IRTS FIRP - Lange et al. - 1994

150 λ_c = 148.3 λ_∘ = 185.4 λ_{peak} = 137.3 λ_{gauss} = 148.0 3000 1500 800 400 200 100 WHM = 67.6 W10% = 103.6 W80% = 53.4 FWHM = 71.5 137.9 137.9 138.0 138.3 138.8 140.0 W_∘ = 76.1 [58.5] [58.5] [58.7] [59.0] [59.6] [60.8] μ = 92.2 I_{asym} = 2.16 λ_{ef f} (T ) = 137.80 + 1.79 Ψ + 0.37 Ψ^2 + 0.01 Ψ^3 W_{ef f} (T ) = 58.40 + 2.27 Ψ + 0.24 Ψ^2 − 0.07 Ψ^3 I_{kurt} = 3.65 250 λ_c = 251.3 λ_∘ = 260.4 λ_{peak} = 267.3 λ_{gauss} = 256.9 3000 1500 800 400 200 100 WHM = 136.0 W10% = 166.8 W80% = 81.0 FWHM = 115.3 226.5 226.6 226.7 227.0 227.6 229.0 W_∘ = 122.7 [100.2] [100.3] [100.5] [100.9] [101.7] [103.3] μ = 51.9 I_{asym} = 1.09 λ_{ef f} (T ) = 226.41 + 2.35 Ψ + 0.26 Ψ^2 − 0.01 Ψ^3 W_{ef f} (T ) = 100.10 + 3.12 Ψ + 0.16 Ψ^2 − 0.04 Ψ^3 I_{kurt} = 3.21 400 λ_c = 407.8 λ_∘ = 405.0 λ_{peak} = 376.6 λ_{gauss} = 404.5 3000 1500 800 400 200 100 WHM = 130.4 W10% = 182.9 W80% = 104.8 FWHM = 113.0 384.1 384.2 384.2 384.3 384.6 385.1 W_∘ = 120.3 [111.0] [111.1] [111.1] [111.2] [111.4] [111.8] μ = 45.6 I_{asym} = −0.01 λ_{ef f} (T ) = 384.11 + 0.96 Ψ + 0.06 Ψ^2 − 0.00 Ψ^3 W_{ef f} (T ) = 111.01 + 0.83 Ψ + 0.02 Ψ^2 − 0.00 Ψ^3 I_{kurt} = −0.81 700 λ_c = 718.6 λ_∘ = 735.0 λ_{peak} = 851.1 λ_{gauss} = 749.8 3000 1500 800 400 200 100 WHM = 372.6 W10% = 468.8 W80% = 196.6 FWHM = 285.1 651.6 651.7 651.8 652.1 652.7 653.9 W_∘ = 303.5 [251.7] [251.8] [252.0] [252.3] [253.0] [254.4] μ = 118.0 I_{asym} = −0.20 λ_{ef f} (T ) = 651.53 + 2.34 Ψ + 0.09 Ψ^2 − 0.00 Ψ^3 W_{ef f} (T ) = 251.65 + 2.71 Ψ + 0.04 Ψ^2 − 0.00 Ψ^3 I_{kurt} = −0.90