This article was processed by the author using Springer-Verlag

LATEX A&A style file L-AA version 3.

Table 1. Photometric data on the sample galaxies id α δ re(”) UAB BAB VAB IAB Jcorr Hcorr Kcorr z AV Mtot SFR s^{0 00} 0 56.65 12 45.60 1.21 24.91 22.49 21.09 20.05 18.26 17.48 16.79 0.517 0.17 2.97 6.61 1 51.08 13 20.73 1.12 21.69 20.52 19.95 19.63 18.40 17.87 17.30 0.199 1.03 0.26 10.73 2 46.15 11 42.05 0.34 23.40 22.90 22.40 20.80 19.17 18.38 17.37 1.012 2.25 18.19 536.4 3 53.90 12 54.05 0.60 23.74 22.80 21.89 20.88 19.12 18.30 17.47 0.642 1.16 2.44 34.28 4 43.96 12 50.13 0.31 23.90 22.87 21.83 21.01 19.27 18.46 17.59 (0.55) 1.74 2.43 33.01 5 44.58 13 4.66 0.54 25.24 23.63 22.23 21.24 19.29 18.40 17.67 (0.68) 1.15 2.31 27.18 6 51.78 13 53.73 0.49 23.92 22.97 21.97 21.09 19.42 18.51 17.70 0.557 1.56 1.99 27.12 7 42.91 12 16.26 0.52 22.86 22.22 21.32 20.74 19.20 18.53 17.90 0.454 0.28 0.56 7.58 8 49.75 13 13.09 0.63 24.99 23.54 22.29 21.49 19.07 18.56 18.00 0.478 1.34 1.07 11.17 9 50.25 12 39.72 0.49 22.59 22.08 21.25 20.69 19.3 18.67 18.00 0.474 0.37 0.39 10.73 10 41.95 12 5.41 0.47 23.34 22.60 21.67 21.03 19.42 18.78 18.04 0.432 0.34 0.40 4.88 11 45.85 13 25.81 0.85 23.23 22.30 21.45 20.95 19.45 18.86 18.13 (0.4) 0.48 0.38 6.92 12 43.18 11 48.05 0.47 26.05 24.95 23.91 22.45 20.14 19.29 18.23 (1.06) 0.89 3.47 26.09 13 51.72 12 20.18 0.34 24.85 23.34 22.24 21.55 19.87 19.12 18.31 0.299 0.95 0.17 1.57 14 42.72 13 7.26 0.33 25.61 24.58 23.22 22.19 20.00 19.21 18.32 (0.737) 1.73 2.83 32.42 15 47.04 12 34.96 0.40 22.84 22.19 21.46 21.03 19.66 19.05 18.34 0.321 1.00 0.22 7.45 16 49.51 14 6.77 0.34 24.17 23.58 22.82 21.83 20.17 19.23 18.41 0.752 2.07 2.93 67.43 17 49.51 12 20.11 0.61 25.58 25.16 24.04 22.46 20.34 19.40 18.53 0.961 1.03 2.55 22.83 18 41.42 11 42.89 0.33 26.18 25.13 24.81 24.16 20.69 19.66 18.60 1.320 1.03 1.58 16.88 19 58.76 12 52.35 0.85 23.18 22.52 21.72 21.31 19.92 19.34 18.77 0.320 0.38 0.08 2.72 20 55.58 12 45.43 0.47 24.18 23.63 22.97 21.97 20.35 19.65 18.86 0.790 0.70 0.92 17.98 21 50.47 13 16.16 0.64 25.46 24.62 23.74 22.60 20.68 19.95 18.90 (0.88) 1.65 1.05 14.25 22 57.33 12 59.63 0.44 22.83 22.53 21.82 21.38 20.10 19.42 18.93 0.473 0.47 0.15 8.25 23 41.31 11 40.87 0.33 27.02 24.70 23.61 22.47 20.57 19.73 19.01 0.585 0.67 0.51 2.75 24 38.44 12 31.35 0.59 26.76 25.15 23.74 22.67 20.85 20.03 19.17 (0.7) 1.06 0.49 6.90 25 49.24 11 48.38 0.32 25.46 24.93 24.16 22.96 20.67 19.98 19.18 0.961 0.23 1.03 7.75 26 48.62 12 15.81 0.47 26.70 26.20 25.20 23.60 21.23 20.23 19.21 (1.35) 0.96 2.95 14.55 27 49.45 13 16.58 0.28 25.41 24.44 24.02 23.27 21.18 20.22 19.22 (1.006) 1.74 2.55 40.67 28 48.12 12 14.90 0.88 24.26 23.83 23.54 22.64 20.53 20.02 19.36 0.961 0.27 0.90 11.62 29 54.10 13 54.35 0.45 24.35 23.84 23.37 22.43 21.01 20.17 19.41 0.894 1.68 1.37 46.13 30 52.70 13 55.49 0.27 23.96 23.22 23.06 22.71 20.64 20.08 19.41 1.355 0.54 0.67 44.33 31 38.99 12 19.63 0.45 24.14 23.67 22.95 22.22 20.81 20.17 19.57 (0.77) 1.51 1.07 53.23 32 44.19 12 47.90 0.39 22.99 22.65 22.13 21.65 20.50 19.91 19.58 .558 0.50 0.27 11.04 33 49.01 12 20.86 0.18 23.87 23.54 23.23 22.44 20.89 20.53 19.68 0.953 0.47 0.34 18.31 34 39.56 12 13.83 0.44 28.20 26.49 25.15 23.79 21.62 20.53 19.69 (1.22) 2.07 3.48 62.76 35 48.27 13 13.8 0.29 26.53 25.90 25.30 24.07 21.51 20.36 19.75 (1.165) 0.57 1.15 9.37 36 53.45 12 34.52 0.34 24.97 24.25 23.50 22.81 21.47 20.83 19.80 0.559 2.08 0.41 15.00 37 55.53 13 53.48 0.70 24.04 23.49 23.23 22.65 21.27 20.48 19.80 1.148 1.70 2.19 108.8 38 49.58 14 14.63 0.48 25.40 24.00 23.80 22.70 21.37 20.75 19.94 (0.92) 0.82 0.30 22.39 39 57.67 13 15.32 0.39 24.43 23.94 23.57 22.82 21.29 20.71 19.97 0.952 0.46 0.31 14.37 40 55.50 14 2.71 0.55 26.06 24.87 23.87 22.99 21.48 20.75 20.01 0.559 1.07 0.16 3.66 41 48.79 13 18.35 0.68 24.27 23.93 23.50 22.76 21.32 20.27 19.66 0.749 1.85 0.30 25.12 42 47.19 14 14.18 0.22 26.70 25.74 24.59 23.53 21.84 20.63 20.02 0.609 1.83 0.40 5.10 43 57.21 12 25.83 0.51 24.17 24.02 23.91 22.45 21.34 20.60 20.05 0.561 0.32 0.11 2.21 44 48.34 14 16.63 0.16 25.86 23.97 23.73 23.43 21.64 20.53 20.11 2.008 0.33 1.69 51.3 45 47.78 12 32.93 0.28 25.21 24.73 24.27 23.34 21.47 21.12 20.12 (1.04) 0.98 0.64 22.47 46 52.87 14 5.11 0.29 25.70 24.84 24.06 23.25 21.38 20.89 20.21 0.498 0.16 0.08 0.57 47 52.02 14 0.91 0.33 25.25 24.55 23.72 23.02 21.48 20.74 20.22 0.557 0.23 0.08 1.26 48 48.58 13 28.35 0.47 25.33 24.30 23.95 23.00 21.22 21.08 20.24 0.958 0.68 0.27 14.77 49 44.64 12 27.39 0.24 25.79 24.28 24.11 23.73 21.63 20.89 20.29 (1.58) 0.18 0.49 14.84 50 44.45 11 41.82 0.62 24.43 24.46 24.52 23.88 21.05 21.25 20.42 1.020 0.17 0.37 4.02 51 56.13 13 29.74 0.39 24.38 24.13 23.97 23.34 21.38 21.30 20.45 (1.2) 0.80 0.72 32.59 41 48.79 13 18.35 0.68 24.27 23.93 23.50 22.76 21.32 20.27 19.66 0.749 1.85 0.30 25.12 42 47.19 14 14.18 0.22 26.70 25.74 24.59 23.53 21.84 20.63 20.02 0.609 1.83 0.40 5.10 43 57.21 12 25.83 0.51 24.17 24.02 23.91 22.45 21.34 20.60 20.05 0.561 0.32 0.11 2.21 44 48.34 14 16.63 0.16 25.86 23.97 23.73 23.43 21.64 20.53 20.11 2.008 0.33 1.69 51.3 45 47.78 12 32.93 0.28 25.21 24.73 24.27 23.34 21.47 21.12 20.12 (1.04) 0.98 0.64 22.47 46 52.87 14 5.11 0.29 25.70 24.84 24.06 23.25 21.38 20.89 20.21 0.498 0.16 0.08 0.57 47 52.02 14 0.91 0.33 25.25 24.55 23.72 23.02 21.48 20.74 20.22 0.557 0.23 0.08 1.26 48 48.58 13 28.35 0.47 25.33 24.30 23.95 23.00 21.22 21.08 20.24 0.958 0.68 0.27 14.77 49 44.64 12 27.39 0.24 25.79 24.28 24.11 23.73 21.63 20.89 20.29 (1.58) 0.18 0.49 14.84 50 44.45 11 41.82 0.62 24.43 24.46 24.52 23.88 21.05 21.25 20.42 1.020 0.17 0.37 4.02 51 56.13 13 29.74 0.39 24.38 24.13 23.97 23.34 21.38 21.30 20.45 (1.2) 0.80 0.72 32.59