\def\caption#1{{\bf #1}}}
%\begin{table}
\caption{Log of MIDI observations: NGC 1365}
\begin{tabular}{| c c c c c c c c c c c c c c c}
\hline\hline
\multicolumn{8}{c}{Fringe track} & \multicolumn{3}{c}{FT QC} & PH & PH QC & \multicolumn{2}{c}{Calibration} \\
time & s & NDIT & BL & PA & g & mode & am & see & O & NGOOD & o3 & A/B & O & caltime & $\Delta$am \\
\hline
\hline
\multicolumn{15}{l}{2006-09-10: U2U3} \\
07:42:55 & -1 &  8000 &  46 &  30 & P & FT\_OF & 1.1 & 1.3 &  0 &    -1 & -1.00 & 1/1 &  0 & 08:28:27 &     -0.0\\
09:36:20 & -1 &  8000 &  45 &  45 & P & FT\_OF & 1.0 & 1.3 &  0 &   103 &  1.24 & 0/0 & -1 & 08:28:27 &     -0.0\\
09:41:27 & -1 &  8000 &   0 & *** & P & FT\_OF & 1.0 & 1.4 &  0 &   563 &  1.17 & 0/0 & -1 & 08:28:27 &     -0.0\\
\hline
\multicolumn{15}{l}{2007-11-23: U3U4} \\
01:53:47 &  0 &  8000 &  54 &  92 & P & FT\_OF & 1.2 & 1.3 &  1 &  5607 &  0.56 & 1/1 &  0 & 02:38:26 &      0.1\\
03:51:36 &  1 & 12000 &  62 & 108 & P & FT\_OF & 1.0 & 1.0 &  1 & 10380 &  0.50 & 1/1 &  1 & 03:33:48 &     -0.0\\
04:11:21 &  1 & 12000 &  62 & 111 & P & FT\_OF & 1.0 & 1.0 &  1 & 10547 &  0.57 & 0/0 & -1 & 03:33:48 &     -0.0\\
04:18:56 &  0 & 12000 &  62 & 112 & P & FT\_OF & 1.0 & 0.9 &  1 & 10396 &  0.56 & 0/0 & -1 & 03:33:48 &     -0.0\\
\hline
\multicolumn{15}{l}{2009-12-02: U2U4} \\
03:10:08 &  1 &  8000 &  89 &  79 & P & FT\_OF & 1.0 & 2.2 &  1 &  3247 &  0.58 & 1/1 &  0 & 05:32:22 &     -0.1\\
03:30:13 &  0 &  8000 &  89 &  81 & P & FT\_OF & 1.0 & 2.1 &  1 &  5911 &  0.65 & 0/0 & -1 & 05:32:22 &     -0.1\\
03:34:12 & -1 &  8000 &  89 &  82 & P & FT\_OF & 1.0 & 2.0 &  0 &    -1 & -1.00 & 2/2 &  0 & 05:32:22 &     -0.1\\
06:03:04 &  1 & 12000 &  74 & 105 & P & FT\_OF & 1.2 & 1.5 &  1 & 10618 &  0.54 & 0/0 & -1 & 05:32:22 &      0.1\\
06:09:30 &  0 & 12000 &  73 & 107 & P & FT\_OF & 1.2 & 1.3 &  1 & 11004 &  0.56 & 2/2 &  0 & 05:32:22 &      0.1\\
06:31:35 &  1 & 12000 &  69 & 111 & P & FT\_OF & 1.3 & 1.1 &  1 &  9195 &  0.56 & 1/1 &  0 & 07:06:39 &     -0.1\\
06:44:27 &  0 & 12000 &  67 & 114 & P & FT\_OF & 1.4 & 1.3 &  1 & 10003 &  0.50 & 1/1 &  0 & 07:06:39 &     -0.1\\
07:37:13 &  1 & 12000 &  57 & 127 & P & FT\_OF & 1.7 & 1.0 &  1 & 10545 &  0.49 & 1/1 &  0 & 07:06:39 &      0.3\\
07:50:05 &  0 & 12000 &  54 & 131 & P & FT\_OF & 1.8 & 0.9 &  1 &  9879 &  0.51 & 1/1 &  0 & 07:06:39 &      0.4\\
08:09:56 &  1 & 12000 &  51 & 138 & P & FT\_OF & 2.0 & 0.8 &  1 &  6100 &  0.60 & 0/0 & -1 & 08:40:46 &      0.2\\
08:20:30 &  0 & 12000 &  49 & 142 & P & FT\_OF & 2.2 & 0.9 &  1 &  3716 &  0.62 & 0/0 & -1 & 08:40:46 &      0.3\\
\hline
\multicolumn{15}{l}{2010-01-01: U1U3} \\
03:16:56 &  1 &  8000 &  94 &  43 & P & FT\_OF & 1.1 & 1.3 &  1 &  2194 &  0.64 & 1/1 &  0 & 02:41:01 &      0.1\\
03:30:59 &  0 &  4000 &  92 &  45 & P & FT\_OF & 1.1 & 1.6 &  1 &  2979 &  0.49 & 0/0 & -1 & 02:41:01 &      0.1\\
\hline
\multicolumn{15}{l}{2010-01-02: U3U4} \\
04:21:29 &  1 &  4000 &  56 & 141 & P & FT\_OF & 1.3 & 1.2 &  1 &  3619 &  0.49 & 1/1 &  0 & 03:47:35 &      0.1\\
04:32:21 &  0 &  4000 &  56 & 143 & P & FT\_OF & 1.3 & 1.0 &  1 &  3622 &  0.50 & 0/0 & -1 & 03:47:35 &      0.2\\
06:02:45 &  1 &  4000 &  51 & 167 & P & FT\_OF & 2.0 & 1.1 &  1 &  3413 &  0.59 & 1/1 &  0 & 05:38:51 &      0.3\\
06:15:48 &  0 &  4000 &  51 & 170 & P & FT\_OF & 2.2 & 1.2 &  1 &  3040 &  0.52 & 0/0 & -1 & 05:38:51 &      0.5\\
\hline
\multicolumn{15}{l}{2010-08-24: U1U2} \\
05:17:31 &  0 &  8000 &  56 & 167 & P & FT\_OF & 2.1 & 0.6 &  1 &  2669 &  0.50 & 1/1 &  0 & 05:33:21 &      0.1\\
05:50:45 &  1 &  8000 &  56 & 172 & P & FT\_OF & 1.7 & 0.6 &  1 &  2906 &  0.44 & 0/0 & -1 & 06:06:11 &      0.1\\
06:18:25 &  0 &  8000 &  56 & 176 & P & FT\_OF & 1.5 & 0.7 &  1 &  3422 &  0.57 & 0/0 & -1 & 06:06:11 &     -0.1\\
07:32:42 & -1 &  8000 &  56 &   7 & P & FT\_OF & 1.2 & 0.7 &  0 &     0 & -1.00 & 0/0 & -1 & 06:06:11 &     -0.5\\
09:14:13 & -1 &  4000 &  56 &  20 & P & FT\_OF & 1.0 & 0.8 &  0 &    19 &  0.73 & 0/0 & -1 & 09:36:38 &      0.0\\
09:19:08 &  0 &  2000 &  56 &  21 & P & FT\_OF & 1.0 & 0.8 &  1 &  1098 &  0.73 & 0/0 & -1 & 09:36:38 &      0.0\\
09:20:53 & -1 &  4000 &  56 &  21 & P & FT\_OF & 1.0 & 0.8 &  0 &    -1 & -1.00 & 1/1 &  0 & 09:36:38 &      0.0\\
\hline
\multicolumn{15}{l}{2010-08-26: U3U4} \\
08:35:44 &  1 &  4000 &  59 &  99 & P & FT\_OF & 1.1 & 0.9 &  1 &  2186 &  0.61 & 0/0 & -1 & 09:03:29 &      0.0\\
08:38:21 &  0 & 12000 &  59 & 100 & P & FT\_OF & 1.1 & 0.9 &  1 &  9562 &  0.55 & 1/1 &  0 & 09:03:29 &      0.0\\
09:35:53 &  0 & 12000 &  61 & 108 & P & FT\_OF & 1.0 & 1.2 &  1 &  9911 &  0.53 & 1/1 &  0 & 09:03:29 &     -0.0\\
09:48:31 & -1 & 12000 &  62 & 109 & P & FT\_OF & 1.0 & 1.1 &  0 &    68 &  1.01 & 1/1 &  1 & 10:10:45 &     -0.0\\
\hline
\end{tabular}
%\end{table}


%\begin{table}
\caption{Log of MIDI observations: NGC 1365 (continued)}
\begin{tabular}{| c c c c c c c c c c c c c c c}
\hline\hline
\multicolumn{8}{c}{Fringe track} & \multicolumn{3}{c}{FT QC} & PH & PH QC & \multicolumn{2}{c}{Calibration} \\
time & s & NDIT & BL & PA & g & mode & am & see & O & NGOOD & o3 & A/B & O & caltime & $\Delta$am \\
\hline
\hline
\multicolumn{15}{l}{2010-08-28: U1U4} \\
07:28:41 &  1 &  4000 & 125 &  38 & P & FT\_OF & 1.2 & 0.6 &  1 &  3161 &  0.40 & 0/0 & -1 & 07:05:16 &     -0.1\\
07:31:13 &  1 &  8000 & 125 &  39 & P & FT\_OF & 1.2 & 0.6 &  1 &  6312 &  0.51 & 1/1 &  0 & 07:05:16 &     -0.1\\
07:44:43 &  0 & 12000 & 126 &  41 & P & FT\_OF & 1.1 & 0.6 &  1 &  9137 &  0.44 & 1/1 &  1 & 07:05:16 &     -0.1\\
10:08:36 &  1 &  8000 & 128 &  64 & P & FT\_OF & 1.0 & 1.4 &  1 &  6472 &  0.47 & 0/0 & -1 & 10:24:25 &     -0.0\\
10:12:22 &  0 & 12000 & 128 &  64 & P & FT\_OF & 1.0 & 1.3 &  1 & 10401 &  0.51 & 0/0 & -1 & 10:24:25 &     -0.0\\
\hline
\multicolumn{15}{l}{2010-08-29: U2U3} \\
09:50:32 &  0 & 12000 &  45 &  41 & P & FT\_OF & 1.0 & 0.9 &  1 & 10788 &  0.54 & 1/1 &  0 & 09:34:04 &     -0.0\\
10:04:34 &  0 & 12000 &  45 &  43 & P & FT\_OF & 1.0 & 0.7 &  1 & 10640 &  0.54 & 1/1 &  1 & 10:21:56 &     -0.0\\
\hline
\end{tabular}
%\end{table}
