This article was processed by the author using Springer-Verlag

LATEX A&A style file L-AA version 3.

Table 2. Line fluxes

Line K5-1 K5-3 K5-4 K5-5 K5-6 K5-7 K5-9 K5-11 K5-12 K5-13 K5-14 K5-16

[OII]λ3726+29 - 63.0 133.7 - - - - - - 117.3 - - [NeIII]λ3869 - 126.1 172.6 - - 118.7 - - 51.9 196.3 38.1 - [NeIII]λ3967 - 55.3 62.1 - - - - - 23.4 75.8 - - Hγλ4340 65.5 56.2 57.3 91.6 65.5 74.6 - - 75.5 54.2 41.7 - [OIII]λ4363 7.9 12.9 6.9 30.6 25.8 26.8 - 2.6 9.8 20.3 37.5 - HeIλ4472 11.9 10.1 6.2 18.6 10.2 - 8.7 - - 11.8 4.2 - HeIIλ4686 - 51.5 - - 102.2 106.6 18.3 21.4 71.9 73.8 26.2 15.8 Hβλ4861 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 [OIII]λ4959 168.7 276.7 357.9 283.0 310.6 339.6 225.4 172.1 402.8 441.6 571.2 287.1 [OIII]λ5007 507.7 818.9 1061.5 843.3 915.5 1024.7 659.3 496.4 1201.3 1328.9 1663.8 859.1 HeIIλ5412 - 4.6 0.4 - 13.6 6.0 1.9 - 5.4 6.6 2.4 2.3 [NII]λ5755 0.9 0.5 1.9 2.0 2.9 - 0.7 3.1 0.7 4.3 6.4 6.1 HeIλ5876 17.5 11.6 17.4 9.7 3.6 8.6 21.1 25.1 7.4 11.8 15.5 18.3 [OI]λ6300 0.6 1.0 6.2 2.9 1.7 12.9 2.3 8.3 2.4 6.4 14.0 31.1 [SIII]λ6312 0.7 1.4 1.8 1.3 1.8 - 0.6 1.1 1.9 6.0 3.9 5.0 [NII]λ6548 4.2 10.7 25.4 3.7 2.3 9.5 11.7 107.9 6.8 111.5 58.1 164.8 Hαλ6563 285.2 285.2 285.2 285.3 285.2 285.2 285.3 285.2 285.2 285.2 285.2 285.3 [NII]λ6584 18.1 23.8 71.8 20.5 7.4 19.1 41.8 333.5 25.1 345.7 208.6 501.8 HeIλ6678 5.1 3.7 4.4 4.2 2.4 4.6 6.4 7.6 2.4 5.2 4.4 5.7 [SII]λ6716 1.4 3.4 3.2 1.5 2.5 5.4 2.7 25.4 2.8 28.9 8.6 59.5 [SII]λ6731 1.9 4.4 6.1 3.0 2.9 4.6 4.4 26.8 5.0 35.9 16.6 62.3 [ArIII]λ7135 15.5 11.0 15.3 10.4 8.9 24.7 16.1 19.5 91.4 40.4 32.3 24.5 [OII]λ7320+30 2.4 2.8 11.7 10.0 2.0 3.7 3.3 6.0 3.3 5.2 26.5 10.8

Line K5-17 K5-19 K5-20 SB01 SB02 SB03 SB04 SB06 SB12 SB15 SB17 SB18

[OII]λ3726+29 - - 33.1 109.0 81.7 41.2 - 458.8 - 56.8 553.6 154.3 [NeIII]λ3869 - - 87.3 152.2 25.9 89.1 78.0 82.2 - 189.6 - 70.7 [NeIII]λ3967 - - 48.4 81.3 50.8 - - 75.4 - - 19.5 35.7 Hγλ4340 32.4 - 47.3 35.8 53.4 49.1 49.3 36.5 37.3 46.5 53.8 35.5 [OIII]λ4363 23.7 54.4 7.0 7.6 8.6 36.5 15.4 19.0 35.9 46.7 - 27.6 HeIλ4472 - - 7.9 22.4 18.1 3.8 - 12.5 - - - 12.7 HeIIλ4686 - 95.8 - 37.7 32.2 59.5 21.6 50.4 72.1 51.3 - 64.3 Hβλ4861 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 [OIII]λ4959 408.2 422.1 269.7 164.9 159.9 208.6 181.0 154.8 322.6 442.5 - 339.2 [OIII]λ5007 1247.1 1173.4 808.3 540.1 477.8 616.5 522.1 504.5 799.8 1300.1 13.4 972.8 HeIIλ5412 0.9 - - - - 3.7 - 6.6 - 27.0 - - [NII]λ5755 - 1.6 1.8 - 2.6 1.6 - - - - 6.5 - HeIλ5876 14.1 10.4 17.6 6.7 18.3 14.2 11.7 10.1 11.9 11.8 18.6 6.0 [OI]λ6300 2.4 - 3.1 7.0 13.6 - - - - - 37.4 3.7 [SIII]λ6312 1.2 - 0.5 - - - - - - - - - [NII]λ6548 5.7 13.5 2.0 6.7 28.4 12.1 42.7 176.5 - - 94.5 - Hαλ6563 285.2 285.2 285.2 285.1 285.1 285.1 285.0 285.1 285.0 285.1 285.1 285.0 [NII]λ6584 20.8 42.8 4.5 17.5 78.5 42.4 116.4 531.6 7.5 1.6 256.6 3.6 HeIλ6678 3.7 2.5 4.6 5.0 4.6 5.6 4.8 6.6 17.2 8.8 6.0 2.8 [SII]λ6716 2.0 7.2 0.8 5.0 12.7 7.0 15.1 14.4 - - 57.5 1.8 [SII]λ6731 4.0 8.5 0.8 6.6 10.3 6.2 11.7 10.9 - 6.0 44.1 1.5 [ArIII]λ7135 11.1 14.9 8.2 4.3 10.9 10.5 8.2 20.8 15.2 2.2 1.2 2.9 [OII]λ7320+30 4.8 3.2 2.9 4.0 5.8 - 5.2 18.1 - 8.9 13.0 5.6

Table 3. Line fluxes (continued)

Line SB19 SB20 SB21 SB24 SB25 SB26 SB28 SB30 SB31 SB32 SB33 SB34

[OII]λ3726+29 42.4 59.8 - 39.6 209.1 29.2 - 53.1 14.4 398.6 103.7 - [NeIII]λ3869 63.1 254.1 51.9 - 97.1 126.3 55.9 74.8 84.5 60.2 24.5 79.6 [NeIII]λ3967 - - 30.6 35.8 - 53.9 25.5 32.3 36.2 34.2 - - Hγλ4340 31.9 36.4 54.6 21.6 49.9 40.1 66.2 52.1 63.6 47.0 51.1 68.5 [OIII]λ4363 2.9 70.5 14.3 6.9 7.0 21.0 29.3 16.1 14.3 15.9 22.9 22.1 HeIλ4472 7.6 - - - - - - 3.6 - 9.4 28.9 - HeIIλ4686 - 30.2 116.9 90.7 - 94.5 116.2 46.6 117.0 25.7 17.5 140.4 Hβλ4861 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 [OIII]λ4959 224.7 497.0 188.6 117.5 170.5 308.7 174.5 320.5 227.2 189.6 222.7 162.9 [OIII]λ5007 648.7 1441.1 571.9 384.9 515.8 915.6 525.0 941.1 662.4 565.2 585.0 509.8 HeIIλ5412 - - 7.9 3.2 - 7.4 6.7 3.6 7.3 - - 21.5 [NII]λ5755 - - - - - - - - - 5.0 11.9 - HeIλ5876 22.5 13.7 4.0 5.8 18.1 3.0 1.1 10.5 1.3 15.1 10.7 2.4 [OI]λ6300 - - - - 9.3 2.4 - 4.2 0.9 32.1 31.8 7.9 [SIII]λ6312 1.5 - - - 1.0 0.4 - 0.6 1.8 8.6 - - [NII]λ6548 - - - - 107.0 2.5 - 6.4 - 37.6 77.0 7.9 Hαλ6563 285.1 285.0 285.1 285.1 285.1 285.1 285.1 285.1 285.1 285.0 285.0 285.1 [NII]λ6584 8.2 1.8 1.6 6.3 313.6 1.7 1.3 21.6 4.8 110.6 205.2 6.4 HeIλ6678 8.5 2.8 1.4 6.8 4.2 2.5 - 2.8 1.8 7.9 10.2 1.3 [SII]λ6716 2.7 3.9 - 2.1 38.4 - - 1.2 1.0 32.8 32.3 - [SII]λ6731 3.7 2.6 - 4.0 31.9 - - 2.2 1.2 26.0 28.9 - [ArIII]λ7135 19.8 3.0 7.8 4.8 19.6 5.4 4.4 5.3 5.5 8.8 15.7 4.6 [OII]λ7320+30 14.6 - 3.0 10.3 - 1.0 - 6.0 1.2 15.9 12.9 -

Line SB35 SB37 SB38 SB42 SB44 SB50 SB52 SB53 SB55 [OII]λ3726+29 29.8 38.4 6.0 35.8 - 72.5 33.4 43.0 15.4 [NeIII]λ3869 73.0 132.2 63.1 29.1 25.1 62.9 68.2 71.1 56.6 [NeIII]λ3967 18.9 47.3 13.4 26.9 - - 37.5 39.0 24.0 Hγλ4340 42.6 76.2 44.6 32.8 32.4 51.3 56.1 53.2 46.1 [OIII]λ4363 8.3 32.5 26.1 3.0 6.7 20.0 12.1 23.7 17.0 HeIλ4472 11.9 - - 7.6 - - 2.8 - - HeIIλ4686 - 166.3 65.6 4.9 129.8 96.5 121.4 128.1 126.7 Hβλ4861 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 100.0 [OIII]λ4959 266.2 401.8 303.1 89.0 188.0 228.5 228.6 312.7 123.7 [OIII]λ5007 766.0 1213.7 888.2 245.0 627.5 685.7 674.9 904.5 353.0 HeIIλ5412 - 12.0 3.5 - 7.6 5.9 9.8 8.7 9.0 [NII]λ5755 1.1 - - 0.3 - - 0.2 1.2 - HeIλ5876 16.9 - 15.6 6.5 4.0 7.4 4.8 2.5 7.2 [OI]λ6300 - 0.7 - - - - 1.3 3.3 - [SIII]λ6312 - 3.4 - - - - 1.2 4.2 - [NII]λ6548 3.4 - - - 15.1 - 0.8 5.6 - Hαλ6563 285.1 285.1 285.0 285.1 285.0 285.0 285.0 285.1 285.1 [NII]λ6584 2.7 13.9 2.2 10.8 19.8 14.0 5.6 16.1 3.2 HeIλ6678 5.5 3.3 3.3 4.6 2.6 5.1 2.8 2.6 3.8 [SII]λ6716 1.5 3.5 3.1 2.0 3.8 6.5 2.2 4.1 0.3 [SII]λ6731 - 3.2 - 1.5 4.3 5.8 2.6 4.2 0.4 [ArIII]λ7135 7.8 - 6.1 3.4 14.3 12.1 12.2 19.1 5.6 [OII]λ7320+30 2.2 0.8 3.5 2.8 7.9 - 2.9 - 5.4