This article was processed by the author using Springer-Verlag L^ATEX A&A style file L-AA version 3.

Table 1. LTE abundances with respect to the Sun. Values followed by w and s respectively are relative to weak and saturated line. Some abundance determinations, marked COG, have been performed through a Curve of Growth technique.

NGC : 5986 5986 6656 6656 6712 7078 7078 7078 6218 star : 7 6 V-4 ZNG 5 ZNG 1 K 260 K 996 K 1082 ZNG 7

Element Line

2 HeI 4471.5 −0.70 −0.60 — — — — — — — 5875.6 −0.90 −0.20 — — — — — — —

8 OI 4368.24 — +0.65 — — — — — — — 6156.0 — +0.65 — — +0.40 — — — — 6156.8 — +0.65 — — +0.40 — — — — 6158.2 — +0.65 — — +0.40 — — — —

11 Na COG +0.47?

5889.97 > 1.0 +0.70 — — +0.60 +1.30 — +0.15 — 5895.94 > 1.0 +0.70 — — +0.70 +1.20 — +0.25 —

12 MgII COG +0.37 4481.2 +0.37 +0.25 +0.50 +0.00 +0.00 −0.10 −0.70 −0.50 +0.80 4571.10 — — +0.50 — — −0.30 — — s 4703.00 +0.37 — +0.55 +0.00w — −0.30 — — +0.80 5528.42 +0.37 — — — — −0.30 — −0.30 —

14 SiII 5055.98 — +0.30 — +0.30 +0.60 — −0.20 +0.50 — 5056.32 — +0.30 — +0.30 +0.60 — −0.10 +0.50 —

20 CaI COG +0.22 4226.74 +0.30 — +0.60 +0.90 — +1.20 — +0.80 s 4283.01 +0.30 — +0.40 +0.70 — +0.50 — +0.90 +0.10 4455.89 +0.15 — +0.30 +0.60 — +0.30 — +0.80 +0.10 5581.98 +0.20 — — — — +0.30 — — — 5588.76 +0.20 — — — — +0.30 — +0.80 — 5590.13 +0.20 — — — — +0.30 — +0.80 — 5594.47 +0.20 — — — — +0.30 — +0.90 — 5601.29 +0.20 — — — — +0.20 — +0.80 — 5857.46 +0.20 — — — — +0.30 — +0.90 —

21 ScII 4246.82 +0.15 — — +0.9? — +0.60 — +0.60 s 4294.78 +0.15 — +0.10 +0.35w — +0.50 — — +0.10 4320.73 +0.25 +0.20 — +0.35 — +0.50 — +0.60 +0.00 4400.4 +0.15 +0.30 +0.10 +0.35 — +0.40 — +0.80 +0.00 5239.82 +0.15 — — — — +0.40 — +0.80 +0.00 5640.99 +0.15 — — — — +0.40 — +0.80 +0.00 5669.04 +0.15 — — — — +0.40 — +0.80 +0.00

22 TiII 4287.9 +0.30 +0.25 +0.40 +0.90 — +0.30 — +0.75 +0.10 4290.2 +0.30 +0.20 +0.40 +0.90 -1.0 +0.30 — +0.75 +0.00 4300.05 +0.35 +0.25 +0.45 — -1.0 +0.40 — +0.80 +0.10 4301.9 +0.35 +0.20 +0.40 — -1.2 — — +0.80 +0.20 4316.8 +0.30 +0.20w +0.35 +0.85 — +0.20 — +0.70 +0.30 4367.5 +0.30 +0.20w +0.35 +0.90 — +0.30 — +0.70 +0.20 4374.9 +0.30 +0.20w +0.40 +0.80 — +0.10 — — +0.00 4395.04 — +0.20 +0.40 — -1.2 +0.20 — +0.80 +0.20 4398.3 +0.30 — +0.40 +0.90 — — — +0.80 +0.20 4399.8 — +0.25 +0.40 — — +0.20 — +0.75 — 4417.7 — +0.25 +0.40 — -1.1 +0.20 — +0.70 +0.20 4488.3 +0.30 +0.20 +0.30 +0.90 — +0.20 — +0.75 +0.30

Table 2. Continued from previous Table.

NGC : 5986 5986 6656 6656 6712 7078 7078 7078 6218 star : 7 6 V-4 ZNG 5 ZNG 1 K 260 K 996 K 1082 ZNG 7

Element Line

24 CrII 4261.94 0.00 +0.15 +0.05 +0.30 — +0.10 — — — 4275.4 — +0.15 +0.10 +0.30 — — — — — 4558.6 0.00 +0.15 −0.20 +0.45 −0.10 0.00 — −0.10 +0.20 4588.2 0.00 +0.15 −0.20 — −0.10 0.00 — −0.10 +0.20 4592.1 0.00 +0.15 +0.00 +0.40 — — — −0.10 +0.20 4616.6 — +0.15 +0.00 +0.40 — 0.00 — −0.10 +0.20 4618.8 — +0.15 +0.00 +0.40 −0.20 0.00 — −0.10 +0.20 5237.36 0.00 +0.15 — — — — — — —

28 NiI 5035.37 +0.00 — +0.00 — — 0.00 — — −0.40 5476.92 +0.00 — — — — −0.20 — — —

30 ZnI 4722.2 +0.10w — +0.20 — — 0.00 — — +0.25 4810.5 +0.10w — +0.20 — — 0.00 — — +0.20

38 SrII 4215.52 +0.00 −0.70w +0.70 +0.00 — +0.15 — +0.20 −0.5s?

39 YII 4309.6 −0.10 — +0.20 +0.10 — −0.20 — +0.80 +0.0 4358.7 −0.10w — +0.25 — — −0.20 — — −0.10 4374.9 −0.10 — +0.25 −0.10 — −0.20 — +0.60 −0.30 4398.0 −0.10 — +0.20 +0.00 — −0.20 — +0.60 −0.30 5087.42 — — — — — −0.20 — +0.70 −0.40 5402.8 +0.20? — — — — — — — —

40 ZrII COG +0.45 — — — — — — — — 4208.99 +0.40 — +0.50 — — 0.00 — +1.00 +0.20 4211.9 +0.45w — +0.70 — — +0.30 — +1.00 +0.30 4485.45 +0.45w — +0.70 — — – — — — 4495.46 +0.40 — +0.50 — — +0.20 — — — 4496.97 +0.45 — +0.60 — — +0.20 — — — 5112.28 +0.40 — +0.50 — — — — — +0.10

56 BaII 4554.0 +0.10 — +0.85 +0.30 — +0.25 — +0.30 −0.5s? 4934.09 +0.10 — +0.90 +0.30 — +0.20 — +0.30 −0.5s? 5853.69 +0.10 — — — — 0.00 — — — 6141.7 +0.15 — — — — 0.00 — +0.30 — COG +0.0 — — — — — — — —

57 LaII 4238.38 +0.40w — +0.50 — — — — — — 4286.96 +0.40 — — — — — — — — 4429.9 +0.30 — +0.50 — — — — — — 4920.98 +0.50 — +0.60 — −0.1 +0.10 — — s 4921.78 +0.50 — +0.60 — −0.1 +0.10 — — −0.20

58 CeII 4222.6 +0.40w — +0.60 — — +0.30 — — −0.20 4239.91 +0.40w — +0.60 — — +0.10 — — — 4268.16 +0.20 — — — — +0.20 — — — 4562.36 — — +0.50 — — +0.20 — — — 4628.16 +0.20 — +0.45 — — +0.10 — — −0.30

60 NdII 4232.20 — — +0.10 — — — — — — 4303.6 +0.10 — +0.20 — — +0.10 — — —

62 SmII 4318.93 +0.40w — — — — — — — +0.00 4424.34 +0.40 — +0.40 — — +0.20 — — — 4434.32 +0.40 — +0.50 — — +0.10 — — +0.15 4467.34 +0.30 — +0.40 — — +0.10 — — +0.00

63 EuII 4205.0 +0.60 — +0.45 +1.30 — +0.60 — — +0.70