Table 2. Photographic coordinates of 113 Radio Sources

Run No Hipp α(J2000.0) δ(J2000.0) BT N T

No or Name (h) (m) (s) (^ffi) (^0) (^{00}) (m)

1 Y Cas 00 03 24.247 55 40 57.53 13.000 5 87.124 2 319 00 04 03.791 62 13 19.06 8.466 2 92.742 3 1196 00 14 58.778 08 49 15.37 6.382 2 92.745 4 1236 00 15 22.252 -32 02 43.20 9.282 2 92.746 5 5980 01 16 55.087 06 48 42.22 9.889 3 92.743 6 6669 01 25 35.656 23 30 41.82 6.710 2 92.743 7 UV Cet 01 38 59.881 -17 57 05.53 10.000 2 92.904 8 10826 02 19 20.786 -02 58 38.10 7.758 2 92.743 9 11832 02 32 42.578 61 27 21.68 8.467 4 91.434 10 12469 02 40 31.648 61 13 45.20 11.597 2 92.743 11 14135 03 02 16.773 04 05 23.56 4.688 2 92.743 12 14576 03 08 10.136 40 57 20.60 2.100 2 92.743 13 15063 03 14 05.343 59 33 48.76 7.651 2 92.743 14 16042 03 26 35.364 28 42 55.26 7.594 2 92.743 15 16496 03 32 25.136 -03 18 47.49 8.541 2 92.743 16 16846 03 36 47.287 00 35 17.14 5.923 2 92.743 17 19431 04 09 40.881 -07 53 34.82 7.869 2 92.904 18 19610 04 12 08.896 -10 28 09.22 9.232 2 92.904 19 19720 04 13 34.539 10 12 44.84 6.272 2 92.745 20 20070 04 18 14.538 50 17 44.12 4.667 2 92.904 21 T Tau 04 21 59.414 19 32 06.62 11.326 2 92.904 22 22000 04 43 45.824 -10 40 56.20 8.755 2 92.904 23 22349 04 48 42.017 18 42 37.57 7.715 4 90.365 24 22783 04 54 02.990 66 20 33.59 4.286 2 92.904 25 26081 05 33 44.885 01 56 44.31 11.53V 2 92.904 26 26311 05 36 12.800 -01 12 07.04 1.553 2 92.923 27 M 1-82 05 41 06.227 35 49 24.49 16.000 4 85.949 28 26714 05 40 39.676 -20 17 55.48 8.814 3 83.929 29 26727 05 40 45.552 -01 56 33.43 1.566 2 92.923 30 26752 05 41 02.288 -02 43 00.87 7.954 2 92.904 31 27989 05 55 10.296 07 24 25.30 2.849 2 92.923 32 28404 05 59 56.094 45 56 12.06 6.487 2 92.904 33 29984 06 18 45.537 15 16 52.17 9.578 4 88.942 34 33165 06 54 13.043 -23 55 42.76 6.663 2 92.904 35 34003 07 03 18.299 -05 44 15.96 10.498 2 92.904 36 35487 07 19 28.081 -16 23 42.10 6.119 2 92.986 37 35600 07 20 48.432 -05 15 36.16 10.140 2 92.904 38 35793 07 22 58.264 -25 46 03.64 11.601 2 92.904 39 36773 07 33 47.968 -14 31 26.16 6.724 2 92.904 40 37629 07 43 18.692 28 53 02.30 5.691 2 92.904 41 37766 07 44 40.401 03 33 13.80 11.19V 7 89.646 42 39348 08 02 35.806 57 16 25.46 7.249 2 92.904 43 42303 08 37 30.132 23 33 41.92 10.914 2 92.923 44 44164 08 59 42.750 -27 48 58.33 7.748 2 92.923 45 IRS+10 216 09 47 57.512 13 16 32.22 13.600 2 88.049 46 AD Leo 10 19 36.402 19 52 12.06 10.220 2 96.243 47 56974 11 40 46.370 51 59 53.28 10.825 2 96.243 48 57917 11 52 45.102 -07 35 48.20 10.509 3 83.110

Table 2. (continued)

Run No Hipp α(J2000.0) δ(J2000.0) BT N T

No or Name (h) (m) (s) (^ffi) (^0) (^{00}) (m)

49 Wolf 424 12 33 19.141 09 01 12.88 13.100 2 85.317 50 61281 12 33 28.960 69 47 17.50 3.733 2 96.303 51 63642 13 02 37.982 05 11 08.49 10.306 2 96.303 52 65915 13 30 46.853 24 13 57.83 9.280 2 86.208 53 68064 13 56 09.641 25 55 07.17 7.233 3 86.208 54 HD123304 14 06 29.615 13 29 05.94 10.862 2 86.211 55 70401 14 24 11.607 25 42 13.94 9.603 3 86.208 56 70669 14 27 16.400 04 40 41.07 10.00V 3 85.316 57 71380 14 35 48.442 -18 02 11.42 10.514 3 84.437 58 72944 14 54 28.990 16 06 05.54 11.783 4 86.208 59 WW Dra 16 39 03.916 60 42 07.49 9.487 2 84.423 60 82080 16 45 58.060 82 02 14.16 5.345 3 89.362 61 82817 16 55 29.618 -08 19 57.46 10.982 2 84.393 62 87965 17 58 07.018 15 08 21.10 7.985 2 89.340 63 V426 Oph 18 07 51.700 05 51 48.31 12.500 2 89.487 64 XY Her 18 14 34.252 20 59 21.13 12.500 2 89.496 65 90115 18 23 22.807 -12 40 51.76 12.458 3 78.609 66 90303 18 25 31.492 -12 41 24.28 10.385 3 81.505 67 FN Ser Nova 18 30 47.027 02 36 51.81 13.000 2 89.679 68 92420 18 50 04.797 33 21 45.62 3.519 3 89.433 69 92871 18 55 27.372 08 24 09.86 12.053 2 92.502 70 93820 19 06 22.245 08 13 48.64 9.069 2 92.502 71 SS 423 19 11 49.509 04 58 58.69 13.000 2 89.488 72 95244 19 22 40.308 -20 38 34.04 8.039 2 92.507 73 95266 19 22 57.236 -14 15 31.56 10.483 2 92.508 74 VV 230 19 24 22.266 09 53 56.16 13.400 2 92.508 75 96714 19 39 38.824 -06 03 49.68 9.769 2 92.508 76 HM Sge 19 41 57.076 16 44 39.77 6.000 2 92.508 77 M 1-74 19 42 18.784 15 09 08.66 12.800 2 89.504 78 V1016 Cyg 19 57 05.040 39 49 35.93 11.709 2 94.695 79 98298 19 58 21.680 35 12 05.76 9.828 3 86.750 80 99546 20 12 06.559 38 21 17.77 7.661 2 94.693 81 He 2-459 20 13 57.926 29 33 49.69 12.400 2 86.769 82 100044 20 17 47.186 38 01 58.54 5.230 2 94.693 83 100214 20 19 32.419 38 43 54.02 8.581 3 94.693 84 IC 4997 20 20 08.767 16 43 53.38 12.138 2 89.502 85 100287 20 20 27.983 43 51 16.36 7.392 5 92.452 86 101098 20 29 36.860 -21 07 34.59 10.477 3 82.723 87 101341 20 32 22.429 41 18 19.03 11.046 3 94.698 88 101364 20 32 40.962 41 14 29.28 11.40V 2 85.725 89 MWC 349 20 32 45.545 40 39 37.14 13.000 2 85.725 90 101419 20 33 10.762 41 15 07.77 10.780 2 94.703 91 101425 20 33 15.062 41 18 50.72 10.136 3 94.698 92 102190 20 42 20.407 19 09 39.46 12.31V 4 88.601 93 HBV 475 20 51 01.218 35 34 54.36 13.600 2 86.748 94 UX Cyg 20 55 05.471 30 24 52.64 13.500 2 85.525 95 V1500 Cyg 21 11 36.637 48 09 02.72 13.300 2 85.720 96 106961 21 39 48.914 -16 00 21.10 10.909 2 94.709

Table 2. (continued)

Run No Hipp α(J2000.0) δ(J2000.0) BT N T

No or Name (h) (m) (s) (^ffi) (^0) (^{00}) (m)

97 Cyg X-2 21 44 41.117 38 19 16.56 14.000 2 89.747 98 107848 21 51 01.996 12 37 32.06 10.143 2 92.729 99 MWC 645 21 53 27.527 52 59 59.82 13.400 2 85.712 100 108317 21 56 39.128 63 37 32.07 7.165 2 94.704 101 108728 22 01 30.677 43 53 25.38 10.456 10 86.721 102 109070 22 05 42.062 35 20 54.23 10.474 2 94.704 103 109303 22 08 40.897 45 44 32.10 7.054 2 94.704 104 111802 22 38 45.362 -20 37 15.82 10.956 2 92.742 105 112247 22 44 07.510 55 35 21.46 8.857 2 92.745 106 112460 22 46 50.552 44 20 08.41 12.054 6 87.519 107 112997 22 53 02.289 16 50 28.36 7.346 3 89.668 108 113561 23 00 05.100 56 56 43.54 6.386 2 92.745 109 114639 23 13 23.766 02 40 31.47 8.401 2 92.742 110 HB 12 23 26 14.848 58 10 54.35 13.600 2 86.748 111 116584 23 37 33.734 46 27 32.02 5.120 2 92.742 112 117054 23 43 49.461 -15 17 04.10 9.146 2 92.742 113 117915 23 55 03.728 28 38 00.88 8.806 2 92.742