ri - Weistrop - 1975

r B3 Vega Sun K2 M2 Carbon

λ_c = 6413 λ_∘ = 6516 λ_{peak} = 6287 λ_{gauss} = 6400 6279 6303 6420 6509 6727 6657 WHM = 1979 W10% = 2872 W80% = 1388 FWHM = 1837 [1774] [1809] [1919] [1941] [1789] [1824] W_∘ = 1956^{A(λ)}_{A(V )} |_{5.0} = 0.82^{0.80}_{0.85} a =^{0.936}_{0.915} b =^{−0.229}_{−0.271} B3 WN WC PN_{Ne} PN^{Ne} Nova WDA μ = 692^{A(λ)}_{A(V )} |_{3.1} = 0.78^{0.76}_{0.81} a =^{0.922}_{0.901} b =^{−0.256}_{−0.299} Sun 6380 6315 6571 6529 6577 6281 I_{asym} = 0.41^{A(λ)}_{A(V )} |_{2.1} = 0.72^{0.70}_{0.75}^{A(λ)}_{E(B−V )} : (2.566, −0.019)^{r=−1.00}_{B3} (2.670, −0.018)^{r=−1.00}_{Sun} (2.848, −0.049)^{r=−1.00}_{M2} I_{kurt} = −0.55 λ_{ef f} = 6514.4 + 250.3 × E(B − V ) r=1.00 W_{ef f} = 2019.9 − 300.4 × E(B − V ) r=–0.99 λ_{ef f} (T ) = 6245 + 292 × θ + 438 × θ^2 − 193 × θ^3 W_{ef f} (T ) = 1697 + 799 × θ − 490 × θ^2 − 321 × θ^3

i B3 Vega Sun K2 M2 Carbon

λ_c = 7910 λ_∘ = 7922 λ_{peak} = 8133 λ_{gauss} = 7929 7849 7858 7884 7904 7943 7875 WHM = 1350 W10% = 1581 W80% = 1166 FWHM = 1225 [1264] [1272] [1291] [1302] [1284] [1327] W_∘ = 1304^{A(λ)}_{A(V )} |_{5.0} = 0.62^{0.63}_{0.65} a =^{0.795}_{0.790} b =^{−0.543}_{−0.554} B3 WN WC PN_{Ne} PN^{Ne} Nova WDA μ = 398^{A(λ)}_{A(V )} |_{3.1} = 0.58^{0.58}_{0.61} a =^{0.792}_{0.787} b =^{−0.550}_{−0.560} Sun 7886 7901 7778 7855 7849 7863 I_{asym} = −0.01^{A(λ)}_{A(V )} |_{2.1} = 0.51^{0.51}_{0.55}^{A(λ)}_{E(B−V )} : (1.795, 0.023)^{r=0.99}_{B3} (1.914, 0.030)^{r=1.00}_{Sun} (2.158, 0.021)^{r=1.00}_{M2} I_{kurt} = −1.06 λ_{ef f} = 7921.9 + 56.8 × E(B − V ) r=1.00 W_{ef f} = 1316.1 − 45.3 × E(B − V ) r=–0.97 λ_{ef f} (T ) = 7842 + 76 × θ + 87 × θ^2 − 38 × θ^3 W_{ef f} (T ) = 1255 + 105 × θ + 1 × θ^2 − 75 × θ^3