NQ - Low and Rieke - 1974

N λ_c = 11.05 λ_∘ = 11.10 λ_{peak} = 10.53 λ_{gauss} = 11.10 3000 1500 800 400 200 100 WHM = 3.06 W10% = 3.35 W80% = 2.54 FWHM = 2.47 10.85 10.87 10.91 11.00 11.20 11.57 W_∘ = 2.63 [2.54] [2.55] [2.58] [2.60] [2.55] [2.13] μ = 0.86 I_{asym} = −0.02 λ_{ef f} (T ) = 10.83 + 0.56 Ψ + 0.53 Ψ^2 − 0.36 Ψ^3 W_{ef f} (T ) = 2.52 + 0.64 Ψ − 1.28 Ψ^2 + 0.26 Ψ^3 I_{kurt} = −1.03 Q λ_c = 20.56 λ_∘ = 20.78 λ_{peak} = 18.60 λ_{gauss} = 20.30 3000 1500 800 400 200 100 WHM = 5.12 W10% = 7.94 W80% = 3.13 FWHM = 3.67 20.12 20.14 20.18 20.28 20.53 21.12 W_∘ = 3.91 [3.73] [3.75] [3.77] [3.81] [3.85] [3.71] μ = 1.94 I_{asym} = 0.35 λ_{ef f} (T ) = 20.10 + 0.55 Ψ + 0.76 Ψ^2 − 0.29 Ψ^3 W_{ef f} (T ) = 3.72 + 0.38 Ψ − 0.10 Ψ^2 − 0.29 Ψ^3 I_{kurt} = −0.75