\documentstyle{l-aa}
\begin{document}
\begin{table*}
\caption[]{Photometric data on the sample galaxies}
\begin{tabular}{@{}lccccccccccccccc@{}}
\hline\noalign {\smallskip}
 id&$\alpha$&$\delta$&~&$r_e(")$&$U_{AB}$&$B_{AB}$&$V_{AB}$&$I_{AB}$&$J_{corr}$&$H_{corr}$&$K_{corr}$&$z$& $A_V$ & $M_{tot}$ & SFR\\
\hline                     \noalign {\smallskip}
~&$s$&$'$&$''$&~&~&~&~&~&~&~&~&~&~&~&\\
\hline\noalign {\smallskip}
 0 & 56.65 & 12 & 45.60 & 1.21 & 24.91 & 22.49 & 21.09 & 20.05 & 18.26 & 17.48 & 16.79 & 0.517 & 0.17 & 2.97 & 6.61\\
 1 & 51.08 & 13 & 20.73 & 1.12 & 21.69 & 20.52 & 19.95 & 19.63 & 18.40 & 17.87 & 17.30 & 0.199 & 1.03 & 0.26 & 10.73\\
 2 & 46.15 & 11 & 42.05 & 0.34 & 23.40 & 22.90 & 22.40 & 20.80 & 19.17 & 18.38 & 17.37 & 1.012 & 2.25 & 18.19 & 536.4\\
 3 & 53.90 & 12 & 54.05 & 0.60 & 23.74 & 22.80 & 21.89 & 20.88 & 19.12 & 18.30 & 17.47 & 0.642 & 1.16 & 2.44 & 34.28\\
 4 & 43.96 & 12 & 50.13 & 0.31 & 23.90 & 22.87 & 21.83 & 21.01 & 19.27 & 18.46 & 17.59 & (0.55) & 1.74 & 2.43 & 33.01\\
 5 & 44.58 & 13 & 4.66 & 0.54 & 25.24 & 23.63 & 22.23 & 21.24 & 19.29 & 18.40 & 17.67 & (0.68) & 1.15 & 2.31 & 27.18\\
 6 & 51.78 & 13 & 53.73 & 0.49 & 23.92 & 22.97 & 21.97 & 21.09 & 19.42 & 18.51 & 17.70 & 0.557 & 1.56 & 1.99 & 27.12\\
 7 & 42.91 & 12 & 16.26 & 0.52 & 22.86 & 22.22 & 21.32 & 20.74 & 19.20 & 18.53 & 17.90 & 0.454 & 0.28 & 0.56 & 7.58\\
 8 & 49.75 & 13 & 13.09 & 0.63 & 24.99 & 23.54 & 22.29 & 21.49 & 19.07 & 18.56 & 18.00 & 0.478 & 1.34 & 1.07 & 11.17\\
 9 & 50.25 & 12 & 39.72 & 0.49 & 22.59 & 22.08 & 21.25 & 20.69 & 19.3 & 18.67 & 18.00 & 0.474 & 0.37 & 0.39 & 10.73\\
 10 & 41.95 & 12 & 5.41 & 0.47 & 23.34 & 22.60 & 21.67 & 21.03 & 19.42 & 18.78 & 18.04 & 0.432 & 0.34 & 0.40 & 4.88\\
 11 & 45.85 & 13 & 25.81 & 0.85 & 23.23 & 22.30 & 21.45 & 20.95 & 19.45 & 18.86 & 18.13 & (0.4) & 0.48 & 0.38 & 6.92\\
 12 & 43.18 & 11 & 48.05 & 0.47 & 26.05 & 24.95 & 23.91 & 22.45 & 20.14 & 19.29 & 18.23 & (1.06) & 0.89 & 3.47 & 26.09\\
 13 & 51.72 & 12 & 20.18 & 0.34 & 24.85 & 23.34 & 22.24 & 21.55 & 19.87 & 19.12 & 18.31 & 0.299 & 0.95 & 0.17 & 1.57\\
 14 & 42.72 & 13 & 7.26 & 0.33 & 25.61 & 24.58 & 23.22 & 22.19 & 20.00 & 19.21 & 18.32 & (0.737) & 1.73 & 2.83 & 32.42\\
 15 & 47.04 & 12 & 34.96 & 0.40 & 22.84 & 22.19 & 21.46 & 21.03 & 19.66 & 19.05 & 18.34 & 0.321 & 1.00 & 0.22 & 7.45\\
 16 & 49.51 & 14 & 6.77 & 0.34 & 24.17 & 23.58 & 22.82 & 21.83 & 20.17 & 19.23 & 18.41 & 0.752 & 2.07 & 2.93 & 67.43\\
 17 & 49.51 & 12 & 20.11 & 0.61 & 25.58 & 25.16 & 24.04 & 22.46 & 20.34 & 19.40 & 18.53 & 0.961 & 1.03 & 2.55 & 22.83\\
 18 & 41.42 & 11 & 42.89 & 0.33 & 26.18 & 25.13 & 24.81 & 24.16 & 20.69 & 19.66 & 18.60 & 1.320 & 1.03 & 1.58 & 16.88\\
 19 & 58.76 & 12 & 52.35 & 0.85 & 23.18 & 22.52 & 21.72 & 21.31 & 19.92 & 19.34 & 18.77 & 0.320 & 0.38 & 0.08 & 2.72\\
 20 & 55.58 & 12 & 45.43 & 0.47 & 24.18 & 23.63 & 22.97 & 21.97 & 20.35 & 19.65 & 18.86 & 0.790 & 0.70 & 0.92 & 17.98\\
 21 & 50.47 & 13 & 16.16 & 0.64 & 25.46 & 24.62 & 23.74 & 22.60 & 20.68 & 19.95 & 18.90 & (0.88) & 1.65 & 1.05 & 14.25\\
 22 & 57.33 & 12 & 59.63 & 0.44 & 22.83 & 22.53 & 21.82 & 21.38 & 20.10 & 19.42 & 18.93 & 0.473 & 0.47 & 0.15 & 8.25\\
 23 & 41.31 & 11 & 40.87 & 0.33 & 27.02 & 24.70 & 23.61 & 22.47 & 20.57 & 19.73 & 19.01 & 0.585 & 0.67 & 0.51 & 2.75\\
 24 & 38.44 & 12 & 31.35 & 0.59 & 26.76 & 25.15 & 23.74 & 22.67 &
 20.85 & 20.03 & 19.17 & (0.7) & 1.06 & 0.49 & 6.90\\
 25 & 49.24 & 11 & 48.38 & 0.32 & 25.46 & 24.93 & 24.16 & 22.96 & 20.67 & 19.98 & 19.18 & 0.961 & 0.23 & 1.03 & 7.75\\
 26 & 48.62 & 12 & 15.81 & 0.47 & 26.70 & 26.20 & 25.20 & 23.60 & 21.23 & 20.23 & 19.21 & (1.35) & 0.96 & 2.95 & 14.55\\
 27 & 49.45 & 13 & 16.58 & 0.28 & 25.41 & 24.44 & 24.02 & 23.27 & 21.18 & 20.22 & 19.22 & (1.006) & 1.74 & 2.55 & 40.67\\
 28 & 48.12 & 12 & 14.90 & 0.88 & 24.26 & 23.83 & 23.54 & 22.64 & 20.53 & 20.02 & 19.36 & 0.961 & 0.27 & 0.90 & 11.62\\
 29 & 54.10 & 13 & 54.35 & 0.45 & 24.35 & 23.84 & 23.37 & 22.43 & 21.01 & 20.17 & 19.41 & 0.894 & 1.68 & 1.37 & 46.13\\
 30 & 52.70 & 13 & 55.49 & 0.27 & 23.96 & 23.22 & 23.06 & 22.71 & 20.64 & 20.08 & 19.41 & 1.355 & 0.54 & 0.67 & 44.33\\
 31 & 38.99 & 12 & 19.63 & 0.45 & 24.14 & 23.67 & 22.95 & 22.22 & 20.81 & 20.17 & 19.57 & (0.77) & 1.51 & 1.07 & 53.23\\
 32 & 44.19 & 12 & 47.90 & 0.39 & 22.99 & 22.65 & 22.13 & 21.65 & 20.50 & 19.91 & 19.58 &.558 & 0.50 & 0.27 & 11.04\\
 33 & 49.01 & 12 & 20.86 & 0.18 & 23.87 & 23.54 & 23.23 & 22.44 & 20.89 & 20.53 & 19.68 & 0.953 & 0.47 & 0.34 & 18.31\\
 34 & 39.56 & 12 & 13.83 & 0.44 & 28.20 & 26.49 & 25.15 & 23.79 & 21.62 & 20.53 & 19.69 & (1.22) & 2.07 & 3.48 & 62.76\\
 35 & 48.27 & 13 & 13.8 & 0.29 & 26.53 & 25.90 & 25.30 & 24.07 & 21.51 & 20.36 & 19.75 & (1.165) & 0.57 & 1.15 & 9.37\\
 36 & 53.45 & 12 & 34.52 & 0.34 & 24.97 & 24.25 & 23.50 & 22.81 & 21.47 & 20.83 & 19.80 & 0.559 & 2.08 & 0.41 & 15.00\\
 37 & 55.53 & 13 & 53.48 & 0.70 & 24.04 & 23.49 & 23.23 & 22.65 & 21.27 & 20.48 & 19.80 & 1.148 & 1.70 & 2.19 & 108.8\\
 38 & 49.58 & 14 & 14.63 & 0.48 & 25.40 & 24.00 & 23.80 & 22.70 & 21.37 & 20.75 & 19.94 & (0.92) & 0.82 & 0.30 & 22.39\\
 39 & 57.67 & 13 & 15.32 & 0.39 & 24.43 & 23.94 & 23.57 & 22.82 & 21.29 & 20.71 & 19.97 & 0.952 & 0.46 & 0.31 & 14.37\\
 40 & 55.50 & 14 & 2.71 & 0.55 & 26.06 & 24.87 & 23.87 & 22.99 & 21.48 & 20.75 & 20.01 & 0.559 & 1.07 & 0.16 & 3.66\\
 41 & 48.79 & 13 & 18.35 & 0.68 & 24.27 & 23.93 & 23.50 & 22.76 & 21.32 & 20.27 & 19.66 & 0.749 & 1.85 & 0.30 & 25.12\\
 42 & 47.19 & 14 & 14.18 & 0.22 & 26.70 & 25.74 & 24.59 & 23.53 & 21.84 & 20.63 & 20.02 & 0.609 & 1.83 & 0.40 & 5.10\\
 43 & 57.21 & 12 & 25.83 & 0.51 & 24.17 & 24.02 & 23.91 & 22.45 & 21.34 & 20.60 & 20.05 & 0.561 & 0.32 & 0.11 & 2.21\\
 44 & 48.34 & 14 & 16.63 & 0.16 & 25.86 & 23.97 & 23.73 & 23.43 & 21.64 & 20.53 & 20.11 & 2.008 & 0.33 & 1.69 & 51.3\\
 45 & 47.78 & 12 & 32.93 & 0.28 & 25.21 & 24.73 & 24.27 & 23.34 & 21.47 & 21.12 & 20.12 & (1.04) & 0.98 & 0.64 & 22.47\\
 46 & 52.87 & 14 & 5.11 & 0.29 & 25.70 & 24.84 & 24.06 & 23.25 & 21.38 & 20.89 & 20.21 & 0.498 & 0.16 & 0.08 & 0.57\\
 47 & 52.02 & 14 & 0.91 & 0.33 & 25.25 & 24.55 & 23.72 & 23.02 & 21.48 & 20.74 & 20.22 & 0.557 & 0.23 & 0.08 & 1.26\\
 48 & 48.58 & 13 & 28.35 & 0.47 & 25.33 & 24.30 & 23.95 & 23.00 & 21.22 & 21.08 & 20.24 & 0.958 & 0.68 & 0.27 & 14.77\\
 49 & 44.64 & 12 & 27.39 & 0.24 & 25.79 & 24.28 & 24.11 & 23.73 & 21.63 & 20.89 & 20.29 & (1.58) & 0.18 & 0.49 & 14.84\\
 50 & 44.45 & 11 & 41.82 & 0.62 & 24.43 & 24.46 & 24.52 & 23.88 & 21.05 & 21.25 & 20.42 & 1.020 & 0.17 & 0.37 & 4.02\\
 51 & 56.13 & 13 & 29.74 & 0.39 & 24.38 & 24.13 & 23.97 & 23.34 & 21.38 & 21.30 & 20.45 & (1.2) & 0.80 & 0.72 & 32.59\\
 41 & 48.79 & 13 & 18.35 & 0.68 & 24.27 & 23.93 & 23.50 & 22.76 & 21.32 & 20.27 & 19.66 & 0.749 & 1.85 & 0.30 & 25.12\\
 42 & 47.19 & 14 & 14.18 & 0.22 & 26.70 & 25.74 & 24.59 & 23.53 & 21.84 & 20.63 & 20.02 & 0.609 & 1.83 & 0.40 & 5.10\\
 43 & 57.21 & 12 & 25.83 & 0.51 & 24.17 & 24.02 & 23.91 & 22.45 & 21.34 & 20.60 & 20.05 & 0.561 & 0.32 & 0.11 & 2.21\\
 44 & 48.34 & 14 & 16.63 & 0.16 & 25.86 & 23.97 & 23.73 & 23.43 & 21.64 & 20.53 & 20.11 & 2.008 & 0.33 & 1.69 & 51.3\\
 45 & 47.78 & 12 & 32.93 & 0.28 & 25.21 & 24.73 & 24.27 & 23.34 & 21.47 & 21.12 & 20.12 & (1.04) & 0.98 & 0.64 & 22.47\\
 46 & 52.87 & 14 & 5.11 & 0.29 & 25.70 & 24.84 & 24.06 & 23.25 & 21.38 & 20.89 & 20.21 & 0.498 & 0.16 & 0.08 & 0.57\\
 47 & 52.02 & 14 & 0.91 & 0.33 & 25.25 & 24.55 & 23.72 & 23.02 & 21.48 & 20.74 & 20.22 & 0.557 & 0.23 & 0.08 & 1.26\\
 48 & 48.58 & 13 & 28.35 & 0.47 & 25.33 & 24.30 & 23.95 & 23.00 & 21.22 & 21.08 & 20.24 & 0.958 & 0.68 & 0.27 & 14.77\\
 49 & 44.64 & 12 & 27.39 & 0.24 & 25.79 & 24.28 & 24.11 & 23.73 & 21.63 & 20.89 & 20.29 & (1.58) & 0.18 & 0.49 & 14.84\\
 50 & 44.45 & 11 & 41.82 & 0.62 & 24.43 & 24.46 & 24.52 & 23.88 & 21.05 & 21.25 & 20.42 & 1.020 & 0.17 & 0.37 & 4.02\\
 51 & 56.13 & 13 & 29.74 & 0.39 & 24.38 & 24.13 & 23.97 & 23.34 & 21.38 & 21.30 & 20.45 & (1.2) & 0.80 & 0.72 & 32.59\\
\hline
\end{tabular}
\end{table*}


\end{document}

