Table 1. Log of optical VLT observations, SN 2000cx.

Date Filter MJD^a Exposure Airmass^a Seeing (UT) (s) (arcsec) 2001 07 21 B 52111.36 2x300 1.31 1.05 2001 07 21 V 52111.37 2x240 1.29 0.98 2001 07 21 R 52111.38 2x240 1.27 0.91 2001 07 21 I 52111.38 2x500 1.25 0.90 2001 07 21 U 52111.40 2x780 1.23 1.05 2001 07 22 V 52112.34 2x300 1.38 0.91 2001 09 13 V 52165.25 3x300 1.23 0.94 2001 09 13 I 52165.26 3x800 1.22 0.86 2001 09 13 B 52165.29 3x400 1.21 0.92 2001 09 13 R 52165.31 4x400 1.23 0.87 2001 10 10 R 52192.13 750+418 1.34 0.93 2001 10 17 I 52199.15 8x650 1.24 0.68 2001 10 17 B 52199.22 4x750 1.24 0.67 2001 10 17 V 52199.25 4x750 1.35 0.86 2001 10 19 R 52201.22 4x750 1.25 0.86 2001 11 19 I 52232.02 8x650 1.38 0.92 2001 11 19 R 52232.08 4x750 1.21 0.78 2001 11 20 V 52233.02 4x750 1.36 0.84 2001 11 20 B 52233.06 4x750 1.24 0.79

a Refers to the first exposure.

Table 2. Magnitudes for local standards in the optical.

Offsets^a U B V R I

115.12 W 17.86 N 23.69 (0.18)^b 23.29 (0.04) 22.45 (0.02) 22.00 (0.01) 21.48 (0.02) 134.48 E 154.34 S 21.59 (0.03) 21.54 (0.03) 20.77 (0.02) 20.29 (0.01) 19.76 (0.01) 140.48 E 88.12 S 24.16 (0.20) 23.04 (0.03) 21.48 (0.02) 20.58 (0.01) 19.55 (0.01) 52.08 W 116.12 S 22.59 (0.06) 21.94 (0.02) 20.86 (0.02) 20.23 (0.01) 19.57 (0.01) 40.55 W 106.03 S 22.73 (0.07) 22.62 (0.04) 21.80 (0.01) 21.30 (0.01) 20.73 (0.02) 158.45 E 45.25 N 22.40 (0.07) 23.17 (0.04) 22.38 (0.01) 21.84 (0.02) 21.29 (0.03) 156.22 E 187.75 N 21.52 (0.03) 21.68 (0.01) 21.18 (0.02) 20.85 (0.02) 20.47 (0.01) 188.73 E 6.06 S 24.13 (0.22) 23.04 (0.02) 21.60 (0.02) 20.72 (0.02) 19.67 (0.01) 24.84 W 12.28 N 24.51 (0.29) 23.59 (0.03) 22.69 (0.03) 22.15 (0.02) 21.49 (0.02) 62.29 W 9.51 N 24.55 (0.28) 23.88 (0.04) 22.97 (0.03) 22.45 (0.02) 21.83 (0.03) 68.48 W 121.36 S 23.01 (0.10) 23.09 (0.02) 22.15 (0.02) 21.60 (0.01) 20.95 (0.01) 109.51 W 180.10 N 23.77 (0.15) 23.57 (0.03) 22.86 (0.03) 22.39 (0.02) 21.86 (0.02) 88.22 W 78.11 S 23.02 (0.09) 23.08 (0.02) 22.34 (0.02) 21.88 (0.02) 21.32 (0.02) 82.48 E 104.51 S 23.86 (0.18) 24.05 (0.04) 22.92 (0.03) 22.01 (0.02) 21.18 (0.02) a Offsets in arcseconds measured from the supernova. b Numbers in parentheses are uncertainties

This article was processed by the author using Springer-Verlag L^ATEX A&A style file L-AA version 3.

Table 3. Log of near-IR observations, SN 2000cx.

Date Filter MJD^a Exposure^b Airmass^a Seeing (UT) (s) (arcsec) 2001 07 31 J 52121.35 30x3x13 1.25 0.61 2001 07 31 H 52121.37 15x6x13 1.22 0.40 2001 07 31 Ks 52121.40 12x6x16 1.21 0.39 2001 09 21 J 52173.22 30x3x13 1.23 0.49 2001 09 21 J 30x3x15 0.49 2001 09 21 H 52173.26 15x6x13 1.21 0.40 2001 09 21 H 15x6x14 0.40 2001 11 19 J 52232.01 30x3x15 1.40 0.63 2001 11 19 J 30x3x13 0.63 2001 11 19 H 52232.05 15x6x13 1.25 0.48 2001 11 19 H 15x6x14 0.48 2001 11 20 J 52233.01 30x3x15 1.42 0.60 2001 11 20 J 30x3x13 0.60 2001 11 20 H 52233.05 15x6x13 1.26 0.44 2001 11 20 H 15x6x14 0.44 2001 11 22 J 52235.01 30x3x15 1.38 1.00 2001 11 22 J 30x3x13 1.00 2001 11 22 H 52235.05 15x6x13 1.24 0.68 2001 11 22 H 15x6x14 0.68 height a Refers to the first exposure. b DITxNDITxNEXP

Table 4. Magnitudes of local standards in the near-IR.

Offsets^a J H Ks

5.34 E 2.23 S 18.10 (0.06) 17.47 (0.03) 17.15 (0.01) 17.04 W 18.25 S 20.23 (0.08) 19.22 (0.06) 18.35 (0.03) 80.87 W 17.36 N 18.45 (0.06) 17.84 (0.02) 17.57 (0.02) 33.98 W 26.71 N 19.87 (0.05) 19.07 (0.04) 18.77 (0.04) 36.80 W 21.81 N 18.30 (0.05) 17.66 (0.03) 17.29 (0.02) 83.25 W 70.93 N 16.08 (0.04) 15.42 (0.01) 15.14 (0.01) 105.06 W 40.36 N 17.54 (0.05) 17.12 (0.02) 17.02 (0.01) 130.73 W 29.53 N 19.03 (0.06) 18.31 (0.03) 18.10 (0.02) 103.50 W 56.17 N 20.37 (0.07) 19.72 (0.07) 19.55 (0.06) 49.27 W 12.32 N 18.29 (0.06) 18.14 (0.03) 17.87 (0.02) 97.35 W 66.92 N 21.13 (0.07) 20.47 (0.07) 20.07 (0.09) 115.60 W 17.95 N 20.94 (0.06) 20.46 (0.07) 20.23 (0.10) 37.25 W 25.82 N 20.37 (0.07) 19.70 (0.05) 19.50 (0.06) 57.13 W 40.81 N 20.01 (0.07) 19.04 (0.04) 18.14 (0.02) height a Offsets in arcseconds measured from the supernova.