%\documentclass[referee]{aa}
\documentclass{aa}
\usepackage{graphicx}
%\usepackage{txfonts}
%\usepackage{epstopdf}
\begin{document}
\newpage

\begin{appendix}

{\bf Appendix}
%Table A1
\begin{table*}
\caption[]{Emission lines at phase $\phi = 0.666$}
\begin{tabular}{rlrrrcrrr}
\hline
$\lambda$,\AA &Ion & Mult & EW, m\AA & E$_{\rm low}$, eV& g$_{\rm low}$ 
&g$_{\rm up}$& E$_{\rm up}$, eV&$\log$~A\\
\hline
   6155.14 &    Si I  &  29 &   9&  5.62  &  7&  9 &7.63  & 6.41  \\
   7918.38 &    Si I  &  57 &  20&  5.95  &  3&  5 &7.52  & 6.64  \\
   7970.30 &    Si I  &  57 &  71&  5.96  &  5&  5 &7.52  & 5.98  \\
   5581.98 &    Ca I  &  21 &   7&  2.52  &  5&  7 &4.74  & 6.92  \\
   6122.23 &    Ca I  &  3  &  24&  1.89  &  3&  3 &3.91  & 6.91  \\
   6162.18 &    Ca I  &  3  &  16&  1.90  &  5&  3 &3.91  & 7.50  \\
   6169.56 &    Ca I  &  20 &  96&  2.52  &  7&  5 &4.53  & 7.15  \\
   6439.08 &    Ca I  &  18 &  17&  2.52  &  7&  9 &4.45  & 7.28  \\
   6471.67 &    Ca I  &  18 &   6&  2.52  &  7&  7 &4.44  & 6.61  \\
   6717.69 &    Ca I  &  32 &  13&  2.71  &  5&  3 &4.55  & 7.14  \\
   7148.15 &    Ca I  &  30 &  16&  2.71  &  5&  5 &4.44  & 7.29  \\
   7202.21 &    Ca I  &  29 &  11&  2.71  &  5&  5 &4.43  & 6.97  \\
   5657.90 &    Sc II &  29 &   6&  1.51  &  5&  5 &3.70  & 7.27  \\
   6604.60 &    Sc II &  19 &  15&  1.36  &  5&  5 &3.23  & 6.27  \\
   5866.45 &    Ti I  &  72 &  30&  1.07  &  5&  7 &3.18  & 6.57  \\
   5899.30 &    Ti I  &  72 &  11&  1.05  &  3&  5 &3.15  & 6.41  \\
   5941.76 &    Ti I  &  72 &  11&  1.05  &  3&  3 &3.14  & 6.17  \\
   5965.83 &    Ti I  &  154&  13&  1.88  &  9& 11 &3.96  & 6.68  \\
   5978.54 &    Ti I  &  154&   4&  1.87  &  7&  9 &3.95  & 6.75  \\
   6091.18 &    Ti I  &  238&   9&  2.27  &  9& 11 &4.30  & 6.79  \\
   6126.22 &    Ti I  &  69 &  13&  1.07  &  5&  3 &3.09  & 6.35  \\
   6258.10 &    Ti I  &  104&  19&  1.44  &  7&  9 &3.42  & 6.84  \\
   6261.10 &    Ti I  &  104&  30&  1.43  &  5&  7 &3.41  & 6.88  \\
   6554.23 &    Ti I  &  102&  31&  1.44  &  7&  7 &3.33  & 6.27  \\
   6743.12 &    Ti I  &  48 &  17&   .90  &  5&  5 &2.74  & 5.73  \\
   7138.91 &    Ti I  &  99 &  10&  1.44  &  7&  7 &3.18  & 5.54  \\
   7216.20 &    Ti I  &  98 &  21&  1.44  &  7&  5 &3.16  & 6.20  \\
   7251.74 &    Ti I  & 99  &  45&  1.43  &  5&  3&  3.14 & 6.79  \\
   7357.74 &    Ti I  & 97  &  37&  1.44  &  7&  7&  3.13 & 6.15  \\
   7364.11 &    Ti I  & 97  &  26&  1.43  &  5&  5&  3.11 & 6.20  \\
   8364.24 &    Ti I  & 33  &  44&   .84  &  9&  9&  2.32 & 5.19  \\
   8377.86 &    Ti I  & 33  &  11&   .83  &  7&  7&  2.31 & 5.47  \\
   5336.77 &    Ti II & 69  &  27&  1.58  &  6&  8&  3.90 & 5.89  \\
   5381.02 &    Ti II &269  &  20&  1.57  &  4&  6&  3.87 & 5.66  \\
   5418.75 &    Ti II &69   &  17&  1.58  &  6&  6&  3.87 & 5.46  \\
   6606.97 &    Ti II & 91  &   5&  2.06  &  4&  4&  3.94 & 4.78  \\
   7214.74 &    Ti II & 101 &  20&  2.59  &  8& 10&  4.31 & 5.37  \\
   5698.53 &    V I   & 35  &  12&  1.06  &  6&  8&  3.24 & 7.31  \\
   5703.59 &    V I   & 35  &  19&  1.05  &  4&  6&  3.22 & 7.25  \\
   5727.05 &    V I   & 35  &  30&  1.08  &  8& 10&  3.24 & 7.29  \\
   5737.06 &    V I   & 35  &   8&  1.06  &  6&  6&  3.22 & 6.76  \\
   6039.73 &    V I   & 34  &  12&  1.06  &  6&  6&  3.12 & 6.78  \\
   6081.44 &    V I   & 34  &  12&  1.05  &  4&  4&  3.09 & 6.98  \\
   6090.21 &    V I   & 34  &  12&  1.08  &  8&  6&  3.12 & 7.36  \\
   6216.37 &    V I   & 19  &  11&   .28  &  6&  8&  2.27 & 6.43  \\
   5296.69 &    Cr I  & 18  &  13&   .98  &  5&  3&  3.32 & 6.59  \\
   5345.77 &    Cr I  & 18  &  27&  1.00  &  7&  5&  3.32 & 6.72  \\
   5242.49 &    Fe I  & 843 &  22&  3.63  & 13& 11&  6.00 & 6.29  \\
   5307.36 &    Fe I  & 36  &   7&  1.61  &  5&  7&  3.94 & 4.52  \\
   5339.93 &    Fe I  & 553 &  17&  3.27  &  5&  7&  5.59 & 6.74  \\
   5353.39 &    Fe I  & 1062&  11&  4.10  &  9&  7&  6.42 & 6.88  \\
   5364.87 &    Fe I  & 1146&   7&  4.45  &  5&  7&  6.76 & 7.50  \\
   5367.47 &    Fe I  &1146 &   5&  4.41  &  7&  9& 6.72  & 7.68  \\
   5410.91 &    Fe I  &1165 &   9&  4.47  &  7&  9& 6.76  & 7.60  \\
   5466.39 &    Fe I  &1144 &   6&  4.37  &  9&  7& 6.64  & 6.92  \\
   5554.89 &    Fe I  &1183 &   6&  4.55  &  9&  9& 6.78  & 7.22  \\
\hline
\hline
\end{tabular}
\end{table*}

\begin{table*}
{\bf Table A1 Continued.}\\
\label{tab2}
\begin{tabular}{rlrrrcrrr}
\hline
$\lambda$,\AA &Ion & Mult & EW, m\AA & E$_{\rm low}$, eV& g$_{\rm low}$ 
&g$_{\rm up}$& E$_{\rm up}$, eV&$\log$~A\\ 
\hline
   5563.60 & Fe I  &1062 &   14&  4.19  &  5&  7& 6.42& 6.69  \\
   5565.71 & Fe I  &1183 &   11&  4.61  &  7&  7& 6.83& 7.20  \\
   5567.40 & Fe I  &209  &    9&  2.61  &  5&  3& 4.83& 5.23  \\
   5569.62 & Fe I  &686  &   18&  3.42  &  5&  3& 5.64& 7.29  \\
   5572.84 & Fe I  &686  &   24&  3.40  &  7&  5& 5.62& 7.22  \\
   5576.09 & Fe I  &686  &   31&  3.43  &  3&  1& 5.65& 7.57  \\
   5717.85 & Fe I  &1107 &   57&  4.28  &  1&  3& 6.45& 6.89  \\
   5753.12 & Fe I  &1107 &    6&  4.26  &  3&  5& 6.41& 6.91  \\
   5862.36 & Fe I  &1180 &   12&  4.55  &  9& 11& 6.66& 6.99  \\
   5909.99 & Fe I  &552  &    8&  3.21  &  9& 11& 5.31& 4.62  \\
   5934.66 & Fe I  &982  &    6&  3.93  &  5&  7& 6.02& 6.43  \\
   5956.70 & Fe I  &14   &   11&   .86  & 11&  9& 2.94& 2.80  \\
   5983.69 & Fe I  &1175 &    4&  4.55  &  9&  9& 6.62& 6.84  \\
   5984.79 & Fe I  &1260 &    7&  4.73  &  7&  5& 6.80& 7.38  \\
   6003.03 & Fe I  &959  &   86&  3.88  &  9&  9& 5.95& 6.42  \\
   6020.17 & Fe I  &1178 &    3&  4.61  &  7&  9& 6.67& 7.03  \\
   6024.07 & Fe I  &1178 &   19&  4.55  &  9& 11& 6.61& 7.26  \\
   6027.06 & Fe I  &1018 &   16&  4.08  &  9& 11& 6.13& 6.12  \\
   6065.48 & Fe I  &207  &   47&  2.61  &  5&  5& 4.65& 6.03  \\
   6078.50 & Fe I  &1259 &    9&  4.80  &  5&  7& 6.83& 7.19  \\
   6085.27 & Fe I  &269  &   20&  2.76  &  7&  5& 4.80& 4.67  \\
   6136.61 & Fe I  &169  &   47&  2.45  &  9&  7& 4.47& 5.91  \\
   6151.62 & Fe I  &62   &   16&  2.18  &  7&  5& 4.19& 4.35  \\
   6157.73 & Fe I  &1015 &   26&  4.08  &  9&  9& 6.09& 6.11  \\
   6173.34 & Fe I  &  62   &  25&  2.22 &  3&  1& 4.23& 5.43  \\
   6180.22 & Fe I  &  269  &  21&  2.73 &  9&  7& 4.73& 4.86  \\
   6200.32 & Fe I  &  207  &  32&  2.61 &  5&  7& 4.61& 5.08  \\
   6213.43 & Fe I  &  62   &  38&  2.22 &  3&  3& 4.22& 5.21  \\
   6215.15 & Fe I  &  1018 &  11&  4.19 &  5&  7& 6.18& 6.35  \\
   6219.28 & Fe I  &  62   &  33&  2.20 &  5&  5& 4.19& 5.13  \\
   6230.73 & Fe I  & 1207  &  38&  2.56 &  9&  9& 4.55& 5.95  \\
   6232.65 & Fe I  &  816  &  24&  3.65 &  5&  3& 5.64& 6.63  \\
   6246.32 & Fe I  &  816  &  29&  3.60 &  7&  7& 5.59& 6.76  \\
   6252.55 & Fe I  &  169  &  32&  2.40 & 13& 11& 4.39& 5.51  \\
   6254.26 & Fe I  &  111  &  12&  2.28 &  5&  3& 4.26& 5.53  \\
   6265.13 & Fe I  &  62   &  20&  2.18 &  7&  7& 4.15& 4.87  \\
   6280.63 & Fe I  &  13   &  22&   .86 & 11& 11& 2.83& 2.81  \\
   6297.80 & Fe I  &  62   &  17&  2.22 &  3&  5& 4.19& 4.84  \\
   6301.51 & Fe I  &  816  &  39&  3.65 &  5&  5& 5.62& 6.95  \\
   6318.03 & Fe I  &  168  &  51&  2.45 &  9&  7& 4.42& 5.25  \\
   6322.69 & Fe I  &  207  &  21&  2.59 &  7&  9& 4.55& 4.99  \\
   6335.34 & Fe I  &  62   &  50&  2.20 &  5&  7& 4.15& 5.13  \\
   6336.84 & Fe I  &  816  &  38&  3.69 &  3&  3& 5.64& 7.07  \\
   6338.90 & Fe I  &  1258 &   4&  4.80 &  5&  3& 6.75& 6.81  \\
   6344.15 & Fe I  &  169  &  21&  2.43 & 11& 11& 4.39& 4.29  \\
   6355.04 & Fe I  &  342  &  21&  2.85 &  3&  5& 4.80& 5.20  \\
   6358.69 & Fe I  &  13   &  20&   .86 & 11& 13& 2.81& 2.99  \\
   6380.75 & Fe I  &  1015 &   8&  4.19 &  5&  5& 6.13& 6.28  \\
   6393.60 & Fe I  &  168  &  54&  2.43 & 11&  9& 4.37& 5.68  \\
   6400.00 & Fe I  &  816  &  61&  3.60 &  7&  9& 5.54& 6.82  \\
   6411.65 & Fe I  &  816  &  59&  3.65 &  5&  7& 5.59& 6.87  \\
   6421.35 & Fe I  &  111  &  34&  2.28 &  5&  5& 4.21& 5.39  \\
   6430.85 & Fe I  &   62  &  35&  2.18 &  7&  9& 4.10& 5.19  \\
   6475.63 & Fe I  &   206 &  19&  2.56 &  9&  7& 4.47& 4.51  \\
   6481.88 & Fe I  &   109 &  29&  2.28 &  5&  5& 4.19& 4.59  \\
   6498.95 & Fe I  &   13  &  17&   .96 &  7&  7& 2.87& 2.73  \\
\hline
\hline
\end{tabular}
\end{table*}

\begin{table*}
{\bf Table A1 Continued.}\\
\label{tab2}
\begin{tabular}{rlrrrcrrr}
\hline
$\lambda$,\AA &Ion & Mult & EW, m\AA & E$_{\rm low}$, eV& g$_{\rm low}$ 
&g$_{\rm up}$& E$_{\rm up}$, eV&$\log$~A\\
\hline
   6518.38 &    Fe I  &342 &  21& 2.83 &  5&  7&4.73& 4.89 \\
   6581.22 &    Fe I  &34  &   8& 1.49 &  9&  9&3.37& 2.57 \\
   6592.91 &    Fe I  &268 & 144& 2.73 &  9&  7&4.61& 5.72 \\
   6609.12 &    Fe I  &206 &  39& 2.56 &  9&  9&4.43& 4.65 \\
   6625.04 &    Fe I  &13  &   9& 1.01 &  3&  3&2.88& 2.45 \\
   6663.45 &    Fe I  &111 &  32& 2.42 &  3&  1&4.28& 5.69 \\
   6677.99 &    Fe I  &268 &  70& 2.69 & 11&  9&4.55& 5.85 \\
   6750.15 &    Fe I  &111 &  37& 2.42 &  3&  3&4.26& 5.21 \\
   6806.85 &    Fe I  &268 &   7& 2.73 &  9&  9&4.55& 4.11 \\
   6839.83 &    Fe I  &205 &  10& 2.56 &  9&  9&4.37& 3.89 \\
   6855.15 &    Fe I  &1195&  11& 4.56 &  7&  9&6.37& 6.63 \\
   6945.20 &    Fe I  &111 &  47& 2.42 &  3&  5&4.21& 5.01 \\
   6978.85 &    Fe I  &111 &  26& 2.48 &  1&  3&4.26& 5.20 \\
   6988.53 &    Fe I  &167 &  19& 2.40 & 13& 11&4.18& 3.63 \\
   7016.08 &    Fe I  &109 &  29& 2.42 &  3&  5&4.19& 4.39 \\
   7068.42 &    Fe I  &1004&  24& 4.08 &  9&  7&5.83& 5.93 \\
   7090.40 &    Fe I  &1051&   6& 4.23 &  1&  3&5.98& 6.66 \\
   7130.94 &    Fe I  &1051&  17& 4.22 &  3&  5&5.96& 6.83 \\
   7219.69 &    Fe I  &1001&  11& 4.08 &  9&  9&5.79& 5.62 \\
   7228.69 &    Fe I  &267 &  11& 2.76 &  7&  7&4.47& 4.00 \\
   7411.16 &    Fe I  &1077&  36& 4.28 &  5&  5&5.96& 7.04 \\
   7440.92 &    Fe I  &1273&  20& 4.91 &  9& 11&6.58& 6.44 \\
   7445.76 &    Fe I  &1077&  41& 4.26 &  7&  7&5.92& 7.40 \\
   7495.08 &    Fe I  &1077&  50& 4.22 &  9&  9&5.87& 7.21 \\
   7507.24 &    Fe I  &1137&   9& 4.41 &  7&  5&6.07& 6.42 \\
   7531.15 &    Fe I  &1137&  17& 4.37 &  9&  7&6.02& 6.77 \\
   7568.92 &    Fe I  &1077&  17& 4.28 &  5&  7&5.92& 6.44 \\
   7583.80 &    Fe I  &402 &  60& 3.02 &  7&  5&4.65& 5.49 \\
   7585.99 &    Fe I  &1137&  26& 4.31 & 11&  9&5.95& 7.09 \\
   7723.20 &    Fe I  &108 &  17& 2.28 &  5&  7&3.88& 3.70 \\
   7748.27 &    Fe I  &402 &  86& 2.95 & 11&  9&4.55& 5.42 \\
   7780.56 &    Fe I  &1154&  24& 4.47 &  7&  5&6.07& 7.39 \\
   7832.21 &    Fe I  &1154&  37& 4.43 &  9&  7&6.02& 7.26 \\
   7937.15 &    Fe I  &1136&  64& 4.31 & 11&  9&5.87& 7.23 \\
   8047.62 &    Fe I  &12  &  43&  .86 & 11& 11&2.40& 2.43 \\
   8075.13 &    Fe I  &12  &  25&  .92 &  9&  7&2.45& 2.13 \\
   8239.14 &    Fe I  &108 &  32& 2.42 &  3&  5&3.93& 4.01 \\
   8293.52 &    Fe I  &623 &  38& 3.30 &  5&  5&4.80& 5.16 \\
   8327.05 &    Fe I  &60  &  63& 2.20 &  5&  3&3.69& 5.88 \\
   8365.64 &    Fe I  &623 &  40& 3.25 &  7&  7&4.73& 5.13 \\
   8387.77 &    Fe I  &60  &  88& 2.18 &  7&  5&3.15& 5.71 \\
   6456.39 &    Fe II &74  &   4& 3.90 &  8&  6&5.82& 5.34 \\
   6516.08 &    Fe II &40  &  14& 2.89 &  6&  8&4.79& 4.01 \\
   7222.39 &    Fe II &73  &  21& 3.89 &  4&  2&5.60& 4.58 \\
   7308.07 &    Fe II &73  &  20& 3.89 &  4&  4&5.58& 4.24 \\
   5432.56 &    Mn I  &1   & 31&  .00  &  6&  6&2.28& 3.95 \\
   6016.64 &    Mn I  &27  &  8& 3.07  &  6&  6&5.13& 7.39 \\
   6021.79 &    Mn I  &27  &  7& 3.08  &  8&  6&5.13& 7.44 \\
   5331.46 &    Co I  &39  &  14& 1.78 &  2&  4&4.11& 5.94 \\
   6632.44 &    Co I  &111 &   5& 2.28 &  4&  6&4.15& 5.60 \\
   6771.04 &    Co I  &54  &  30& 1.88 &  6&  6&3.71& 5.58 \\
   6814.95 &    Co I  &54  &  21& 1.95 &  4&  4&3.77& 5.76 \\
   7084.98 &    Co I  &54  &  76& 1.87 &  6&  8&3.63& 6.17 \\
   7417.38 &    Co I  &89  &  11& 2.04 &  4&  6&3.71& 5.33 \\
   5435.87 &    Ni I  &70  &  17& 1.99 &  1&  3&4.27& 5.45 \\
   5754.68 &    Ni I  &68  & 18&  1.93 &  5&  3&4.09& 5.88 \\
\hline
\hline
\end{tabular}
\end{table*}

\begin{table*}
{\bf Table A1 Continued.}\\
\label{tab2}
\begin{tabular}{rlrrrcrrr}
\hline
$\lambda$,\AA &Ion & Mult & EW, m\AA & E$_{\rm low}$, eV& g$_{\rm low}$ 
&g$_{\rm up}$& E$_{\rm up}$, eV&$\log$~A\\
\hline
   5847.00 &    Ni I  & 44   &   21&  1.68 &  5&  5&3.80  & 4.19  \\
   6007.31 &    Ni I  & 42   &   28&  1.68 &  5&  5&3.74  & 4.24  \\
   6108.12 &    Ni I  & 45   &   74&  1.68 &  5&  5&3.71  & 5.10  \\
   6128.99 &    Ni I  & 42   &   16&  1.68 &  5&  7&3.70  & 4.02  \\
   6175.42 &    Ni I  & 217  &   11&  4.09 &  3&  3&6.10  & 7.29  \\
   6327.60 &    Ni I  & 44   &   21&  1.68 &  5&  7&3.64  & 4.34  \\
   6482.80 &    Ni I  & 66   &   22&  1.93 &  5&  7&3.85  & 4.58  \\
   6586.33 &    Ni I  & 64   &   33&  1.95 &  3&  3&3.83  & 4.98  \\
   6767.77 &    Ni I  & 57   &   79&  1.83 &  1&  3&3.66  & 5.61  \\
   6914.56 &    Ni I  & 62   &   64&  1.95 &  3&  1&3.74  & 6.14  \\
   7001.54 &    Ni I  & 64   &   10&  1.93 &  5&  5&3.71  & 3.88  \\
   7110.91 &    Ni I  & 64   &   29&  1.93 &  5&  7&3.68  & 4.37  \\
   7122.24 &    Ni I  & 126  &   35&  3.54 &  5&  7&5.28  & 7.24  \\
   7385.24 &    Ni I  & 84   &   22&  2.74 &  9&  7&4.42  & 5.26  \\
   7393.61 &    Ni I  & 109  &   23&  3.61 &  9&  7&5.28  & 7.05  \\
   7422.30 &    Ni I  & 139  &   21&  3.63 &  7&  5&5.31  & 7.22  \\
   7522.77 &    Ni I  & 126  &   21&  3.66 &  3&  5&5.31  & 6.84  \\
   7525.12 &    Ni I  & 139  &   16&  3.63 &  7&  7&5.28  & 6.67  \\
   7555.61 &    Ni I  & 187  &   23&  3.85 &  7&  5&5.49  & 7.41  \\
   7574.05 &    Ni I  & 156  &   15&  3.83 &  3&  3&5.47  & 7.10  \\
   7727.66 &    Ni I  & 156  &   33&  3.68 &  7&  7&5.28  & 6.93  \\
   7797.59 &    Ni I  & 201  &   11&  3.90 &  5&  5&5.49  & 7.18  \\
   5700.24 &    Cu I  & 2    &   12&  1.64 &  4&  4&3.82  & 5.34  \\
   5782.14 &    Cu I  & 2    &   16&  1.64 &  4&  2&3.79  & 6.08  \\
   5853.67 &    Ba II & 2    &   19&   .60 &  4&  4&2.72  & 6.53  \\
   6141.71 &    Ba II &      &   26&   .70 &  6&  4&2.72  & 7.49  \\
   5319.82 &    Nd II & 75   &    6&   .55 & 12& 10&2.88  & 7.03  \\
   6645.13 &    Eu II & 8    &   10&  1.38 & 13& 11&3.24  & 7.43  \\
\hline
\end{tabular}
\end{table*}
\end{appendix}
\end{document}
