PLATE 111−03.1* We 2-260

112−00.1 KJPN 8

120+18.1* Sh 2-174

112+03.1 K 3-88

116+00.1* We 2-262

120−05.1 Sh 2-176

PLATE 121+03.1 We 1-1

124+02.1* KLSS 2-7

125−47.1 PHL 932

124+10.1 EL 0103+73

124−07.1 WeSb 1

126+03.1 K 3-90

PLATE 128−04.1* S 22

129−02.1* We 2-5

130+03.1 K 3-92

129+04.1 K 3-91

129−05.1 KLSS 2-8

132+04.1 K 3-93

PLATE 136+05.1 HEFE 1

138+04.1* HtDe 2

144+65.1 BE UMa

054 137+16.1* EL 0419+72

142+03.1 K 3-94

147−09.1* HtWe 3

PLATE 148−48.1* GR 0155+10

149−03.1* IsWe 1

151+00.1 K 3-64

055 149+04.1* K 4-47

149−09.1* HtDe 3

153−01.1 K 3-65