PLATE 001−03.8* SAWI 6

001−03.9 SAWI 7

001−05.1 SB 5

001−03.8* C SAWI 6

001−03.9 C SAWI 7

001−05.2 SB 6

PLATE 001−06.3 ID SB 4

002+05.2 K 5-3

002+02.2 Ta 1580

002+06.1* IRAS17248-2254

002+02.1 Ta 5

002+01.1 H 2-20

PLATE 002+01.2 Ta 1567

002+01.3* C K 5-15

002−01.1 Pe 2-11

002+01.3* K 5-15

002+01.4 JaFu 1

002−01.1 C Pe 2-11

PLATE 002−02.5 KnFs 2

002−03.7 Sa 3-115

002−05.2 KnFs 14

002−02.5 C KnFs 2

002−03.7 C Sa 3-115

002−05.2 C KnFs 14

PLATE 003+66.1 SkAc 1

003+04.1 K 5-6

003+04.2 C K 5-7

003+06.1* IRAS17269-2235

003+04.2 K 5-7

003+01.1 Ta 2111