Table 1. Atmospheric parameters, abundances, 3D velocities with respect to the Sun, orbital parameters, probability to belong to the thin disk and the thick disk for the 174 program stars

HD T_{eff} log g [Fe/H] [Mg/Fe] [Si/Fe] [Ni/Fe] U V W Rmin Rmax Zmax ecc Pr1 Pr2 HD000245 5400 3.4 –0.84 +0.32 +0.29 –0.02 –44.40 –107.40 –50.90 3.13 8.70 0.75 0.47 0.00 1.00 HD001562 5828 4.0 –0.32 +0.18 +0.07 –0.02 17.90 10.50 –33.60 8.21 10.33 0.40 0.11 0.96 0.04 HD001835 5790 4.5 +0.13 +0.00 +0.07 +0.03 –35.70 –14.70 –0.20 7.40 8.99 0.07 0.10 0.98 0.02 HD003765 5079 4.3 +0.01 +0.02 +0.09 +0.04 17.90 –82.50 –27.40 4.06 8.62 0.27 0.36 0.04 0.96 HD004307 5889 4.0 –0.18 +0.06 +0.05 +0.00 21.50 –25.10 2.50 6.82 8.90 0.10 0.13 0.97 0.03 HD004614 5965 4.4 –0.24 +0.10 +0.09 +0.02 –29.60 –10.90 –16.80 7.72 8.91 0.13 0.07 0.97 0.03 HD005294 5779 4.1 –0.17 +0.08 +0.02 –0.03 33.50 –4.60 –14.70 7.50 9.85 0.11 0.13 0.98 0.02 HD006582 5240 4.3 –0.94 +0.37 +0.32 +0.00 –42.40 –159.40 –35.30 1.39 8.61 0.47 0.72 0.00 0.95 HD008648 5790 4.2 +0.12 +0.00 +0.10 +0.09 –4.90 –15.80 –4.70 7.72 8.53 0.03 0.05 0.98 0.02 HD009826 6074 4.0 +0.10 +0.09 +0.15 –0.01 28.70 –22.60 –14.20 6.84 9.13 0.10 0.14 0.97 0.03 HD010145 5673 4.4 –0.01 +0.13 +0.07 +0.05 –112.20 –62.60 –20.30 4.39 10.44 0.19 0.41 0.07 0.93 HD010307 5881 4.3 +0.02 +0.06 +0.05 +0.06 –37.90 –30.40 –2.10 6.55 8.82 0.05 0.15 0.95 0.05 HD010476 5242 4.3 –0.05 +0.03 +0.08 –0.01 34.70 –24.90 2.40 6.62 9.24 0.10 0.17 0.96 0.04 HD010780 5407 4.3 +0.04 +0.04 –0.01 +0.03 –24.60 –16.40 –5.40 7.52 8.70 0.01 0.07 0.98 0.02 HD011007 5980 4.0 –0.20 +0.10 +0.06 +0.00 25.40 17.90 39.60 8.19 11.37 0.85 0.16 0.92 0.08 HD013403 5724 4.0 –0.31 +0.24 +0.24 +0.08 –22.20 –67.00 –21.70 4.78 8.57 0.19 0.28 0.34 0.66 HD013507 5714 4.5 –0.02 –0.05 +0.05 –0.02 –9.30 –7.00 –11.80 8.37 8.52 0.07 0.01 0.98 0.02 HD013783 5350 4.1 –0.75 +0.41 +0.30 +0.02 48.60 6.40 –77.50 7.67 11.70 1.71 0.21 0.14 0.86 HD013974 5590 3.8 –0.49 +0.17 +0.09 –0.08 –40.40 –44.00 7.90 5.82 8.77 0.17 0.20 0.87 0.13 HD014374 5449 4.3 –0.09 +0.07 +0.08 +0.01 –18.20 –8.30 –19.50 8.13 8.69 0.16 0.03 0.98 0.02 HD017674 5909 4.0 –0.14 +0.11 +0.06 –0.03 –24.70 –18.80 2.20 7.40 8.71 0.10 0.08 0.98 0.02 HD017925 5225 4.3 –0.04 +0.04 +0.05 +0.03 –15.20 –21.90 –9.00 7.28 8.53 0.04 0.08 0.97 0.03 HD019019 6063 4.0 –0.17 +0.15 +0.05 –0.11 –40.10 –15.10 3.60 7.32 9.12 0.12 0.11 0.97 0.03 HD019308 5844 4.3 +0.08 +0.00 +0.09 +0.03 –54.70 –43.60 –21.70 5.73 9.08 0.19 0.23 0.78 0.22 HD019373 5963 4.2 +0.06 –0.03 +0.08 +0.06 –75.50 –15.60 21.30 6.64 10.34 0.40 0.22 0.91 0.09 HD022049 5084 4.4 –0.15 +0.03 +0.10 +0.00 –3.60 7.00 –20.50 8.48 9.54 0.18 0.06 0.98 0.02 HD022484 6037 4.1 –0.03 +0.02 +0.05 –0.01 1.10 –15.30 –41.90 7.79 8.62 0.51 0.05 0.91 0.09 HD022556 6155 4.2 –0.17 +0.07 +0.12 +0.03 7.10 10.20 0.90 8.41 10.01 0.10 0.09 0.98 0.02

HD T_{eff} log g [Fe/H] [Mg/Fe] [Si/Fe] [Ni/Fe] U V W Rmin Rmax Zmax ecc Pr1 Pr2 HD022879 5972 4.5 –0.77 +0.42 +0.28 +0.02 –109.60 –85.60 –44.90 3.66 10.05 0.65 0.47 0.00 1.00 HD023050 5929 4.4 –0.36 +0.21 +0.18 +0.03 –68.20 –66.70 –1.20 4.58 9.17 0.06 0.33 0.26 0.74 HD024053 5723 4.4 +0.04 –0.01 +0.07 –0.04 –4.80 –10.90 0.10 8.07 8.56 0.07 0.03 0.98 0.02 HD024206 5633 4.5 –0.08 +0.05 +0.09 +0.03 –14.40 –47.00 –16.50 5.79 8.53 0.12 0.19 0.85 0.15 HD028005 5980 4.2 +0.23 +0.15 +0.12 +0.10 –46.70 –22.10 –22.00 6.88 9.18 0.20 0.14 0.94 0.06 HD028447 5639 4.0 –0.09 +0.07 +0.10 +0.04 –28.80 –6.10 19.60 8.01 9.12 0.34 0.06 0.97 0.03 HD029150 5733 4.3 +0.00 +0.09 +0.05 +0.00 6.50 –7.50 0.20 8.03 8.89 0.07 0.05 0.98 0.02 HD029310 5852 4.2 +0.08 +0.00 +0.09 –0.02 –45.40 –15.50 –5.00 7.22 9.29 0.02 0.13 0.97 0.03 HD029645 6009 4.0 +0.14 +0.03 +0.08 +0.06 –55.60 –20.40 13.00 6.81 9.48 0.25 0.16 0.95 0.05 HD030495 5820 4.4 –0.05 +0.06 +0.07 –0.01 –23.80 –8.50 –2.90 7.98 8.81 0.04 0.05 0.98 0.02 HD030562 5859 4.0 +0.18 +0.03 +0.06 +0.08 –52.00 –72.80 –21.00 4.41 8.83 0.18 0.33 0.13 0.87 HD032147 4945 4.4 +0.13 –0.06 +0.11 +0.03 5.10 –54.70 –10.70 5.36 8.55 0.05 0.23 0.76 0.24 HD033632 6072 4.3 –0.24 +0.12 +0.07 –0.05 1.50 –3.40 –24.10 8.32 8.93 0.22 0.04 0.98 0.02 HD034411 5890 4.2 +0.10 –0.01 +0.07 +0.03 –75.30 –35.10 4.40 5.86 9.72 0.13 0.25 0.86 0.14 HD038858 5776 4.3 –0.23 +0.11 +0.04 +0.01 –17.20 –29.60 –12.10 6.78 8.54 0.07 0.11 0.96 0.04 HD039587 5955 4.3 –0.03 +0.07 +0.06 –0.07 12.20 1.60 –7.20 8.15 9.47 0.01 0.07 0.98 0.02 HD040616 5881 4.0 –0.22 +0.05 +0.02 –0.03 –85.10 5.30 –9.20 7.13 11.81 0.05 0.25 0.94 0.06 HD041330 5904 4.1 –0.18 +0.04 +0.08 –0.01 10.20 –25.80 –32.90 7.00 8.71 0.35 0.11 0.92 0.08 HD041593 5312 4.3 –0.04 –0.08 +0.05 –0.03 10.70 0.30 –11.00 8.17 9.36 0.06 0.07 0.98 0.02 HD043587 5927 4.1 –0.11 +0.08 +0.08 +0.06 –18.30 15.70 –8.90 8.48 10.35 0.04 0.10 0.98 0.02 HD043856 6143 4.1 –0.19 +0.07 +0.08 +0.00 62.40 –0.70 –1.30 7.04 11.29 0.06 0.23 0.97 0.03 HD043947 6001 4.3 –0.24 +0.12 +0.08 –0.03 –38.90 –11.20 –2.60 7.54 9.20 0.04 0.10 0.98 0.02 HD045067 6058 4.0 –0.02 +0.04 +0.05 –17.60 –65.90 12.30 4.84 8.54 0.22 0.28 0.45 0.55 HD050281 4712 3.9 –0.20 –0.02 +0.11 –0.06 0.10 12.80 –19.70 8.47 10.10 0.18 0.09 0.98 0.02 HD051419 5746 4.1 –0.37 +0.15 +0.08 –0.01 25.60 14.20 4.20 8.10 10.80 0.13 0.14 0.98 0.02 HD055575 5949 4.3 –0.31 +0.21 +0.10 +0.01 –79.70 –1.70 32.30 7.06 11.26 0.66 0.23 0.88 0.12 HD058595 5707 4.3 –0.31 +0.07 +0.05 +0.00 –10.80 –7.70 16.40 8.36 8.55 0.28 0.01 0.98 0.02 HD061606 4956 4.4 –0.12 –0.10 +0.08 –0.04 25.50 –2.30 –7.50 7.73 9.69 0.02 0.11 0.98 0.02

HD T_{eff} log g [Fe/H] [Mg/Fe] [Si/Fe] [Ni/Fe] U V W Rmin Rmax Zmax ecc Pr1 Pr2 HD062613 5541 4.4 –0.10 +0.07 +0.04 +0.02 –8.80 8.70 –37.80 8.51 9.77 0.46 0.07 0.95 0.05 HD064606 5250 4.2 –0.91 +0.37 +0.27 +0.03 –77.50 –60.90 –0.20 4.75 9.39 0.07 0.33 0.35 0.65 HD064815 5864 4.0 –0.33 +0.31 +0.22 +0.04 72.90 –32.10 42.90 5.88 10.55 0.92 0.28 0.60 0.40 HD065583 5373 4.6 –0.67 +0.22 +0.26 +0.10 –13.20 –89.10 –29.80 3.82 8.52 0.30 0.38 0.01 0.99 HD065874 5936 4.0 +0.05 +0.09 +0.08 +0.06 9.00 –4.10 –17.60 8.10 9.16 0.14 0.06 0.98 0.02 HD066573 5821 4.6 –0.53 +0.23 +0.24 +0.08 66.40 25.90 11.10 7.53 13.44 0.27 0.28 0.94 0.06 HD068017 5651 4.2 –0.42 +0.31 +0.21 +0.05 –47.80 –60.60 –39.40 5.03 8.83 0.48 0.27 0.22 0.78 HD068638 5430 4.4 –0.24 +0.05 +0.07 –0.02 –49.30 –18.90 –28.40 6.99 9.32 0.29 0.14 0.93 0.07 HD070923 5986 4.2 +0.06 +0.07 +0.09 +0.07 23.00 –37.30 –0.50 6.16 8.85 0.06 0.18 0.94 0.06 HD071148 5850 4.2 +0.00 +0.03 +0.05 +0.01 20.10 –38.20 –22.50 6.16 8.78 0.20 0.18 0.90 0.10 HD072760 5349 4.1 +0.01 +0.02 –0.01 –0.06 –35.00 –18.90 –1.90 7.22 8.89 0.05 0.10 0.97 0.03 HD072905 5884 4.4 –0.07 +0.09 +0.04 –0.04 10.30 0.40 –10.10 8.18 9.34 0.05 0.07 0.98 0.02 HD073344 6060 4.1 +0.08 +0.08 +0.10 +0.03 –4.90 –24.60 –9.10 7.13 8.54 0.04 0.09 0.97 0.03 HD075732 5373 4.3 +0.25 +0.12 +0.10 +0.10 –36.90 –18.10 –8.00 7.22 8.95 0.03 0.11 0.97 0.03 HD076151 5776 4.4 +0.05 +0.06 +0.09 +0.05 –40.30 –20.10 –11.20 7.07 9.00 0.06 0.12 0.97 0.03 HD076932 5840 4.0 –0.95 +0.38 +0.33 +0.03 –48.10 –90.30 69.50 3.99 8.80 1.66 0.38 0.00 1.00 HD081809 5782 4.0 –0.28 +0.16 +0.22 +0.08 –42.80 –46.90 –2.00 5.66 8.78 0.05 0.22 0.84 0.16 HD082106 4827 4.1 –0.11 –0.03 +0.05 –0.03 –40.80 –13.70 –0.10 7.37 9.16 0.07 0.11 0.98 0.02 HD088072 5778 4.3 +0.00 –0.05 +0.09 +0.03 –21.20 4.00 –33.70 8.40 9.47 0.38 0.06 0.96 0.04 HD089251 5886 4.0 –0.12 +0.05 +0.07 +0.03 19.70 –3.80 –17.00 7.85 9.45 0.14 0.09 0.98 0.02 HD089269 5674 4.4 –0.23 +0.13 +0.09 +0.03 12.90 –28.00 1.80 6.77 8.71 0.09 0.12 0.97 0.03 HD091347 5931 4.4 –0.43 +0.14 +0.15 +0.05 50.40 27.90 –2.70 7.85 12.87 0.06 0.24 0.96 0.04 HD095128 5887 4.3 +0.01 +0.07 +0.05 +0.03 –24.00 –2.50 0.50 8.20 9.06 0.08 0.05 0.98 0.02 HD098630 6060 4.0 +0.22 +0.09 +0.16 +0.12 19.00 –25.50 6.10 6.83 8.89 0.18 0.13 0.97 0.03 HD101177 5932 4.1 –0.16 +0.06 +0.04 –0.07 –51.70 –27.20 –34.20 6.58 9.20 0.39 0.17 0.86 0.14 HD102870 6055 4.0 +0.13 +0.08 +0.07 +0.04 40.30 3.40 6.70 7.56 10.53 0.17 0.16 0.98 0.02 HD106516 6165 4.4 –0.72 +0.25 +0.35 +0.07 54.50 –75.60 –56.60 4.29 9.20 0.90 0.36 0.01 0.99

HD T_{eff} log g [Fe/H] [Mg/Fe] [Si/Fe] [Ni/Fe] U V W Rmin Rmax Zmax ecc Pr1 Pr2 HD107213 6156 4.1 +0.07 +0.14 +0.14 +0.02 –25.70 –48.60 –14.90 5.67 8.58 0.12 0.20 0.82 0.18 HD107705 6040 4.2 +0.06 –0.10 +0.09 +0.01 –16.10 –19.30 –1.10 7.44 8.53 0.06 0.07 0.98 0.02 HD108076 5700 4.3 –0.89 +0.42 +0.31 +0.06 –93.90 –41.70 –15.20 5.36 10.19 0.13 0.31 0.62 0.38 HD108954 6037 4.4 –0.12 +0.09 +0.07 –0.01 –0.20 8.60 –27.60 8.46 9.75 0.29 0.07 0.97 0.03 HD109358 5897 4.2 –0.18 +0.09 +0.05 +0.02 –30.80 –3.50 1.20 7.99 9.20 0.09 0.07 0.98 0.02 HD110833 5075 4.3 +0.00 –0.04 +0.10 +0.05 –19.00 –21.40 13.30 7.30 8.57 0.23 0.08 0.97 0.03 HD110897 5925 4.2 –0.45 +0.25 +0.10 –0.01 –41.70 6.90 75.40 8.14 11.05 1.99 0.15 0.20 0.80 HD112758 5203 4.2 –0.56 +0.19 +0.23 +0.07 –74.90 –35.20 18.30 5.87 9.70 0.33 0.25 0.82 0.18 HD114710 5954 4.3 +0.07 –0.07 +0.05 –0.02 –50.40 11.50 7.50 7.91 10.79 0.18 0.15 0.97 0.03 HD115383 6012 4.3 +0.11 +0.04 +0.10 +0.02 –38.60 1.50 –18.00 7.95 9.72 0.15 0.10 0.97 0.03 HD116443 4976 3.9 –0.48 +0.06 +0.16 –0.03 1.50 5.20 31.30 8.41 9.59 0.57 0.07 0.96 0.04 HD117043 5610 4.5 +0.21 +0.02 +0.04 +0.13 –35.40 –26.80 –32.50 6.82 8.82 0.35 0.13 0.90 0.10 HD117176 5611 4.0 –0.03 +0.07 +0.05 +0.02 13.00 –51.90 –3.90 5.46 8.61 0.03 0.22 0.82 0.18 HD117635 5230 4.3 –0.46 +0.21 +0.17 +0.01 –137.80 –30.30 –6.10 5.21 12.49 0.04 0.41 0.35 0.65 HD119802 4763 4.0 –0.05 –0.04 +0.07 –0.06 –4.70 –9.90 –13.80 8.10 8.53 0.09 0.03 0.98 0.02 HD122064 4937 4.5 +0.07 +0.01 +0.14 +0.09 –2.70 –10.20 –26.60 8.09 8.57 0.25 0.03 0.97 0.03 HD125184 5695 4.3 +0.31 –0.05 +0.01 +0.10 36.10 3.60 –43.50 7.68 10.49 0.61 0.15 0.90 0.10 HD126053 5728 4.2 –0.32 +0.17 +0.12 –0.02 22.20 –15.50 –39.30 7.34 9.12 0.47 0.11 0.92 0.08 HD131977 4683 3.7 –0.24 +0.12 +0.18 +0.03 48.20 –22.10 –32.70 6.56 9.76 0.38 0.20 0.90 0.10 HD135204 5413 4.0 –0.16 +0.23 +0.13 +0.00 –85.40 –99.20 –15.00 3.24 9.26 0.11 0.48 0.00 1.00 HD135599 5257 4.3 –0.12 +0.00 +0.05 –0.01 9.70 1.10 –13.70 8.18 9.35 0.09 0.07 0.98 0.02 HD137107 6037 4.3 +0.00 +0.05 +0.06 –0.05 14.90 –5.50 –12.90 7.87 9.17 0.08 0.08 0.98 0.02 HD139323 5204 4.6 +0.19 +0.05 +0.04 +0.12 –44.00 –64.30 –26.80 4.82 8.72 0.26 0.29 0.30 0.70 HD139341 5242 4.6 +0.21 –0.02 +0.09 +0.11 –42.90 –67.00 –24.80 4.70 8.70 0.23 0.30 0.25 0.75 HD140538 5675 4.5 +0.02 –0.02 +0.05 +0.05 18.00 –7.20 10.50 7.74 9.22 0.20 0.09 0.98 0.02 HD141004 5884 4.1 –0.02 +0.10 +0.08 +0.03 –49.10 –24.00 –39.80 6.78 9.19 0.49 0.15 0.84 0.16 HD144287 5414 4.5 –0.15 +0.07 +0.12 +0.00 –96.60 –9.30 11.30 6.45 11.45 0.25 0.28 0.89 0.11 HD144579 5294 4.1 –0.70 +0.37 +0.28 +0.05 –36.00 –58.60 –18.50 5.11 8.65 0.15 0.26 0.57 0.43

HD T_{eff} log g [Fe/H] [Mg/Fe] [Si/Fe] [Ni/Fe] U V W Rmin Rmax Zmax ecc Pr1 Pr2 HD145675 5406 4.5 +0.32 +0.06 +0.09 +0.13 23.70 –12.40 –16.00 7.40 9.22 0.12 0.11 0.98 0.02 HD146233 5799 4.4 +0.01 +0.04 +0.05 +0.03 25.90 –14.70 –23.10 7.25 9.22 0.21 0.12 0.97 0.03 HD149661 5294 4.5 –0.04 +0.02 +0.09 +0.05 1.00 –0.40 –28.50 8.36 9.06 0.29 0.04 0.97 0.03 HD151541 5368 4.2 –0.22 +0.05 +0.03 –0.06 –56.30 –10.50 16.80 7.17 9.81 0.31 0.16 0.96 0.04 HD152391 5495 4.3 –0.08 +0.06 +0.04 +0.01 84.50 –110.40 9.70 2.81 9.57 0.20 0.55 0.00 1.00 HD154345 5503 4.3 –0.21 +0.07 +0.10 +0.00 –79.40 –8.60 –36.10 6.81 10.80 0.47 0.23 0.84 0.16 HD154931 5910 4.0 –0.10 +0.14 +0.08 +0.05 11.80 –52.90 –19.10 5.40 8.54 0.15 0.23 0.75 0.25 HD157089 5785 4.0 –0.56 +0.29 +0.24 –0.03 –166.90 –41.20 –10.30 4.55 13.70 0.07 0.50 0.04 0.96 HD158633 5290 4.2 –0.49 +0.17 +0.15 +0.00 1.50 –50.00 5.50 5.61 8.53 0.13 0.21 0.85 0.15 HD159062 5414 4.3 –0.40 +0.28 +0.22 +0.06 –26.40 –55.60 –60.30 5.49 8.59 0.94 0.22 0.09 0.91 HD159222 5834 4.3 +0.06 +0.00 +0.08 +0.03 –30.80 –49.90 –2.20 5.56 8.61 0.04 0.22 0.83 0.17 HD159482 5620 4.1 –0.89 +0.37 +0.34 +0.02 –165.20 –62.80 80.50 4.19 13.49 2.78 0.53 0.00 0.98 HD159909 5749 4.1 +0.06 +0.06 +0.07 +0.01 –59.10 –55.00 –6.90 5.11 9.00 0.02 0.28 0.62 0.38 HD160346 4983 4.3 –0.10 –0.01 +0.09 +0.00 19.40 0.50 11.60 7.95 9.63 0.22 0.10 0.98 0.02 HD161098 5617 4.3 –0.27 +0.07 +0.09 –0.02 –1.10 –40.90 –7.10 6.09 8.49 0.02 0.16 0.92 0.08 HD164922 5392 4.3 +0.04 +0.08 +0.11 +0.07 60.10 5.20 –48.00 7.27 11.60 0.77 0.23 0.80 0.20 HD165173 5505 4.3 –0.05 +0.13 +0.10 +0.04 –5.50 2.90 13.40 8.46 9.16 0.24 0.04 0.98 0.02 HD165341 5314 4.3 –0.08 +0.03 +0.10 +0.03 6.20 –18.80 –14.30 7.39 8.65 0.09 0.08 0.97 0.03 HD165401 5877 4.3 –0.36 +0.26 +0.19 +0.05 –77.80 –89.50 –38.60 3.64 9.17 0.48 0.43 0.00 1.00 HD165476 5845 4.1 –0.06 +0.01 +0.04 –0.04 39.50 –21.10 36.10 6.80 9.49 0.67 0.17 0.90 0.10 HD165670 6178 4.0 –0.10 –0.03 +0.11 +0.01 29.90 –5.60 –14.00 7.51 9.63 0.10 0.12 0.98 0.02 HD165908 5925 4.1 –0.60 +0.16 +0.10 –0.06 –5.90 0.70 9.50 8.48 8.99 0.19 0.03 0.98 0.02 HD166620 5035 4.0 –0.22 +0.13 +0.13 +0.00 16.80 –31.30 0.30 6.54 8.74 0.07 0.14 0.96 0.04 HD168009 5826 4.1 –0.01 +0.03 +0.05 +0.02 –4.60 –62.20 –22.60 5.00 8.49 0.20 0.26 0.49 0.51 HD173701 5423 4.4 +0.18 +0.00 +0.17 +0.17 –9.30 –46.70 –3.20 5.79 8.49 0.03 0.19 0.88 0.12 HD176841 5841 4.3 +0.23 +0.07 +0.12 +0.11 9.30 –24.70 12.30 7.04 8.66 0.22 0.10 0.97 0.03 HD182488 5435 4.4 +0.07 +0.05 +0.10 +0.09 –20.90 –14.10 –3.10 7.70 8.63 0.03 0.06 0.98 0.02 HD182736 5430 3.7 –0.06 +0.04 +0.01 +0.05 –28.40 –39.10 –28.70 6.17 8.62 0.28 0.17 0.85 0.15

HD T_{eff} log g [Fe/H] [Mg/Fe] [Si/Fe] [Ni/Fe] U V W Rmin Rmax Zmax ecc Pr1 Pr2 HD183341 5911 4.3 –0.01 +0.07 +0.09 +0.01 –23.00 –34.40 1.50 6.43 8.54 0.09 0.14 0.95 0.05 HD184499 5750 4.0 –0.64 +0.37 +0.34 +0.07 –64.90 –161.80 58.60 1.34 8.96 1.22 0.74 0.00 0.88 HD184768 5713 4.2 –0.07 +0.15 +0.15 +0.06 25.20 –62.20 –27.80 4.92 8.69 0.28 0.28 0.40 0.60 HD185144 5271 4.2 –0.33 +0.01 +0.06 –0.04 31.70 43.40 –19.10 8.24 13.90 0.20 0.26 0.89 0.11 HD186104 5753 4.2 +0.05 +0.06 +0.07 +0.04 –53.20 –39.80 –20.30 5.88 9.02 0.17 0.21 0.84 0.16 HD186408 5803 4.2 +0.09 +0.09 +0.06 +0.03 17.90 –30.50 –0.30 6.58 8.76 0.06 0.14 0.96 0.04 HD186427 5752 4.2 +0.02 +0.09 +0.07 +0.05 17.50 –30.60 –1.80 6.57 8.75 0.05 0.14 0.96 0.04 HD187897 5887 4.3 +0.08 +0.05 +0.08 +0.02 –41.10 –15.20 –6.50 7.25 9.11 0.01 0.11 0.97 0.03 HD189087 5341 4.4 –0.12 +0.02 +0.11 +0.00 –40.40 –15.00 3.50 7.29 9.11 0.11 0.11 0.97 0.03 HD190360 5606 4.4 +0.12 +0.06 +0.13 +0.10 –12.10 –44.90 –64.00 6.15 8.51 1.02 0.16 0.17 0.83 HD190404 4963 3.9 –0.82 +0.39 +0.29 –0.03 84.80 –46.00 27.20 5.13 10.43 0.53 0.34 0.49 0.51 HD191533 6167 3.8 –0.10 +0.03 +0.09 –0.03 42.70 –26.20 –11.60 6.43 9.38 0.07 0.19 0.95 0.05 HD194598 5890 4.0 –1.21 +0.28 +0.28 –0.11 –75.80 –276.40 –30.50 0.99 8.92 0.46 0.80 0.00 0.00 HD195005 6075 4.2 –0.06 +0.12 +0.08 –0.07 –6.10 –8.20 –6.70 8.22 8.50 0.01 0.02 0.98 0.02 HD195104 6103 4.3 –0.19 +0.16 +0.07 –0.09 –14.90 –6.60 3.00 8.24 8.62 0.10 0.02 0.98 0.02 HD197076 5821 4.3 –0.17 +0.07 +0.09 +0.01 –43.20 –15.10 16.30 7.25 9.21 0.29 0.12 0.97 0.03 HD199960 5878 4.2 +0.23 +0.02 +0.10 +0.11 –7.40 –24.50 –2.60 7.10 8.48 0.04 0.09 0.97 0.03 HD201889 5600 4.1 –0.85 +0.40 +0.33 –0.02 –129.40 –82.30 –37.20 3.59 10.71 0.50 0.50 0.00 1.00 HD201891 5850 4.4 –0.96 +0.29 +0.32 –0.03 92.00 –115.10 –58.60 2.71 9.82 1.03 0.57 0.00 0.99 HD202108 5712 4.2 –0.21 +0.06 +0.05 –0.05 –7.50 6.50 10.40 8.49 9.47 0.20 0.05 0.98 0.02 HD203235 6071 4.1 +0.05 +0.10 +0.11 –0.01 –46.30 –18.70 –18.40 6.97 9.19 0.15 0.14 0.96 0.04 HD204521 5809 4.6 –0.66 +0.27 +0.20 +0.04 15.40 –73.20 –19.00 4.46 8.61 0.15 0.32 0.21 0.79 HD205702 6020 4.2 +0.01 +0.10 +0.08 +0.06 29.60 –29.50 6.90 6.49 8.99 0.16 0.16 0.96 0.04 HD208906 5965 4.2 –0.80 +0.23 +0.25 +0.04 73.20 –2.10 –11.00 6.79 11.55 0.07 0.26 0.95 0.05 HD210667 5461 4.5 +0.15 –0.10 +0.06 +0.07 13.70 –25.10 –16.50 6.93 8.73 0.12 0.11 0.96 0.04 HD210752 6014 4.6 –0.53 +0.07 +0.11 +0.02 –10.50 27.70 –63.10 8.49 12.01 1.22 0.17 0.48 0.52 HD211472 5319 4.4 –0.04 +0.00 +0.05 –0.01 –20.00 –12.10 –6.00 7.84 8.65 0.00 0.05 0.98 0.02 HD215065 5726 4.0 –0.43 +0.31 +0.18 +0.03 –31.50 –66.10 26.80 4.83 8.61 0.46 0.28 0.29 0.71

HD T_{eff} log g [Fe/H] [Mg/Fe] [Si/Fe] [Ni/Fe] U V W Rmin Rmax Zmax ecc Pr1 Pr2 HD215704 5418 4.2 +0.07 +0.04 +0.06 +0.05 –17.00 –58.90 –9.00 5.16 8.52 0.03 0.25 0.67 0.33 HD217014 5778 4.2 +0.14 +0.06 +0.08 +0.09 –15.20 –29.70 15.60 6.81 8.52 0.27 0.11 0.95 0.05 HD218209 5705 4.5 –0.43 +0.19 +0.18 +0.04 –72.80 –47.00 –14.50 5.36 9.45 0.10 0.28 0.68 0.32 HD219134 4900 4.2 +0.05 –0.02 +0.09 +0.04 –52.30 –39.70 –14.10 5.91 9.02 0.09 0.21 0.87 0.13 HD219396 5733 4.0 –0.10 +0.16 +0.10 +0.03 3.40 –53.60 –4.20 5.43 8.55 0.03 0.22 0.80 0.20 HD224930 5300 4.1 –0.91 +0.42 +0.29 +0.01 –8.70 –71.30 –32.40 4.60 8.50 0.34 0.30 0.16 0.84