Table 1: Polarimetric data for ξ Per, measured in the B-band (with the addition of a 10% neutral density filter) during the 1989 Oct campaign are listed according to HJD (Column 1). Columns 2 and 3 give the normalised Stokes parameters, q, u, while columns 4 and 6 give the degree of polarization, p(B) and the vibration direction, θ relative to the standard equatorial frame. Columns 5 and 7 give estimates for the uncertainty of the p(B) and θ based on the photon count associated with the individual measurement set. HJD q u p(B) Δp θ Δθ 7815.8263 -0.965 -0.693 1.188 0.024 107.84 0.58 7815.8322 -0.977 -0.756 1.235 0.024 108.86 0.56 7815.8349 -0.998 -0.749 1.247 0.024 108.44 0.56 7815.8556 -0.945 -0.728 1.193 0.024 108.79 0.59 7815.8615 -1.013 -0.740 1.255 0.025 108.08 0.56 7815.8642 -0.993 -0.751 1.245 0.025 108.55 0.57 7815.8861 -0.984 -0.748 1.235 0.025 108.62 0.57 7815.8923 -1.071 -0.761 1.314 0.025 107.70 0.54 7815.8949 -1.091 -0.773 1.337 0.025 107.65 0.53 7815.9156 -0.996 -0.721 1.229 0.024 107.96 0.57 7815.9217 -1.017 -0.708 1.239 0.024 107.42 0.56 7815.9244 -0.998 -0.773 1.263 0.024 108.88 0.55 7815.9434 -1.080 -0.766 1.324 0.024 107.67 0.53 7815.9493 -1.012 -0.726 1.246 0.024 107.83 0.56 7815.9519 -0.996 -0.742 1.242 0.024 108.34 0.56 7815.9740 -1.035 -0.726 1.265 0.024 107.52 0.55 7815.9798 -1.022 -0.733 1.258 0.025 107.82 0.56 7815.9823 -1.042 -0.770 1.296 0.025 108.23 0.55 7816.8157 -0.927 -0.793 1.220 0.024 110.27 0.57 7816.8214 -0.974 -0.758 1.234 0.025 108.94 0.57 7816.8273 -0.973 -0.704 1.201 0.025 107.96 0.59 7816.8601 -1.016 -0.713 1.241 0.025 107.53 0.58 7816.8668 -0.972 -0.734 1.219 0.025 108.53 0.58 7816.8732 -0.894 -0.704 1.138 0.028 109.13 0.70 7816.9086 -0.890 -0.704 1.135 0.028 109.18 0.72 7816.9149 -1.001 -0.696 1.219 0.028 107.40 0.66 7816.9209 -0.972 -0.657 1.174 0.027 107.03 0.67 7818.7965 -0.941 -0.689 1.166 0.025 108.12 0.61 7818.8024 -0.933 -0.695 1.164 0.025 108.35 0.61 7818.8050 -0.936 -0.776 1.216 0.025 109.82 0.58 7818.8391 -0.983 -0.715 1.216 0.025 108.02 0.58 7818.8452 -0.976 -0.778 1.248 0.024 109.28 0.56 7818.8852 -1.004 -0.723 1.237 0.024 107.89 0.56 7818.8910 -0.908 -0.782 1.198 0.024 110.38 0.58 7818.8936 -0.936 -0.697 1.167 0.024 108.33 0.60 7818.9217 -0.924 -0.807 1.227 0.024 110.56 0.56 7818.9343 -0.978 -0.707 1.207 0.024 107.94 0.58 7818.9370 -0.987 -0.694 1.207 0.024 107.55 0.58 7818.9691 -0.984 -0.777 1.254 0.025 109.15 0.58 7818.9748 -0.990 -0.787 1.265 0.025 109.24 0.58 7818.9773 -0.937 -0.705 1.173 0.025 108.48 0.62 7819.7954 -0.982 -0.748 1.235 0.025 108.65 0.57 7819.8013 -0.968 -0.731 1.213 0.025 108.53 0.59 7819.8070 -0.958 -0.775 1.232 0.026 109.48 0.61 7819.8505 -0.950 -0.763 1.219 0.025 109.37 0.58 7819.8567 -1.064 -0.712 1.280 0.024 106.89 0.54 7819.8594 -0.994 -0.747 1.243 0.024 108.47 0.56 7819.8780 -1.031 -0.690 1.241 0.026 106.90 0.60 7819.8843 -0.988 -0.699 1.210 0.024 107.63 0.57 7819.8868 -0.967 -0.725 1.208 0.024 108.44 0.57 7819.9051 -0.986 -0.660 1.186 0.024 106.90 0.59 7819.9111 -0.940 -0.737 1.195 0.024 109.05 0.58 7819.9135 -0.970 -0.783 1.247 0.024 109.47 0.55 7819.9338 -0.994 -0.704 1.218 0.024 107.65 0.57 7819.9397 -0.988 -0.693 1.207 0.024 107.53 0.57 7819.9421 -0.962 -0.700 1.190 0.024 108.03 0.58 7819.9768 -1.002 -0.714 1.230 0.026 107.74 0.61 7819.9831 -0.967 -0.806 1.259 0.025 109.91 0.57 7819.9857 -0.947 -0.737 1.200 0.025 108.94 0.59

1

Table 2: Polarimetric data for λ Cep, measured in the B-band during the 1989 Oct campaign; see Table 1 for column layout. HJD q u p(B) Δp θ Δθ 7815.6020 -0.540 1.097 1.223 0.018 58.11 0.42 7815.6078 -0.503 1.106 1.215 0.018 57.21 0.42 7815.6104 -0.535 1.109 1.232 0.018 57.88 0.42 7815.6326 -0.518 1.020 1.144 0.018 58.46 0.45 7815.6391 -0.543 1.090 1.218 0.018 58.25 0.42 7815.6417 -0.582 1.077 1.224 0.018 59.19 0.42 7815.6667 -0.524 1.024 1.150 0.018 58.55 0.45 7815.6729 -0.482 1.076 1.179 0.018 57.07 0.44 7815.6758 -0.532 1.124 1.243 0.019 57.67 0.43 7815.6966 -0.510 1.095 1.208 0.018 57.49 0.43 7815.7029 -0.585 1.097 1.243 0.018 59.04 0.42 7815.7056 -0.545 1.097 1.225 0.018 58.21 0.43 7815.7245 -0.494 1.139 1.241 0.018 56.72 0.43 7815.7305 -0.508 1.133 1.242 0.019 57.07 0.43 7815.7331 -0.485 1.195 1.290 0.019 56.04 0.41 7815.7518 -0.553 1.148 1.274 0.019 57.86 0.42 7815.7579 -0.550 1.134 1.261 0.019 57.92 0.43 7815.7606 -0.539 1.140 1.261 0.019 57.64 0.43 7816.5774 -0.537 1.141 1.261 0.021 57.60 0.48 7816.5835 -0.517 1.167 1.277 0.023 56.95 0.52 7816.5895 -0.511 1.172 1.278 0.021 56.78 0.48 7816.6220 -0.507 1.125 1.234 0.019 57.12 0.44 7816.6284 -0.494 1.109 1.214 0.020 57.00 0.48 7816.6346 -0.531 1.168 1.283 0.020 57.23 0.45 7816.6616 -0.535 1.087 1.212 0.019 58.11 0.45 7816.6681 -0.548 1.104 1.232 0.018 58.21 0.43 7816.6743 -0.533 1.146 1.264 0.019 57.46 0.44 7816.7063 -0.436 1.093 1.177 0.019 55.88 0.46 7816.7130 -0.455 1.182 1.267 0.018 55.54 0.42 7816.7191 -0.524 1.104 1.222 0.019 57.69 0.44 7816.7498 -0.446 1.093 1.180 0.019 56.09 0.46 7816.7557 -0.579 1.142 1.280 0.020 58.43 0.44 7816.7615 -0.559 1.154 1.282 0.021 57.93 0.47 7818.5923 -0.510 1.078 1.193 0.019 57.66 0.45 7818.5996 -0.458 1.069 1.163 0.019 56.61 0.47 7818.6021 -0.488 1.095 1.199 0.019 57.02 0.45 7818.6489 -0.484 1.157 1.254 0.019 56.36 0.43 7818.6545 -0.420 1.121 1.197 0.019 55.28 0.45 7818.6572 -0.535 1.074 1.200 0.019 58.23 0.45 7818.6959 -0.443 1.089 1.176 0.019 56.07 0.46 7818.7019 -0.390 1.098 1.165 0.019 54.78 0.46 7818.7045 -0.424 1.086 1.166 0.019 55.65 0.46 7818.7436 -0.432 1.077 1.161 0.019 55.93 0.47 7818.7495 -0.421 1.086 1.164 0.019 55.60 0.47 7818.7522 -0.405 1.097 1.169 0.019 55.14 0.46 7819.5761 -0.473 1.045 1.148 0.019 57.18 0.46 7819.5822 -0.414 1.054 1.132 0.018 55.72 0.46 7819.5847 -0.440 1.041 1.130 0.018 56.45 0.46 7819.6120 -0.460 1.053 1.149 0.018 56.79 0.46 7819.6184 -0.465 1.065 1.162 0.018 56.80 0.45 7819.6210 -0.524 1.093 1.212 0.018 57.80 0.43 7819.6414 -0.458 1.074 1.167 0.018 56.56 0.45 7819.6475 -0.502 1.107 1.215 0.018 57.19 0.43 7819.6500 -0.505 1.053 1.168 0.018 57.81 0.45 7819.6693 -0.422 1.099 1.178 0.018 55.51 0.44 7819.6752 -0.452 1.085 1.175 0.018 56.31 0.45 7819.6779 -0.445 1.106 1.193 0.018 55.96 0.44 7819.7005 -0.373 1.115 1.176 0.018 54.25 0.44 7819.7065 -0.371 1.070 1.133 0.018 54.56 0.46 7819.7126 -0.382 1.112 1.176 0.018 54.47 0.44 7819.7338 -0.430 1.134 1.213 0.018 55.39 0.44 7819.7397 -0.412 1.103 1.177 0.019 55.24 0.45 7819.7422 -0.411 1.094 1.169 0.018 55.30 0.45 7819.7764 -0.425 1.081 1.161 0.019 55.74 0.47 7819.7824 -0.510 1.105 1.217 0.019 57.38 0.44 7819.7849 -0.407 1.074 1.149 0.019 55.38 0.47

2

Table 3: Polarimetric data (V -band) from the October 1991 campaign for ξ Per listed according to HJD (Column 1) Columns 2, 4 and 6 give the NSPs (q and u) and p, with Columns 3, 5 and 7 their respective errors.

HJD q Δq u Δu p(V ) Δp

8551.8272 -1.113 0.019 -0.849 0.012 1.400 0.022 8552.7975 -1.102 0.003 -0.842 0.024 1.387 0.016 8552.8469 -1.094 0.031 -0.846 0.017 1.383 0.031 8552.9078 -1.107 0.027 -0.849 0.026 1.395 0.006 8552.9706 -1.114 0.007 -0.837 0.046 1.394 0.023 8553.8288 -1.147 0.014 -0.843 0.012 1.423 0.010 8553.8845 -1.150 0.022 -0.864 0.009 1.438 0.019 8553.9273 -1.181 0.049 -0.807 0.093 1.433 0.037 8555.8441 -1.096 0.031 -0.851 0.006 1.387 0.022 8555.9009 -1.123 0.020 -0.894 0.003 1.436 0.014 8555.9523 -1.098 0.018 -0.881 0.011 1.408 0.010 8556.8077 -1.128 0.019 -0.867 0.019 1.423 0.023 8556.8432 -1.157 0.019 -0.846 0.015 1.433 0.024 8556.8895 -1.145 0.019 -0.839 0.010 1.420 0.015 8557.7589 -1.164 0.066 -0.844 0.037 1.438 0.038

Table 4: Polarimetric data (V -band) from the October 1991 campaign for λ Cep; see Table 3 for column layout.

HJD q Δq u Δu p(V ) Δp

8551.6455 -0.396 0.021 1.115 0.034 1.183 0.033 8552.5978 -0.392 0.042 1.110 0.024 1.178 0.016 8552.6771 -0.441 0.017 1.102 0.027 1.187 0.019 8552.7437 -0.581 0.047 1.067 0.031 1.216 0.024 8553.5968 -0.478 0.019 1.092 0.033 1.192 0.038 8553.6542 -0.405 0.139 1.091 0.026 1.168 0.032 8553.7073 -0.427 0.136 1.049 0.013 1.137 0.035 8553.7681 -0.489 0.053 1.033 0.044 1.144 0.038 8555.6109 -0.495 0.031 1.097 0.021 1.203 0.024 8555.6709 -0.478 0.055 1.035 0.006 1.141 0.029 8555.7334 -0.400 0.018 1.127 0.026 1.197 0.026 8555.7768 -0.433 0.035 1.074 0.029 1.159 0.040 8556.6605 -0.459 0.014 1.109 0.045 1.200 0.045 8556.7095 -0.461 0.076 1.142 0.044 1.232 0.068 8556.7585 -0.447 0.006 1.115 0.041 1.202 0.038 8557.6937 -0.507 0.020 1.099 0.054 1.210 0.056

Table 5: Polarimetric data (V -band) from the October 1991 campaign for 68 Cyg; see Table 3 for column layout.

HJD q Δq u Δu p(V ) Δp

8551.6259 -0.388 0.034 0.523 0.008 0.652 0.015 8552.5766 -0.430 0.016 0.471 0.045 0.638 0.038 8552.6613 -0.360 0.036 0.467 0.037 0.590 0.041 8552.7228 -0.433 0.018 0.423 0.019 0.606 0.025 8553.5758 -0.405 0.011 0.550 0.049 0.683 0.036 8553.6401 -0.409 0.048 0.541 0.029 0.680 0.012 8553.6925 -0.366 0.088 0.515 0.051 0.634 0.076 8553.7537 -0.356 0.059 0.533 0.023 0.643 0.030 8554.5765 -0.413 0.027 0.511 0.013 0.657 0.012 8555.5933 -0.425 0.011 0.473 0.014 0.636 0.017 8555.6508 -0.380 0.040 0.493 0.017 0.623 0.031 8555.7173 -0.377 0.029 0.513 0.078 0.637 0.080 8555.7624 -0.393 0.071 0.481 0.070 0.626 0.027 8556.6395 -0.395 0.018 0.479 0.011 0.621 0.014 8556.6938 -0.399 0.048 0.491 0.043 0.633 0.056 8556.7367 -0.396 0.041 0.481 0.041 0.625 0.025 8557.6784 -0.393 0.036 0.498 0.035 0.635 0.017