Table 3. Photometric data of 1999 TD10 used for this work, for the R filter. MJD represents the Modified Julian Date - 52000 and is given for mid-frames.

UT Date MJD Mag. UT Date MJD Mag. 2001 Oct. 1 183.2936 19.215 ±0.100 2001 Oct. 9 191.2495 19.123 ±0.034 2001 Oct. 1 183.3019 19.302 ±0.100 2001 Oct. 9 191.2569 19.122 ±0.020 2001 Oct. 1 183.3112 19.315 ±0.100 2001 Oct. 9 191.2635 19.091 ±0.018 2001 Oct. 8 190.0989 19.499 ±0.032 2001 Oct. 9 191.2758 19.120 ±0.019 2001 Oct. 8 190.1059 19.560 ±0.032 2001 Oct. 9 191.2826 19.120 ±0.015 2001 Oct. 8 190.1133 19.540 ±0.025 2001 Oct. 9 191.2898 19.155 ±0.012 2001 Oct. 8 190.1425 19.580 ±0.025 2001 Oct. 9 191.2965 19.160 ±0.012 2001 Oct. 8 190.1492 19.595 ±0.026 2001 Oct. 9 191.3038 19.189 ±0.015 2001 Oct. 8 190.1598 19.566 ±0.024 2001 Oct. 9 191.3105 19.218 ±0.012 2001 Oct. 8 190.1675 19.547 ±0.025 2001 Oct. 9 191.3227 19.198 ±0.026 2001 Oct. 8 190.1753 19.493 ±0.028 2001 Oct. 9 191.3294 19.233 ±0.019 2001 Oct. 8 190.1820 19.479 ±0.032 2001 Oct. 9 191.3367 19.332 ±0.020 2001 Oct. 8 190.1963 19.439 ±0.030 2001 Oct. 9 191.3434 19.338 ±0.020 2001 Oct. 8 190.2033 19.378 ±0.028 2001 Nov. 30 243.0373 19.896 ±0.036 2001 Oct. 8 190.2105 19.327 ±0.034 2001 Nov. 30 243.0486 19.887 ±0.059 2001 Oct. 8 190.2172 19.312 ±0.029 2001 Nov. 30 243.0710 19.829 ±0.045 2001 Oct. 8 190.2246 19.299 ±0.035 2001 Nov. 30 243.0827 19.824 ±0.052 2001 Oct. 8 190.2313 19.240 ±0.031 2001 Nov. 30 243.0934 19.774 ±0.044 2001 Oct. 8 190.2388 19.215 ±0.027 2001 Nov. 30 243.1115 19.736 ±0.061 2001 Oct. 8 190.2455 19.195 ±0.029 2001 Nov. 30 243.1226 19.684 ±0.048 2001 Oct. 8 190.2617 19.192 ±0.039 2001 Nov. 30 243.1395 19.708 ±0.055 2001 Oct. 8 190.2686 19.156 ±0.050 2001 Nov. 30 243.1506 19.554 ±0.058 2001 Oct. 8 190.2758 19.132 ±0.047 2001 Nov. 30 243.1615 19.648 ±0.043 2001 Oct. 8 190.2825 19.086 ±0.051 2001 Nov. 30 243.1723 19.584 ±0.047 2001 Oct. 8 190.2898 19.119 ±0.048 2001 Nov. 30 243.1916 19.501 ±0.049 2001 Oct. 8 190.2965 19.097 ±0.051 2001 Nov. 30 243.2031 19.543 ±0.066 2001 Oct. 8 190.3045 19.090 ±0.043 2001 Dec. 1 244.0204 20.062 ±0.075 2001 Oct. 8 190.3111 19.083 ±0.041 2001 Dec. 1 244.0319 20.009 ±0.071 2001 Oct. 8 190.3243 19.128 ±0.052 2001 Dec. 1 244.0429 19.864 ±0.044 2001 Oct. 8 190.3313 19.111 ±0.047 2001 Dec. 1 244.0537 19.760 ±0.035 2001 Oct. 8 190.3386 19.168 ±0.047 2001 Dec. 1 244.0654 19.795 ±0.038 2001 Oct. 9 191.0823 19.530 ±0.032 2001 Dec. 1 244.0762 19.806 ±0.033 2001 Oct. 9 191.0893 19.574 ±0.017 2001 Dec. 1 244.0872 19.709 ±0.038 2001 Oct. 9 191.0966 19.577 ±0.035 2001 Dec. 1 244.0980 19.673 ±0.032 2001 Oct. 9 191.1033 19.633 ±0.034 2001 Dec. 1 244.1165 19.686 ±0.045 2001 Oct. 9 191.1105 19.619 ±0.026 2001 Dec. 1 244.1276 19.614 ±0.042 2001 Oct. 9 191.1172 19.633 ±0.020 2001 Dec. 1 244.1386 19.577 ±0.035 2001 Oct. 9 191.1245 19.580 ±0.019 2001 Dec. 1 244.1494 19.594 ±0.044 2001 Oct. 9 191.1312 19.529 ±0.023 2001 Dec. 1 244.1668 19.577 ±0.033 2001 Oct. 9 191.1385 19.513 ±0.021 2001 Dec. 1 244.1776 19.611 ±0.046 2001 Oct. 9 191.1452 19.489 ±0.025 2001 Dec. 5 248.0304 19.691 ±0.044 2001 Oct. 9 191.1525 19.435 ±0.030 2001 Dec. 5 248.0416 19.755 ±0.048 2001 Oct. 9 191.1592 19.420 ±0.035 2001 Dec. 5 248.0531 19.747 ±0.036 2001 Oct. 9 191.1664 19.414 ±0.027 2001 Dec. 5 248.0639 19.851 ±0.040 2001 Oct. 9 191.1731 19.355 ±0.021 2001 Dec. 5 248.0749 19.867 ±0.058 2001 Oct. 9 191.1804 19.300 ±0.023 2001 Dec. 5 248.0857 19.942 ±0.059 2001 Oct. 9 191.1871 19.273 ±0.021 2001 Dec. 5 248.0969 19.913 ±0.090 2001 Oct. 9 191.2045 19.219 ±0.029 2001 Dec. 5 248.1077 20.079 ±0.091 2001 Oct. 9 191.2112 19.211 ±0.023 2001 Dec. 5 248.1261 20.055 ±0.053 2001 Oct. 9 191.2190 19.170 ±0.028 2001 Dec. 5 248.1369 20.120 ±0.068 2001 Oct. 9 191.2257 19.151 ±0.016 2001 Dec. 5 248.1537 20.131 ±0.073 2001 Oct. 9 191.2427 19.132 ±0.021 2001 Dec. 5 248.1645 20.103 ±0.093

Table 4. Photometric data of 1999 TD10 used for this work, for the V filter. MJD represents the Modified Julian Date - 52000 and is given for mid-frames.

UT Date MJD Mag. 2001 Oct. 8 190.1026 20.045 ±0.039 2001 Oct. 8 190.1166 20.042 ±0.048 2001 Oct. 8 190.1459 20.037 ±0.034 2001 Oct. 8 190.1641 19.988 ±0.053 2001 Oct. 8 190.1787 19.984 ±0.063 2001 Oct. 8 190.1999 19.868 ±0.061 2001 Oct. 8 190.2138 19.818 ±0.049 2001 Oct. 8 190.2279 19.795 ±0.069 2001 Oct. 8 190.2421 19.688 ±0.048 2001 Oct. 8 190.2652 19.594 ±0.060 2001 Oct. 8 190.2792 19.607 ±0.055 2001 Oct. 8 190.2931 19.542 ±0.059 2001 Oct. 8 190.3078 19.590 ±0.067 2001 Oct. 8 190.3280 19.576 ±0.080 2001 Oct. 9 191.0860 20.044 ±0.043 2001 Oct. 9 191.0999 20.080 ±0.046 2001 Oct. 9 191.1139 20.099 ±0.034 2001 Oct. 9 191.1279 20.057 ±0.038 2001 Oct. 9 191.1418 19.995 ±0.031 2001 Oct. 9 191.1558 19.950 ±0.040 2001 Oct. 9 191.1698 19.893 ±0.044 2001 Oct. 9 191.1837 19.799 ±0.032 2001 Oct. 9 191.2079 19.680 ±0.034 2001 Oct. 9 191.2223 19.672 ±0.025 2001 Oct. 9 191.2462 19.600 ±0.038 2001 Oct. 9 191.2602 19.625 ±0.034 2001 Oct. 9 191.2792 19.609 ±0.031 2001 Oct. 9 191.2932 19.675 ±0.044 2001 Oct. 9 191.3071 19.696 ±0.045 2001 Oct. 9 191.3261 19.729 ±0.037 2001 Oct. 9 191.3401 19.826 ±0.041 2001 Nov. 30 243.0432 20.631 ±0.087 2001 Nov. 30 243.0656 20.402 ±0.075 2001 Nov. 30 243.0881 20.347 ±0.080 2001 Nov. 30 243.1172 20.165 ±0.080 2001 Nov. 30 243.1452 20.031 ±0.070 2001 Nov. 30 243.1669 19.793 ±0.164 2001 Nov. 30 243.1977 19.984 ±0.109 2001 Dec. 1 244.0708 20.126 ±0.057 2001 Dec. 1 244.0926 20.190 ±0.092 2001 Dec. 1 244.1222 20.112 ±0.093 2001 Dec. 1 244.1440 20.072 ±0.056 2001 Dec. 1 244.1722 20.148 ±0.102 2001 Dec. 5 248.0362 20.134 ±0.040 2001 Dec. 5 248.0585 20.181 ±0.052 2001 Dec. 5 248.0803 20.290 ±0.048 2001 Dec. 5 248.1023 20.427 ±0.070 2001 Dec. 5 248.1315 20.572 ±0.091 2001 Dec. 5 248.1591 20.580 ±0.095

This article was processed by the author using Springer-Verlag L^ATEX A&A style file L-AA version 3.

Table 5. Photometry of 1999 TD10 used for this work, for the B filter. MJD represents the Modified Julian Date - 52000 and is given for mid-frames.

UT Date MJD Mag. 2001 Oct. 8 190.1095 20.733 ±0.075 2001 Oct. 8 190.1375 20.835 ±0.048 2001 Oct. 8 190.1528 20.868 ±0.051 2001 Oct. 8 190.1711 20.780 ±0.055 2001 Oct. 8 190.1856 20.710 ±0.113 2001 Oct. 8 190.2069 20.585 ±0.081 2001 Oct. 8 190.2208 20.649 ±0.131 2001 Oct. 8 190.2349 20.416 ±0.086 2001 Oct. 8 190.2491 20.464 ±0.111 2001 Oct. 8 190.2722 20.371 ±0.094 2001 Oct. 8 190.2861 20.427 ±0.164 2001 Oct. 8 190.3001 20.288 ±0.136 2001 Oct. 8 190.3148 20.294 ±0.151 2001 Oct. 8 190.3349 20.389 ±0.120 2001 Oct. 9 191.0929 20.941 ±0.081 2001 Oct. 9 191.1069 20.838 ±0.080 2001 Oct. 9 191.1208 20.926 ±0.049 2001 Oct. 9 191.1348 20.835 ±0.041 2001 Oct. 9 191.1488 20.624 ±0.075 2001 Oct. 9 191.1628 20.585 ±0.065 2001 Oct. 9 191.1767 20.632 ±0.065 2001 Oct. 9 191.1907 20.555 ±0.056 2001 Oct. 9 191.2148 20.471 ±0.042 2001 Oct. 9 191.2293 20.381 ±0.080 2001 Oct. 9 191.2531 20.259 ±0.059 2001 Oct. 9 191.2651 20.377 ±0.056 2001 Oct. 9 191.2862 20.285 ±0.099 2001 Oct. 9 191.3001 20.465 ±0.075 2001 Oct. 9 191.3141 20.444 ±0.061 2001 Oct. 9 191.3330 20.495 ±0.097 2001 Oct. 9 191.3470 20.639 ±0.109 2001 Nov. 30 243.0541 21.441 ±0.287 2001 Nov. 30 243.0765 21.127 ±0.191 2001 Nov. 30 243.0989 20.980 ±0.218 2001 Nov. 30 243.1281 21.013 ±0.159 2001 Nov. 30 243.1560 20.896 ±0.205 2001 Dec. 1 244.0591 20.873 ±0.277 2001 Dec. 1 244.0817 21.056 ±0.213 2001 Dec. 1 244.1034 21.113 ±0.300 2001 Dec. 1 244.1331 20.019 ±0.350 2001 Dec. 1 244.1549 20.462 ±0.196 2001 Dec. 1 244.1831 20.899 ±0.363 2001 Dec. 5 248.0471 20.942 ±0.123 2001 Dec. 5 248.0694 21.039 ±0.068 2001 Dec. 5 248.0912 21.063 ±0.108 2001 Dec. 5 248.1131 21.153 ±0.107 2001 Dec. 5 248.1424 21.273 ±0.125 2001 Dec. 5 248.1700 21.374 ±0.286