PLATE 290+27.1* MmWe 2-3

292+01.3 WRA 16-93

294+14.1 Lo 6

291+19.1 ESO-320-28

293+10.1 BLDZ 1

298+34.1 CTIO 1230-275

PLATE 298+06.1 WKK 171-090

299+00.1* BI Cru

300−02.2* Sa 3-20

077 299+18.1 K 1-23

299−04.1* HtTr 1

300−03.1 ESO-095-12

PLATE 301−01.1 PN 1231-6401

302−00.2 VBRC 4

304+05.2 ESO-173-01

302+02.1 ESO-131-15

302−05.1* Y-C 14

305+03.1* SP 2-22

PLATE 305−03.1 Sa 2-91

307+05.1 Sa 2-93

308+07.1 MmWe 1-3

079 305−13.1 ESO-040-11

307−03.2 WeKG 1

308+00.1 WeKG 2

PLATE 308−03.1* IRAS13427-6531

309−02.1* MaC 1-2

310+01.1 Vo 4

309+01.1 VBRC 5

310+24.1 Lo 8

310+01.2 WeKG 3