This article was processed by the author using Springer-Verlag LATEX A&A style file L-AA version 3.

Table 2. Near-infrared photometry of ISO-AGB variables 1

GCVS4 IRAS Type Phase Chem. JD J H K L^0 pub. VY Cas 00484+6238 SRb O 2450406.96 2.40 1.50 1.16 0.91 2450709.13 2.43 1.49 1.13 0.89 R For 02270�2619 M 0.73 C 2450407.95 4.22 2.69 1.39 0.00 0.49 2450708.24 4.56 2.93 1.57 0.04 RV Cam 04265+5718 SRb O 2447873.54 1.83 0.86 0.52 0.19 SRIIa 2450408.11 1.78 0.85 0.53 0.30 2450690.19 2.00 1.07 0.70 2450708.21 1.94 1.01 0.67 0.38 2450907.86 1.82 0.84 0.50 0.25 Z Cnc 08196+1509 SRb O 2448290.17 2.49 1.56 1.21 0.92 SRIIa 2449850.91 2.32 1.43 1.13 0.87 CW Cnc 09057+1325 Lb O 2450907.90 1.34 0.44 0.10 0.27 2451329.88 1.33 0.48 0.12 -0.26 RT UMa 09149+5136 Lb C 2449854.90 4.93 3.86 3.25 2.56 LBI 2451291.94 4.45 3.49 3.01 Z Sex 10083+0248 Lb O 2449854.92 4.89 4.01 3.78 3.45 LBI 2450947.94 9.64 9.17 9.07 RW LMi 10131+3049 SRa C 2447648.42 7.36 4.76 2.62 -0.83 SRIIa 2451294.00 6.14 3.63 1.44 2451329.94 6.51 3.99 1.77 -1.46 IY Hya Lb: C 2451292.96 5.98 3.81 2.06 2451330.91 5.42 3.43 1.74 -0.68 CV Leo 11514+2046 Lb O 2450498.17 6.19 5.44 5.26 2450946.90 6.21 5.43 5.26 4.86 2450985.87 6.11 5.34 5.24 5.55 2451328.91 6.25 5.45 5.26 4.97 RW Vir 12046�0629 Lb O 2450498.19 1.38 0.50 0.19 2450985.89 0.98 0.13 0.13 -0.19 2451328.93 1.34 0.45 0.16 -0.21 UY CVn Lb O 2450498.20 4.86 4.03 3.78 2450946.92 4.90 4.05 3.79 3.57 2451328.94 4.98 4.12 3.86 3.57 SS Vir 12226+0102 SRa C 2447661.00 3.06 1.64 0.85 -0.20 SRIIa 2448378.10 3.46 2.01 0.96 -0.16 SRIIa 2451292.00 2.96 1.75 0.88 2451329.99 2.65 1.53 0.67 -0.16 Y UMa 12380+5607 SRb O 2449850.93 0.73 -0.19 -0.57 -1.03 2450946.94 0.75 -0.12 -0.51 -0.89 2450985.90 0.65 -0.23 -0.51 -0.89 2451328.96 1.13 0.24 -0.21 -0.56 RU Vir 12447+0425 M 0.96 C 2451292.01 3.74 2.38 1.37 0.95 2451330.00 3.49 2.15 1.11 -0.61 TT CVn 12570+3805 SRb C 2451292.02 6.20 5.55 5.30 2451330.01 6.17 5.53 5.23 5.23 SY CVn 13081+4718 Lb O 2450498.22 3.48 2.68 2.31 2450946.96 3.52 2.70 2.34 2.00 2450985.91 3.46 2.65 2.36 2.07 2451328.99 3.69 2.90 2.52 2.17 RX Boo 14219+2555 SRb O 2449850.96 -0.56 -1.47 -1.87 -2.35 SY CrB 15349+3244 Lb O 2450498.24 3.72 2.87 2.56 2450946.98 3.74 2.88 2.58 2.35 2450985.93 3.77 2.94 2.60 2.39 2451329.00 3.83 2.97 2.67 2.49 �!

Table 3. Near-infrared photometry of ISO-AGB variables 2

GCVS4 IRAS Type Phase Chem. JD J H K L^0 pub. V CrB 15477+3943 M 0.88 C 2450173.07 3.49 2.48 1.69 0.95 2450201.08 3.18 2.17 1.44 0.02 2450226.09 3.11 2.05 1.31 0.04 2450231.93 3.16 2.08 1.35 0.12 0.05 2450233.93 3.13 2.05 1.32 0.07 0.09 2450248.96 3.11 2.03 1.29 0.03 0.14 2450268.95 3.20 2.10 1.32 0.15 0.82 2450509.23 3.79 2.64 1.77 0.65 0.86 2450908.03 3.55 2.44 1.55 0.29 0.96 2450946.98 3.24 2.14 1.31 0.16 0.07 2450985.93 3.13 2.00 1.18 0.08 0.03 2451329.01 2.88 1.82 1.11 -0.03 ST Her 15492+4837 SRb O 2450498.25 0.60 -0.26 -0.65 2450947.00 0.58 -0.32 -0.67 -0.98 2450985.94 0.55 -0.34 -0.71 -0.98 2451329.03 0.65 -0.23 -0.56 -0.84 RR Her 16028+5038 SRb C 2451292.09 4.38 3.49 3.22 2451330.05 4.49 3.61 3.31 2.90 NP Her 16150+2558 M C 2451293.04 5.61 4.40 3.48 2451330.07 5.44 4.27 3.44 2.53 g Her 16269+4159 SRb O 2449851.06 -0.88 -1.76 -2.04 -2.34 2449997.86 -0.89 -1.78 -2.10 2450173.08 -0.80 -1.63 -1.94 2450201.09 -0.83 -1.66 -1.95 2450226.08 -0.87 -1.73 -2.02 2450231.94 -0.83 -1.68 -1.98 -2.24 2450248.00 -0.84 -1.69 -1.98 -2.24 2450248.99 -0.85 -1.70 -2.00 -2.28 2450268.98 -0.74 -1.64 -1.95 -2.17 2450297.92 -0.86 -1.69 -2.03 -2.29 2450306.99 -1.11 -1.91 -2.17 -2.37 2450498.26 -1.73 -2.02 2450626.08 -0.88 -1.72 -2.02 -2.36 2450660.00 -0.90 -1.81 -2.06 -2.34 2450660.98 -0.90 -1.77 -2.08 2450686.98 -0.89 -1.74 -2.05 -2.31 2450947.01 -0.89 -1.74 -2.04 -2.26 2450985.97 -0.80 -1.67 -2.05 -2.25 2451329.06 -0.85 -1.71 -2.00 -2.22 AX Sco 16387�2700 SRb O 2449854.09 2.06 1.12 0.80 0.47 2450948.03 2.57 1.66 1.24 1.02 2450985.98 1.65 0.77 0.89 0.43 2451329.07 2.11 1.15 0.83 0.26 V380 Sco 16529�3014 SRa O 2449851.11 4.72 3.80 3.56 3.35 V438 Oph 17123+1107 SRb O 2449852.08 1.89 1.01 0.66 0.23 2450708.86 1.83 0.94 0.57 2450948.01 1.85 0.91 0.56 2450985.99 1.86 0.96 0.53 0.19 2451329.09 1.76 0.86 0.51 0.15 Z Oph 17170+0133 M 0.68 O 2449852.12 5.72 4.95 4.48 3.72 V520 Oph 17197�2909 SRa O 2449851.14 4.83 3.98 3.67 3.27 TY Dra 17361+5746 Lb O 2449854.16 2.28 1.36 0.99 0.69 LBI 2450708.91 2.26 1.30 0.95 0.70 2450948.02 2.20 1.22 0.89 0.65 2450986.00 2.27 1.37 1.02 0.71 2451329.10 2.45 1.54 1.17 0.84 �!

Table 4. Near-infrared photometry of ISO-AGB variables 3

GCVS4 IRAS Type Phase Chem. JD J H K L^0 pub. T Dra 17556+5813 M 0.44 C 2450173.17 4.59 3.03 1.73 0.74 2450201.13 4.55 3.00 1.68 0.81 2450232.01 4.37 2.88 1.59 0.04 0.90 2450269.06 3.82 2.37 1.24 -0.23 0.97 2450297.95 3.45 2.10 0.99 -0.44 0.72 2450626.10 4.45 2.99 1.68 0.17 0.80 2450659.04 4.31 2.84 1.55 0.10 0.80 2450660.01 4.38 2.85 1.62 0.15 0.80 2450661.04 4.25 2.81 1.55 0.86 2450685.94 3.92 2.53 1.33 -0.12 0.56 2450986.02 4.76 3.30 1.94 0.45 0.36 2451331.03 4.19 2.74 1.59 -0.03 AO Sgr 18089�2952 SRb O 2449851.16 3.09 2.17 1.84 1.52 V851 Oph 18324+0701 SRb O 2449852.14 3.93 3.00 2.66 2.32 CZ Ser 18347�0241 Lb O 2450707.94 2.53 1.42 0.99 0.62 2450948.12 2.51 1.33 0.93 0.58 2450986.03 2.54 1.40 0.97 0.58 2451331.11 2.57 1.46 1.02 RW Sct 18537�1035 SRb O 2449852.17 1.99 1.05 0.68 0.24 R Aql 19039+0809 M 0.97 O 2450708.97 0.60 -0.22 -0.65 -1.25 0.72 2451331.12 0.39 -0.47 -0.90 -1.52 T Sge 19194+1734 SRb O 2447388.00 1.35 0.25 -0.17 -0.65 SRIIa 2449852.16 1.32 0.32 -0.07 -0.52 2450708.98 1.19 0.21 -0.20 2451331.12 1.26 0.28 -0.12 -0.59 AH Cyg 19588+4002 SRb O 2448081.60 3.36 2.36 1.95 1.74 SRIIa 2449852.18 3.25 2.31 1.97 1.67 V584 Aql 20079�0146 Lb O 2450709.02 2.05 1.14 0.77 0.46 V499 Aql 20141�0716 SRa O 2449855.16 3.79 2.92 2.57 2.28 CZ Del 20312+0920 SRb O 2449853.19 3.68 2.84 2.60 2.36 V Cyg 20396+4757 M 0.86 C 2450659.15 3.19 1.50 0.13 -1.60 0.86 2450661.14 3.14 1.48 0.11 0.93 2450687.07 2.71 1.12 -0.19 -1.82 W Cyg 21341+4508 SRb O 2449594.00 -0.29 -1.15 -1.48 -1.75 SRIIb 2449954.16 -0.35 -1.13 -1.44 2449996.91 -0.31 -1.09 -1.41 -1.57 2450042.93 -0.27 -1.08 -1.37 2450232.23 -0.14 -0.99 -1.31 -1.63 2450249.19 -0.16 -1.03 -1.36 -1.63 2450269.17 -0.15 -1.01 -1.38 -1.65 2450306.04 -0.18 -1.05 -1.34 -1.61 2450326.02 -0.16 -1.06 -1.37 -1.64 2450710.11 -0.16 -1.03 -1.35 -1.12 SV Peg 22035+3506 SRb O 2449594.07 0.77 -0.13 -0.49 -0.83 SRIIb 2449954.16 0.70 -0.17 -0.55 2449997.89 0.81 -0.13 -0.53 -0.81 2450042.93 0.69 -0.19 -0.56 2450306.11 0.81 -0.16 -0.52 -0.84 2450326.05 0.74 -0.20 -0.57 -0.87 2450327.04 0.70 -0.21 -0.59 -0.87 2450407.90 0.77 -0.21 -0.56 -0.90 2450686.04 0.85 -0.07 -0.48 -0.89 V571 Cas 23174+5941 Lb C 2450691.00 10.21 7.84 5.78 2450707.07 10.11 7.77 5.74 3.28 V353 Cas 23211+5553 SRa C 2448086.68 4.68 3.46 2.76 2.13 SRIIa 2450706.04 4.68 3.53 2.86 �!

Table 5. Near-infrared photometry of ISO-AGB variables 4

GCVS4 IRAS Type Phase Chem. JD J H K L^0 pub. R Cas 23558+5106 M 0.69 O 2449954.18 -0.01 -0.86 -1.52 0.89 2450042.94 -0.34 -1.09 -1.67 0.92 2450055.96 -0.38 -1.20 -1.76 -2.59 0.96 2450074.92 -0.50 -1.29 -1.77 0.48 2450297.17 -0.05 -0.93 -1.58 -2.53 0.49 2450298.19 0.10 -0.80 -1.44 -2.38 0.50 2450306.17 0.12 -0.88 -1.48 -2.44 0.55 2450326.12 0.29 -0.67 -1.39 -2.31 0.55 2450327.10 0.30 -0.69 -1.41 -2.35 0.74 2450407.93 0.00 -0.91 -1.55 -2.48 0.40 2450686.12 -0.27 -1.14 -1.70 -2.56