Table 2. New measured global HI parameters

Galaxy Name rms Fmax W20 W50 VHI σ(V ) SHI σ(S) S/N Notes mJy mJy km s�^1 km s�^1 km s�^1 km s�^1 Jy�km s�^1 Jy�km s�^1 (1) (2) (3) (4) (5) (6) (7) (8) (9) (10) (11)

UGC568 1.15 12.3 410: 300: 13420 10 2.28 0.28 10.7 peculiar UGC1752* 2.84 26.6 429 388 17861 7 5.13 0.70 9.4 PGC135657 2.71 23.8 134 100 13108 7 2.17 0.46 8.8 blended? UGC2936* 2.32 38.6 502 469 3811 4 11.23 0.72 16.7 UGC3140* 4.01 130.8 131 150 4623 2 13.41 0.74 32.6 NGC2770* 4.84 143.6 350 322 1947 2 36.93 1.41 29.6 PGC135754 1.65 5.5 222 197 21769 15 0.59 0.30 3.4 F568-6* 2.29 17.5 420 393 13829 7 4.20 0.64 7.6 UGC6614* 2.86 81.2 290 255 6351 2 15.94 0.72 28.4 Malin-1* 2.02 9.4 341 293 24784 15 1.80 0.50 4.7 PGC45080 2.90 11.5 315 280 12339 15 1.57 0.61 4.0 UGC9024* 2.69 115.7 134 120 2321 1 11.41 0.48 42.9 F530-1 3.0 10.7 497 484 14335 10 2.07 0.75 3.6 F533-3* 2.72 13.3 399 384 12670 8 2.46 0.66 4.9 NGC7589 1.68 10.4 414: 357: 8866 12 2.96 0.51 6.2 blended PGC71626* 3.40 47.0 126 88 10016 5 3.94 0.56 13.8

Table 4. Derived HI Parameters

Galaxy Name W20,c W50,c VLSR D logMHI MHI /LB DHI km s�^1 km s�^1 km s�^1 Mpc 0 (1) (2) (3) (4) (5) (6) (7) (8)

UGC568 385 286 13579 181.0 10.25 0.30 UGC1752* 398 364 18072 241.0 10.85 1.29 2.0 PGC135657 121 94 13204 176.0 10.20 0.47 UGC2936* 488 461 3860 51.5 9.85 1.00 3.3 UGC3140* 143 118 4633 61.8 10.08 0.45 3.0 NGC2770* 343 319 1936 25.8 9.76 0.85 4.1 PGC135754 200 182 21588 287.8 10.06 0.27 F568-6* 394 374 13738 183.2 10.52 0.41 1.3: UGC6614* 277 248 6245 83.3 10.42 1.44 6.0 Malin-1* 308 269 24679 329.0 10.66 0.17 2.5 PGC45080 296 267 12185 162.5 9.99 1.72 UGC9024* 126 117 2296 30.6 9.40 0.92 2.7 F530-1 467 460 14596 194.6 10.27 1.07 F533-3* 375 367 12941 172.5 10.24 0.75 2.5: NGC7589 395 345 9056 120.7 10.01 0.55 PGC71626* 115 83 10193 135.9 10.23 0.34 2.6