PLATE 156+12.1* HtDe 4

158+17.1 PuWe 1

160−00.1 We 1-2

056 156−13.1* HtWe 5

158+00.1* Sh 2-216

160−02.1 WSLS 1

PLATE 163−00.1 We 1-3

165−06.1 K 3-67

167−09.1 K 3-66

164+31.1 JnEr 1

166−06.1* CRL 618

170+15.1 NGC 2242

PLATE 170+04.1 K 3-69

178−02.1 K 3-68

183+05.1 WeSb 2

173+03.1* Pu 2

181+00.1 Pu 1

184+04.1 K 3-71

PLATE 184+00.1 K 3-70

193−04.1 KLSS 1-5

197+05.1 KLSS 1-6

192+07.1* HtDe 6

197+17.1 NGC 2392

197−06.1 WeDe 1

PLATE 199+14.1* IRAS07171+1823

201−04.1 We 1-4

204−03.1 K 3-72

201+02.1 K 4-48

203−18.1* MaC 2-2

204−13.1* MaC 2-4