 &  78 & P & FT\_OF & 1.0 & 0.7 &  1 &  6223 &  0.54 & 0/0 & -1 & 03:16:18 &      0.0\\
03:48:25 &  0 &  8000 &  89 &  79 & P & FT\_OF & 1.0 & 0.7 &  1 &  3506 &  0.61 & 0/0 & -1 & 03:16:18 &     -0.0\\
04:00:03 &  0 &  8000 &  89 &  81 & P & FT\_OF & 1.0 & 0.7 &  1 &  3498 &  0.53 & 0/0 & -1 & 04:14:29 &     -0.1\\
04:34:18 &  1 &  8000 &  88 &  86 & P & FT\_OF & 1.0 & 0.7 &  1 &  7168 &  0.48 & 0/0 & -1 & 05:06:19 &      0.0\\
04:45:36 &  1 &  8000 &  87 &  88 & P & FT\_OF & 1.0 & 0.7 &  1 &  7221 &  0.59 & 0/0 & -1 & 05:06:19 &      0.0\\
05:26:08 &  0 &  8000 &  84 &  95 & P & FT\_OF & 1.1 & 0.8 &  1 &  6712 &  0.56 & 0/0 & -1 & 05:06:19 &      0.1\\
05:37:26 &  0 &  8000 &  83 &  96 & P & FT\_OF & 1.1 & 0.8 &  1 &  6287 &  0.56 & 0/0 & -1 & 05:06:19 &      0.1\\
06:17:16 &  0 &  8000 &  78 & 103 & P & FT\_OF & 1.2 & 0.7 &  1 &  5615 &  0.59 & 0/0 & -1 & 05:58:56 &      0.0\\
\hline
\multicolumn{15}{l}{2010-11-27: U1U4} \\
00:41:56 &  0 &  8000 & 130 &  54 & P & FT\_OF & 1.0 & 0.7 &  1 &  7111 &  0.56 & 0/0 & -1 & 00:09:18 &     -0.0\\
00:53:34 &  0 &  8000 & 130 &  56 & P & FT\_OF & 1.0 & 0.6 &  1 &  6397 &  0.51 & 0/0 & -1 & 01:19:26 &     -0.1\\
01:38:47 &  1 &  8000 & 128 &  62 & P & FT\_OF & 1.0 & 0.9 &  1 &  7066 &  0.54 & 0/0 & -1 & 02:09:55 &      0.0\\
01:50:14 & -1 &  8000 & 127 &  64 & P & FT\_OF & 1.0 & 0.8 &  0 &   319 &  1.32 & 0/0 & -1 & 02:09:55 &      0.0\\
02:30:52 &  0 &  8000 & 123 &  70 & P & FT\_OF & 1.1 & 1.2 &  1 &  7219 &  0.55 & 0/0 & -1 & 02:09:55 &      0.0\\
03:00:51 &  1 &  8000 & 119 &  73 & P & FT\_OF & 1.1 & 1.0 &  1 &  6591 &  0.58 & 0/0 & -1 & 03:21:44 &     -0.1\\
03:39:47 &  0 &  8000 & 111 &  79 & P & FT\_OF & 1.2 & 0.7 &  1 &  7057 &  0.51 & 0/0 & -1 & 03:21:44 &      0.0\\
\hline
\end{tabular}
%\end{table}
