Transition T (K) W (nm) d (nm) 10000. 0.338E-02 -0.419E-03 20000. 0.236E-02 -0.301E-03 4s^6D_{1/2}-4p^6D^o_{1/2,3/2} 50000. 0.147E-02 -0.191E-03 λ = 194.87 nm 100000. 0.106E-02 -0.130E-03 λ = 195.39 nm 200000. 0.867E-03 -0.848E-04 300000. 0.828E-03 -0.629E-04 10000. 0.323E-02 -0.294E-03 20000. 0.225E-02 -0.211E-03 4s^6D_{3/2}-4p^6D^o_{1/2,3/2} 50000. 0.140E-02 -0.132E-03 λ = 194.24 nm 100000. 0.101E-02 -0.882E-04 λ = 194.76 nm 200000. 0.826E-03 -0.525E-04 300000. 0.790E-03 -0.344E-04 10000. 0.327E-02 -0.296E-03 20000. 0.228E-02 -0.213E-03 4s^6D_{3/2}-4p^6D^o_{5/2} 50000. 0.142E-02 -0.133E-03 λ = 195.60 nm 100000. 0.102E-02 -0.890E-04 200000. 0.837E-03 -0.531E-04 300000. 0.800E-03 -0.347E-04 10000. 0.563E-02 -0.129E-02 20000. 0.394E-02 -0.932E-03 4s^6D_{5/2}-4p^6D^o_{3/2} 50000. 0.245E-02 -0.602E-03 λ = 193.69 nm 100000. 0.178E-02 -0.428E-03 200000. 0.146E-02 -0.316E-03 300000. 0.139E-02 -0.268E-03 10000. 0.568E-02 -0.130E-02 20000. 0.397E-02 -0.939E-03 4s^6D_{5/2}-4p^6D^o_{5/2} 50000. 0.247E-02 -0.607E-03 λ = 194.52 nm 100000. 0.180E-02 -0.432E-03 200000. 0.147E-02 -0.319E-03 300000. 0.140E-02 -0.270E-03 10000. 0.574E-02 -0.132E-02 20000. 0.401E-02 -0.949E-03 4s^6D_{5/2}-4p^6D^o_{7/2} 50000. 0.250E-02 -0.613E-03 λ = 195.58 nm 100000. 0.182E-02 -0.436E-03 200000. 0.149E-02 -0.322E-03 300000. 0.142E-02 -0.273E-03

This article was processed by the author using Springer-Verlag L^ATEX A&A style file L-AA version 3.

Table 0. Continued

Transition T (K) W (nm) d (nm) 10000. 0.589E-02 -0.157E-02 20000. 0.412E-02 -0.113E-02 4s^6 D_{7/2}-4p^6D^o_{5/2} 50000. 0.257E-02 -0.732E-03 λ = 192.98 nm 100000. 0.187E-02 -0.521E-03 200000. 0.153E-02 -0.387E-03 300000. 0.145E-02 -0.331E-03 10000. 0.595E-02 -0.159E-02 20000. 0.416E-02 -0.114E-02 4s^6 D_{7/2}-4p^6D^o_{7/2} 50000. 0.259E-02 -0.739E-03 λ = 194.01 nm 100000. 0.188E-02 -0.526E-03 200000. 0.154E-02 -0.391E-03 300000. 0.147E-02 -0.334E-03 10000. 0.601E-02 -0.160E-02 20000. 0.420E-02 -0.115E-02 4s^6 D_{7/2}-4p^6D^o_{9/2} 50000. 0.262E-02 -0.746E-03 λ = 194.98 nm 100000. 0.190E-02 -0.531E-03 200000. 0.156E-02 -0.395E-03 300000. 0.148E-02 -0.337E-03 10000. 0.331E-02 -0.436E-03 20000. 0.231E-02 -0.314E-03 4sD_{9/2}-4p^6D^o_{7/2} 50000. 0.143E-02 -0.199E-03 λ = 191.91 nm 100000. 0.104E-02 -0.136E-03 200000. 0.845E-03 -0.895E-04 300000. 0.806E-03 -0.671E-04 10000. 0.334E-02 -0.439E-03 20000. 0.233E-02 -0.316E-03 4s^6 D_{9/2}-4p^6D^o_{9/2} 50000. 0.145E-02 -0.201E-03 λ = 192.86 nm 100000. 0.104E-02 -0.137E-03 200000. 0.852E-03 -0.902E-04 300000. 0.812E-03 -0.676E-04 10000. 0.294E-02 -0.313E-03 20000. 0.205E-02 -0.224E-03 4s^6D_{1/2}-4p^6F_{1/2,3/2} 50000. 0.128E-02 -0.141E-03 λ = 179.13 nm 100000. 0.921E-03 -0.936E-04 λ = 179.24 nm 200000. 0.752E-03 -0.541E-04 300000. 0.718E-03 -0.378E-04 10000. 0.281E-02 -0.207E-03 20000. 0.196E-02 -0.148E-03 4s^6D_{3/2}-4p^6F_{1/2,3/2,5/2} 50000. 0.122E-02 -0.916E-04 λ = 178.60 nm 100000. 0.879E-03 -0.581E-04 λ = 178.71 nm 200000. 0.719E-03 -0.269E-04 λ = 178.91 nm 300000. 0.686E-03 -0.137E-04

Table 0. Continued

Transition T (K) W (nm) d (nm) 10000. 0.483E-02 -0.104E-02 20000. 0.338E-02 -0.749E-03 4s^6D_{5/2}-4p^6F_{3/2,5/2} 50000. 0.210E-02 -0.483E-03 λ = 177.81 nm 100000. 0.153E-02 -0.341E-03 λ = 178.00 nm 200000. 0.125E-02 -0.247E-03 300000. 0.119E-02 -0.209E-03 10000. 0.475E-02 -0.132E-02 20000. 0.332E-02 -0.950E-03 4s^6D_{5/2}-4p^6F_{7/2} 50000. 0.207E-02 -0.614E-03 λ = 178.30 nm 100000. 0.150E-02 -0.435E-03 200000. 0.123E-02 -0.318E-03 300000. 0.117E-02 -0.270E-03 10000. 0.502E-02 -0.127E-02 20000. 0.351E-02 -0.917E-03 4s^6D_{7/2}-4p^6F_{5/2} 50000. 0.219E-02 -0.592E-03 λ = 176.71 nm 100000. 0.159E-02 -0.419E-03 200000. 0.130E-02 -0.306E-03 300000. 0.124E-02 -0.261E-03 10000. 0.494E-02 -0.154E-02 20000. 0.345E-02 -0.111E-02 4s^6D_{7/2}-4p^6F_{7/2} 50000. 0.215E-02 -0.718E-03 λ = 177.00 nm 100000. 0.156E-02 -0.509E-03 200000. 0.128E-02 -0.374E-03 300000. 0.122E-02 -0.321E-03 10000. 0.508E-02 -0.123E-02 20000. 0.355E-02 -0.887E-03 4s^6D_{7/2}-4p^6F_{9/2} 50000. 0.221E-02 -0.573E-03 λ = 177.36 nm 100000. 0.161E-02 -0.406E-03 200000. 0.132E-02 -0.296E-03 300000. 0.125E-02 -0.252E-03 10000. 0.274E-02 -0.581E-03 20000. 0.191E-02 -0.417E-03 4s^6D_{9/2}-4p^6F_{7/2} 50000. 0.119E-02 -0.267E-03 λ = 175.24 nm 100000. 0.857E-03 -0.183E-03 200000. 0.700E-03 -0.123E-03 300000. 0.668E-03 -0.978E-04 10000. 0.288E-02 -0.274E-03 20000. 0.201E-02 -0.197E-03 4s^6D_{9/2}-4p^6F_{9/2,11/2} 50000. 0.125E-02 -0.123E-03 λ = 175.60 nm 100000. 0.900E-03 -0.808E-04 λ = 176.04 nm 200000. 0.734E-03 -0.446E-04 300000. 0.698E-03 -0.295E-04