\documentstyle{l-aa}
\begin{document}

\begin{table*}
\caption[]{Optical and radio positions of the  new galactic bulge PNe. 
The radio position is the position of the peak flux density per beam of the PN at 6~cm. 
Objects for which run=1 were observed
in 1997, objects for which run=2 were observed in 1999 }
\begin{tabular}{lllllllll}
\hline
JaSt & \multicolumn{2}{l}{Optical (2000.0)} & \multicolumn{2}{l}{Radio (2000.0)} & $\Delta$RA & $\Delta$DEC  & run & comment \\
     & RA(h m  s) & DEC (\degr\ \arcmin\ \arcsec)  &  RA(h  m  s) & DEC (\degr\ \arcmin\ \arcsec) & \arcsec\ & \arcsec\ &  & \\
\hline
1  & 17 34 43.64 &  -29 47 05.03 &  17 34 43.60 & -29 47 06.03 & -0.60  &  1.00    & 2 &   \\  
 2 & 17 35 00.96 &  -29 22 15.72 &  17 35 00.96 & -29 22 15.85 &   0.00 &  0.13    & 1 &  \\  
 3 & 17 35 22.90 &  -29 22 17.58 &  17 35 22.79 & -29 22 17.08 & -1.65 & -0.50   & 1 &  \\ 
 4 & 17 35 37.47 &  -29 13 17.67 &  17 35 37.39 & -29 13 17.81 & -1.20 & 0.14     & 1 & \\ 
 5 & 17 35 52.51 &  -28 58 27.95 &  17 35 52.44 & -28 58 27.45 & -1.05 &  -0.50  & 1 & \\ 
7  & 17 38 26.69 &  -28 47 06.48 &   &  &   &     & 2 &  not detected \\  
 8 & 17 38 27.74 &  -28 52 01.31 &  17 38 27.58 & -28 52 01.36 &  -2.40 & 0.05  & 2 &  \\ 
 9 & 17 38 45.64 &  -29 08 59.27 &  17 38 45.54 & -29 08 55.65 &  -1.50  &  -3.62 & 2 &  \\  
11 & 17 39 00.55 &  -30 11 35.23 & 17 39 00.48 & -30 11 32.23 &  -1.05 &-3.00  & 2 &  \\  
16 & 17 39 22.70 &  -29 41 46.08 &  17 39 22.64 & -29 41 45.35 &  -0.90 &-0.70  & 1 &  \\ 
17 & 17 39 31.32 &  -27 27 46.78 &  17 39 31.21 & -27 27 47.28 &  -1.65 & -0.50  & 1 & \\ 
19 & 17 39 39.38 &  -27 47 22.58 &  17 39 39.31 & -27 47 22.21 &  -1.05 & -0.37  & 1 &  \\
21 & 17 39 52.92 &  -27 44 20.54 &                      &                      &           &             & 2 & not detected \\  
23 & 17 40 23.17 &  -27 49 12.04 &  17 40 23.08 & -27 49 12.29 &  -1.35 & 0.25  & 1 & \\  
24 & 17 40 28.23 &  -30 13 51.30 &  17 40 28.19 & -30 13 51.00 &  -0.60 & -0.30 &  1 &  \\
26 & 17 40 33.52 &  -29 46 14.98 &  17 40 33.25 & -29 46 12.48 &  -4.05 & -2.50 &  2 &   \\ 
27 & 17 40 42.34 &  -28 12 31.90 &  17 40  42.16 & -28 12 30.81 & -2.7 & -1.1 & 1 & \\
31 & 17 41 27.93 &  -28 52 51.61 &  17 41 27.89 & -28 52 50.61 & -0.60 & -1.00 & 1 & \\  
34 & 17 41 54.80 &  -27 03 20.33 &  17 41 54.69 & -27 03 18.33 & -1.65 & -2.00 & 2 & \\ 
36 & 17 42 25.20 &  -27 55 36.36 &  17 42 25.13 & -27 55 36.36 & -1.05 & 0.00 & 1 & \\  
37 & 17 42 28.60 &  -30 09 34.93 &  17 42 28.52 & -30 09 32.93 & -2.00 & -2.00 & 1 & \\ 
38 & 17 42 32.41 &  -27 33 15.18 &  17 42 32.29 & -27 33 16.26 & -1.80 &1.08 & 1 & \\  
41 & 17 42 49.96 &  -27 21 19.68 &  17 42 49.85 & -27 21 19.31 & -1.65 & -0.37 & 1 &  \\  
42 & 17 43 17.06 &  -26 44 17.67 &  17 43 16.98 & -26 44 18.25 & -1.20 & 0.58 & 1 & \\  
44 & 17 43 23.48 &  -27 34 06.03 &  17 43 23.52 & -27 34 06.55 &  0.60 & 0.52 & 1 & \\  
45 & 17 43 23.44 &  -27 11 16.91 &                     &             &          &         & 2 &  not detected \\  
46 & 17 43 30.43 &  -26 47 32.33 &  17 43 30.36 & -26 47 31.83 & -1.05 & -0.50 & 1 & \\  
49 & 17 44 04.34 &  -28 15 57.86 &  17 44 04.23 & -28 15 56.99 & -1.65 & -0.87 & 1  & \\ 
52 & 17 44 37.30 &  -26 47 25.23 &  17 44 37.23 & -26 47 25.23 & -1.05 & 0.00 & 1 & \\ 
54 & 17 45 11.06 &  -27 32 36.80 &  17 45 11.02 & -27 32 36.80 & -0.60 & 0.00 & 2 & \\ 
55 & 17 45 37.36 &  -27 01 18.44 &  17 45 37.15 & -27 01 18.16 & -3.15 & -0.28 & 1 &  \\ 
56 & 17 45 47.05 &  -27 30 42.03 &  17 45 46.96 & -27 30 42.01 & -1.35 &-0.02 & 2 & \\  
58 & 17 46 52.20 &  -30 37 42.83 &  17 46 52.32 & -30 37 42.33 & 1.80  & -0.50 & 2 &  \\
60 & 17 47 53.91 &  -29 36 49.67 &  17 47 53.91 & -29 36 49.67 & 0.00 & 0.00 &  2 & \\ 
63 & 17 48 46.27 &  -27 25 37.22 &  17 48 46.27 & -27 25 36.72 & 0.00 & -0.50 & 1  & \\ 
64 & 17 48 56.04 &  -31 06 41.95 &  17 48 56.04 & -31 06 42.45 & 0.00 & 0.50 & 1  & \\  
65 & 17 49 20.02 &  -30 36 05.57  & 17 49 20.02 &  -30 36 05.08 & 0.00 & 0.23 &  1   & \\ 
66 & 17 49 22.15 &  -29 59 27.02  & 17 49 22.11 & -29 59 27.02 &  -0.60 & 0.00  & 2 & \\ 
67 & 17 49 28.10 &  -29 20 47.56  & 17 49 28.02 & -29 20 47.56 & -1.20 & 0.00   &  2 & \\
68 & 17 49 50.87 &  -30 03 10.47  & 17 49 50.83 & -30 03 10.97 & -0.60 & 0.50   & 2 &  \\ 
69 & 17 50 10.04 &  -29 19 05.14  &  17 50 10.11: & -29 19 08.82: & 1.05 & 3.68 & 1 &  \\ 
70 & 17 50 21.07 &  -28 39 02.46 &  17 50 21.03 & -28 39 01.46 &  -0.60 & 1.0 & 2 & \\ 
71 & 17 50 23.32 &  -28 33 10.95  &  17 50 23.21 & -28 33 10.45 & -1.65 & -0.50 & 1 & \\ 
73 & 17 50 47.74 &  -29 53 16.01  &  17 50 47.82 &  -29 53 14.01  &  1.20 & -1.99 & 2 & \\
74 & 17 50 46.85 & -28 44 35.42  &  17 50 46.77 & -28 44 34.92 & -1.20 & -0.50 & 1 & \\ 
75 & 17 50 48.08 &  -29 24 43.60 &  17 50 48.00 & -29 24 43.18 & -1.20 & -0.42 & 1 & \\
76 & 17 50 56.47 &  -28 31 24.63 & 17 50 56.33 &  -28 31 24.13 & -2.10 &-0.50 & 2 & \\ 
77 & 17 51 11.65 & -28 56 27.20  &  17 51 11.58 & -28 56 27.20 & -1.20 & 0.00 & 1 & \\ 
78 & 17 51 24.68 &  -28 35 40.34 &  17 51 24.79 & -28 35 39.44 & 1.65 & -0.90 & 1 & \\ 
79 & 17 51 53.63 & -29 30 53.41  &  17 51 53.55 & -29 30 53.41 & -1.20 & 0.00 & 1 & \\ 
80 & 17 51 55.54  &  -27 48 02.46 &                    &  &  &  & 1 & not detected \\ 
81 & 17 52 04.35 & -27 36 39.28  &  17 52 04.28 & -27 36 38.28 & -1.05 & 1.00 & 1 & \\
83 & 17 52 45.17 &  -29 51 05.21 &  17 52 45.17 & -29 51 03.30 & 0.00 & -1.91 & 1 & \\ 
85 & 17 52 49.05 &  -29 41 54.92 & 17 52 48.97  &  -29 41 55.92 & -1.20 & 1.0 & 2 & \\ 
86 & 17 52 52.20 &  -29 30 00.07 &  17 52 52.16 & -29 30 01.08 & -0.60 & 1.08 & 1 &  \\
88  & 17 53 00.89  & -29 05 44.08  &  & & &  & 2 & not detected   \\  
89  & 17 53 06.67 & -28 18 07.91  &  17 53 06.79 & -28 18 10.47 & 1.80 & 2.56 & 1&    \\ 
90 &  17 53 17.77  & -28 04 33.20 & 17 53 17.73 &  -28 04 32.67 &  -0.60 & -0.53 & 2 &  \\
92 & 17 53 19.81 &  -28 27 14.67 &    & & &  & 2 & not detected  \\ 
93 & 17 53 24.14 &  -29 49 48.45 &  17 53 24.05: & -29 49 51.15: & -1.35 & 2.70 & 1 &  \\ 
95 & 17 53 35.38 & -28 28 51.02  &  17 53 35.51 & -28 28 51.96 & 1.95 & 0.94 & 1 & \\  
96 & 17 53 57.16 &  -29 20 14.97 &  & & &  & 2 &  not detected \\  
97 & 17 54 13.36 &  -28 05 16.82 &  17 54 13.28 & -28 05 16.82 &  -1.20 & 0.00 & 1 & \\ 
98 & 17 55 46.39 & -27 53 38.91  &  17 55 46.28 & -27 53 38.41 & -1.65 & -0.50 & 1 &  \\ 
\hline
\end{tabular}
\end{table*}

\begin{table*}
\caption[]
{Radio flux densities at 6 and 3 cm, and angular sizes are presented.  
The name of the PN is listed in the first
column. The second to sixth columns give the peak flux density per beam, 
the total radio flux density, the error estimate, and the rms in the map respectively.
Columns six to nine list the same quantities at 3~cm.  The tenth
column gives the deconvolved FWHM in arcsec ($\Delta\delta$ x
$\Delta\alpha$). The eleventh column gives the FWHM of the beam major
and minor axis in arcsec ($\Delta\delta$ x $\Delta\alpha$).  The
thirteenth column gives the equivalent FWHM diameter. The fourteenth
column indicates whether the diameter FWHM is the deconvolved FWHM
determined after fitting a Gaussian model (G) or after measuring the
size from the contour plot (C).  All diameters were determined at 6~cm
unless otherwise mentioned. The last column gives an estimate of the
full equivalent diameter as explained in the text.  PS stands for
Point Source.  Values which are very uncertain are marked with a
colon.}
\begin{tabular}{lllllllllllllll}
\hline
Name & 6cm    &      &     &     & 3cm     &      &     &    & size &  beam & FWHM & method  & $\theta$ \\ % PN
 JaSt  & Peak & Flux & error & noise &  Peak & Flux & error & noise & $\Delta\delta$ x $\Delta\alpha$ & maj x min  &  diam &  & \\ 
     & mJy/ & mJy & mJy & mJy/ & mJy/ & mJy & mJy & mJy/ & \arcsec\ x \arcsec\ & \arcsec\ x \arcsec\ & \arcsec\ & & \\ 
     & beam &   &    &  & beam & beam & & & beam & & & & & \\
\hline
1 &  0.85 & 1.6 &  0.2 &  0.10 & 0.47 & 1.4 & 0.6 & 0.12 &  4.5 x  2.6  &  4.3  x 1.9 & 3.4 & G & 5.5   \\
2  & 1.8  & 4.3  & 0.5 & 0.22  & 0.82  & 4.2 &  1.4 & 0.12 & 5.0 x 4.0 & 4.7 x 1.8 & 4.5  & C  & 6.3 \\ 
3  & 4.0  & 12.4 & 1.2 & 0.17  & 1.6   & 10.0 & 1.0 & 0.13 & 5.8 x 4.4  & 4.8 x 2.0 & 5.1 &  C   &  9.2 \\ 
4  & 1.2  & 4.1  &  0.4 & 0.20  & 0.65  & 3.5 & 1.2  & 0.15 & 7.7 x 7.1  & 4.7 x 1.8 & 7.4 & C  & 11.2  \\ 
5  & 4.0  & 11.3 & 1.1 & 0.15  & 1.8   & 10.5 & 1.0 & 0.15 & 6.2 x 5.1  & 4.9 x 2.0 & 5.6 & C  & 8.4  \\ 
8  &1.2 &    3.8 &  0.4 & 0.08 & 0.5 &  2.6 &  0.6 & 0.04 & 3.6 x 5.8 & 4.4 x 1.9 & 4.6 & C  & 7.2 \\ 
9  & 0.96 &  4.0 &   0.4 & 0.08 & 0.38 &  2.5 & 0.8 &  0.08 &  5.6 x 6.2 &  4.7 x 1.8 & 5.9 & C & 8.1 \\ 
11 & 0.76  & 3.3 &  0.3 & 0.07 & 0.41 &  $>$2.0 &  & 0.12 & 6.9 x 5.9 & 4.6 x 1.8 & 6.4 & C &  10.9  \\  
16 & 13.6 & 27.0 & 2.8 & 0.27  & 7.2   & 24.7 & 2.5 & 0.30 & 3.4 x 2.4  & 4.8 x 2.0 & 2.9 & G  & 4.8 \\ 
17 & 2.5  & 9.4 & 1.0 & 0.15  & 1.2   & 8.2  & 0.9 & 0.13 &  5.4 x 5.3  & 5.7 x 1.8 & 5.3 & C   & 7.9 \\
19 & 2.1  & 6.8  & 0.8 & 0.29  & 1.0   & 5.5  & 0.6 & 0.14 & 3.6 x 3.7  & 5.3 x 1.6 &  3.6  & C & 6.8 \\ 
23 & 3.3  & 3.7  & 0.4 & 0.25  & 2.6   & 3.9  & 0.4 & 0.21 & PS &  3.1 x 1.1 & $<$1.8 & G$_{3cm}$ &  \\ 
24 & 6.3  & 16.0 & 1.7 & 0.27  & 2.7   & 14.1 & 1.4 & 0.23 & 4.8 x 2.7  & 4.9 x 1.7  & 3.6 & G & 5.8 \\ 
26 &  2.4 &  14.1 &   1.4 & 0.09 & 1.0 &  9.0 &  0.9 & 0.08 & 9.4 x 9.3  & 5.1 x  1.7 & 8.5 & C & 11.1\\ 
27 & 0.8 & 2.5 & 0.3 & 0.14 & 0.5 &    &       & 0.15 & 9.9 x 5.3 & 5.3 x 1.7 & 8.2 & C & 8.7 \\
31 & 3.3  & 11.5 & 1.2 & 0.22  & 2.4   & $>$3.0  &  & 0.61 & 5.0 x 5.1 &  5.1 x 1.7 & 5.0 & C & 9.0 \\ 
34 &  0.58 &  1.7 & 0.2 & 0.07 & 0.34 & $>$1.5 &    &  0.09 &  3.2 x 6.0  & 5.1 x 1.7 & 4.4  & C & 7.1 \\ 
36 & 18.6 & 31.1 & 3.1 & 0.33  & 11.7  & 31.1 & 3.1 & 0.35 &  2.6 x 1.9  &  3.1 x 1.1 & 2.2 & G$_{3cm}$ &  3.6  \\ 
37 & 5.2  & 16.0 & 1.7 & 0.70  & 2.5   &  $>$5.5  &  & 0.35 & 5.7 x 3.8  &  4.6 x 1.5 & 4.6 & C & 7.4  \\ 
38 & 1.2  & 3.0  & 0.6 & 0.28  & 0.9   & 2.0 & 0.7& 0.15 & 6.8 x 2.2 &  5.3 x 1.7 & 3.9 & C & 7.0  \\ 
41 & 8.0  & 16.7 & 1.7 & 0.20  & 4.6   & 17.6 & 1.8 & 0.18 & 3.4 x 3.2  &  5.6 x 1.8 & 3.3 & C & 6.3 \\ 
42 & 5.6  & 12.9 & 1.3 & 0.21  & 3.3   & 15.5 & 1.6 & 0.26 & 4.0 x 2.5   &  5.5 x 1.6 & 3.1 & G & 5.0 \\ 
44 & 1.3  & 3.8 & 1.0 & 0.27  & 0.9   & $>$1.8  &  & 0.27 & 12.2: x 6.0: &  5.4 x 1.6 & 8.6: & C  & 8.6:  \\ 
46 & 14.6 & 20.8 & 2.1 & 0.40  & 12.3  & 20.5 & 2.1 & 0.30 &  2.0 x 1.1   &  3.3 x 1.1 & 1.5  &  G    &  2.5 \\ 
49 & 3.1  & 8.2  & 0.9 & 0.27  & 2.1   & 10.8 & 1.1 & 0.21 & 4.6 x 3.6  &  5.2 x 1.6 & 4.0  &  C    &  6.6  \\ 
52 & 20.8 & 24.0 & 2.4 & 0.34 & 16.9  & 22.8 & 2.3 & 0.40 & 2.5 x 0.4   &  3.3 x 1.1 & 1.0  &  G$_{3cm}$ &  1.7 \\ 
54 & 21.9  &  82.3 & 8.2 & 0.08 & 7.5 &   75.2 &   7.5 &  0.09 &  4.7 x 4.3 &  5.1 x 1.8 & 4.5 & G & 7.2 \\    
55 & 2.0  & 9.2 & 0.9 & 0.19  & 0.9   & 10.0  & 2.0 & 0.17 & 5.5 x 6.4   & 5.4 x 1.6  & 6.0 &  C   &  10.7 \\ 
56 & 5.8  & 14.1 & 1.4  & 0.09  & 2.4 &12.2 &  1.2 & 0.07 & 3.8 x  2.7 &  2.8 x  .95 & 3.2 & G$_{3cm}$  & 5.0  \\ 
58 & 3.5 & 29.5 &  2.9 & 0.06 & 1.3 & 21.3 &  2.1  & 0.07 & 8.9 x 8.0  & 4.6 x 1.7  & 8.4 & C & 15.5 \\ 
60 & 6.1 & 6.5 & 0.7 & 0.06 & 7.0 &  7.9 &   0.8 &  0.07 &  .85  x   .28 &  2.6 x 1.0 & 0.5 & G$_{3cm}$ & 0.9 \\ 
63 & 1.1  & 3.9  & 0.4 & 0.11  & 0.7   & 3.6 & 1.2  & 0.13 & 6.1 x 6.0  & 5.5 x 1.8  & 6.0  &  C   & 8.4 \\ 
64 & 23.8 & 28.3 & 2.9 & 0.42  & 15.8  & 25.6 & 2.6 & 0.58  & 2.0 x 0.7   & 5.0 x 1.9  & 1.4  &  G    & 2.4     \\ 
65 & 3.3 & 3.4 & 0.4 & 0.23 & 6.3 & 6.6 & 0.7 & 0.30 & PS & 2.7 x 1.0 & $<$ 1.6 & G$_{3cm}$ & \\  
66 & 45.9 &  65.3 & 6.5 &  0.15 & 26.0 & 60.9 & 6.1 &  0.10 & 2.0 x 1.5 &  2.6 x 1.00 & 1.7 & G$_{3cm}$ & 2.8  \\ 
67 & 24.6 &   27.8 &  2.8 &  0.08 & 17.7 &  26.0 &   2.6  & 0.10 & 1.3 x .9 & 2.5 x 1.0 &  1.1 & G $_{3cm}$ & 1.8 \\
68 & 5.4 & 5.9 & 0.6 & 0.06 & 7.7 & 8.8 & 0.9 &  0.10 & .8 x .3 & 2.5 x 1.0 & 1.5 &  G$_{3cm}$  & 0.9 \\ 
69 & 0.9  & $>$2.0  &  & 0.26  & 0.5  &  $>$2.0  &  & 0.15 &  &    4.9 x 1.7  &  &   &   \\ 
70 & 4.0 &  13.0 &  1.3 & 0.11 & 1.9 & 11.5 & 1.2 & 0.06 & 4.3 x 5.3 &  4.6  x  1.7 & 4.8 & C &  8.5 \\
71 & 20.2 & 34.0 & 3.5 & 0.50  & 10.0  & 36.0 & 3.6 & 0.55 & 4.6 x 1.6  &  5.4 x 1.9  &  2.7 & G &  4.5  \\ 
73 &11.7 & 13.7 & 1.4 & 0.09 & 9.4 & 13.0 & 1.3 &  0.11 & 1.3 x .7  & 2.6 x 1.0 & 0.95 & G$_{3cm}$ & 1.6 \\  
74 & 12.7 & 22.7 & 2.3 & 0.28  & 6.1   & 22.2 & 2.2 & 0.25 &  4.5 x 2.2  &  3.3 x 1.0  & 3.1 & G$_{3cm}$ &  4.9  \\ 
75 & 16.8 & 22.5 & 2.3 & 0.53  & 11.0  & 19.0 & 2.0 & 0.55 & 3.0 x 0.9  &  5.0 x 1.6  & 1.6  & G & 2.7 \\ 
76 & 5.4 &  7.4 &  0.7 & 0.07 & 2.5 & 6.7 & 0.7 & 0.08 & 3.9 x 1.8  & 2.4 x 1.0 & 2.6 & G$_{3cm}$ & 4.7 \\ 
77 & 39.4 & 49.0 & 5.0 & 0.85  & 34.0  & 51.2 & 5.1 & 0.98 & PS &  3.1 x 1.1 & $<$1.5  & G$_{3cm}$  &  \\ 
78 & 1.5  & 12.3 & 1.2 & 0.18  & 0.9   & 9.0  & 2.3 & 0.15 & 12.0 x 9.0   &  5.1 x 1.6 & 10.4 & C & 14.6 \\ 
79 & 4.1  & 4.1  & 0.4 & 0.14  & 6.7   & 7.0  & 0.7 & 0.23 &  PS & 2.7 x 1.2  & $<$1.5  & G$_{3cm}$ &  \\ 
81 & 17.8 & 20.8 & 2.0 & 0.25   & 14.1  & 20.8 & 2.1 & 0.29 & 1.8 x 0.7    & 5.1 x 2.0 & 1.3  &  G  & 2.2 \\ 
83 & 1.7  & 5.0:  & 2.5 & 0.40  & 0.6   & $>$0.6  &  & 0.16 & 5.3: x 5.7:   &  4.5 x 1.8 & $>$5.5: &  C & $>$6.3 \\ 
85 & 0.6 &  4.4 & 1.2 & 0.09 &  &  &  & & 13.1: x 13.1: & 4.2 x 1.9 & 13.1: & C & 17.5: \\ 
86 & 1.7  & 8.5  & 0.9 & 0.17  & 0.9   & $>$2.5 &  & 0.17 &  7.5 x 7.7  &  4.7 x 1.8 & 7.6 & C  & 11.4 \\ 
89 & 1.8  & 8.5  & 0.9 & 0.27   & 0.8   & $>$2.0  &  & 0.19 & 9.5 x 5.5    &  4.8 x 1.7 & 7.2 & C & 8.6  \\
90 & 0.51& 1.0 & 0.2 & 0.07 &  & & & 0.13 & 4.5  x  2.5 &  4.4  x  1.9 & 3.4 & G & 5.5 \\
93 & 0.8  & 6.3  & 0.9 & 0.15   & 0.6   & $>$2.1  &  & 0.13 & 20.2 x 8.0   &  4.8 x 2.0 & 12.7: & C & 17.8: \\ 
95 & 1.1  & 5.5  & 1.0 & 0.25   & 0.7   & 4.5:  & 1.5 & 0.18 & 14.6  x 7.5   &   4.8 x 1.8  &  10.5 & C & 12.6 \\ 
97 & 2.7  & 11.5 & 1.2 & 0.16   & 1.2   & 11.8 & 1.2 & 0.18 & 8.0 x 5.9  &  5.2 x 1.9 & 6.8 & C & 11.4 \\ 
98 & 21.0 & 21.8 & 2.2 & 0.38   & 20.3  & 24.0 & 2.4 & 0.46 & PS &  2.9 x 1.1 & $<$1.5 & G$_{3cm}$ &  \\ 
\hline
\end{tabular}
\end{table*}
\end{document}
