%\documentstyle[times,psfonts,psfig,referee]{l-aa}
\documentstyle{l-aa}
%
\begin{document}
%
\begin{table*}
\caption{Integrated emission-line intensities of the intercalibrated
         spectra. The flux was measured in a range corresponding [-5000,+5000]
         km~s$^{-1}$ in velocity space. The flux is given in units of 
         10$^{-13}$ erg s$^{-1}$ cm$^{-2}$. The Julian date (JD) is given as
         JD - 2447000.}
\begin{tabular}{lccccc|lccccc}
\hline
\hspace*{-3.0mm}&\hspace*{-2.5mm} H$\alpha $6563 \hspace*{-2.5mm}
 &\hspace*{-2.5mm} H$\beta $4861 \hspace*{-2.5mm}&\hspace*{-2.5mm} 
 H$\gamma $4340 \hspace*{-2.5mm}&\hspace*{-2.5mm} HeI$\lambda $5876
 \hspace*{-2.5mm}&\hspace*{-2.5mm} HeII$\lambda $4686 \hspace*{-2.5mm}&
 &\hspace*{-2.5mm} H$\alpha $6563 \hspace*{-2.5mm}&\hspace*{-2.5mm} 
 H$\beta $4861 \hspace*{-2.5mm}&\hspace*{-2.5mm} H$\gamma $4340 
 \hspace*{-2.5mm}&\hspace*{-2.5mm} HeI$\lambda $5876\hspace*{-2.5mm}&
 \hspace*{-2.5mm} HeII$\lambda $4686 \hspace*{-2.5mm}\\
\hline
epo. \hspace*{-3.0mm}&66 \hspace*{-2.5mm}&69 \hspace*{-2.5mm}&29 
 \hspace*{-2.5mm}&41 \hspace*{-2.5mm}&29 \hspace*{-2.5mm}& \hspace*{-2.5mm}& 
 \hspace*{-2.5mm}& \hspace*{-2.5mm}& \hspace*{-2.5mm}&   \\
\hline
JD \hspace*{-2.5mm}& \hspace*{-2.5mm}& \hspace*{-2.5mm}& \hspace*{-2.5mm}&
 \hspace*{-2.5mm}& \hspace*{-2.5mm}&JD \hspace*{-2.5mm}& \hspace*{-2.5mm}& 
 \hspace*{-2.5mm}& \hspace*{-2.5mm}&\hspace*{-2.5mm}&             \\
\hline
509 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&8.04$\pm$0.07 \hspace*{-2.5mm}&
 3.98$\pm$0.06 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.68$\pm$0.13
 \hspace*{-2.5mm}&655 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.16$\pm$0.07 \hspace*{-2.5mm}& --- \\
512 \hspace*{-3.0mm}&29.91$\pm$0.21 \hspace*{-2.5mm}&8.20$\pm$0.09
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&656 \hspace*{-2.5mm}&33.87$\pm$0.32 \hspace*{-2.5mm}&
 9.45$\pm$0.16 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.10$\pm$0.05
 \hspace*{-2.5mm}& --- \\
517 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&8.28$\pm$0.06 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 657
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&9.42$\pm$0.18 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
524 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&8.37$\pm$0.09 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}&1.91$\pm$0.03 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&658
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&9.35$\pm$0.17 \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
528 \hspace*{-3.0mm}&30.61$\pm$0.26 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&660
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&9.33$\pm$0.15 \hspace*{-2.5mm}&
 4.47$\pm$0.16 \hspace*{-2.5mm}&2.08$\pm$0.05 \hspace*{-2.5mm}&3.74$\pm$0.25\\
530 \hspace*{-3.0mm}&30.19$\pm$0.25 \hspace*{-2.5mm}&8.59$\pm$0.08
 \hspace*{-2.5mm}&4.30$\pm$0.06 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 2.76$\pm$0.09 \hspace*{-2.5mm}&663 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}&4.42$\pm$0.10 \hspace*{-2.5mm}&2.06$\pm$0.06
 \hspace*{-2.5mm}&3.04$\pm$0.13\\
532 \hspace*{-3.0mm}&30.33$\pm$0.21 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&664
 \hspace*{-2.5mm}&33.78$\pm$0.35 \hspace*{-2.5mm}&9.50$\pm$0.17
 \hspace*{-2.5mm}&4.38$\pm$0.10 \hspace*{-2.5mm}&2.03$\pm$0.04 \hspace*{-2.5mm}
 &2.94$\pm$0.18\\
533 \hspace*{-3.0mm}&30.91$\pm$0.27 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&665 
 \hspace*{-2.5mm}&33.54$\pm$0.33 \hspace*{-2.5mm}&9.53$\pm$0.17
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
534 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&8.47$\pm$0.12 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&666
 \hspace*{-2.5mm}&33.24$\pm$0.19 \hspace*{-2.5mm}&9.36$\pm$0.16
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
535 \hspace*{-3.0mm}&30.81$\pm$0.20 \hspace*{-2.5mm}&8.23$\pm$0.10
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&668 \hspace*{-2.5mm}&33.14$\pm$0.21 \hspace*{-2.5mm}&
 9.30$\pm$0.16 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \\
539 \hspace*{-3.0mm}&31.86$\pm$0.34 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}&2.02$\pm$0.06 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 673 \hspace*{-2.5mm}&32.71$\pm$0.24 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& ---  \\
543 \hspace*{-3.0mm}&32.40$\pm$0.33 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&674
 \hspace*{-2.5mm}&31.66$\pm$0.18 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
546 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& ---        
 \hspace*{-2.5mm}&2.00$\pm$0.04 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&675
 \hspace*{-2.5mm}&31.38$\pm$0.26 \hspace*{-2.5mm}&8.97$\pm$0.16
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
549 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&9.14$\pm$0.18 \hspace*{-2.5mm}&
 4.39$\pm$0.12 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&3.22$\pm$0.17
 \hspace*{-2.5mm}& 676 \hspace*{-2.5mm}&31.19$\pm$0.16 \hspace*{-2.5mm}&
 8.83$\pm$0.16 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \\
556 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&9.13$\pm$0.17 \hspace*{-2.5mm}&
 4.33$\pm$0.13 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.88$\pm$0.08
 \hspace*{-2.5mm}&678 \hspace*{-2.5mm}&31.36$\pm$0.17 \hspace*{-2.5mm}&
 8.75$\pm$0.16 \hspace*{-2.5mm}&4.17$\pm$0.11 \hspace*{-2.5mm}&2.08$\pm$0.05
 \hspace*{-2.5mm}&2.85$\pm$0.15\\
560 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&9.17$\pm$0.12 \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&679
 \hspace*{-2.5mm}&31.29$\pm$0.16 \hspace*{-2.5mm}&8.58$\pm$0.24
 \hspace*{-2.5mm}&4.16$\pm$0.11 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 2.71$\pm$0.13\\
564 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&9.10$\pm$0.18 \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&680
 \hspace*{-2.5mm}&31.16$\pm$0.20 \hspace*{-2.5mm}&8.90$\pm$0.19
 \hspace*{-2.5mm}&4.20$\pm$0.09 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 2.72$\pm$0.38\\
570 \hspace*{-3.0mm}&31.79$\pm$0.15 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&681
 \hspace*{-2.5mm}&31.34$\pm$0.23 \hspace*{-2.5mm}&8.90$\pm$0.19
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
571 \hspace*{-3.0mm}&31.71$\pm$0.22 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&682
 \hspace*{-2.5mm}&30.93$\pm$0.21 \hspace*{-2.5mm}&8.79$\pm$0.19
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
572 \hspace*{-3.0mm}&31.01$\pm$0.26 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&683
 \hspace*{-2.5mm}&30.79$\pm$0.13 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&2.06$\pm$0.06 \hspace*{-2.5mm}& --- \\
573 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&8.62$\pm$0.11 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&684
 \hspace*{-2.5mm}&30.93$\pm$0.15 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
574 \hspace*{-3.0mm}&31.06$\pm$0.21 \hspace*{-2.5mm}&8.64$\pm$0.15
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&1.91$\pm$0.03 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}&685 \hspace*{-2.5mm}&30.83$\pm$0.12 \hspace*{-2.5mm}& ---   
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
575 \hspace*{-3.0mm}&30.52$\pm$0.18 \hspace*{-2.5mm}&8.59$\pm$0.10
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&686 \hspace*{-2.5mm}&30.51$\pm$0.09 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}&4.17$\pm$0.10 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 2.24$\pm$0.11\\
576 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&8.57$\pm$0.11 \hspace*{-2.5mm}&
 4.05$\pm$0.08 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.78$\pm$0.12
 \hspace*{-2.5mm}&687 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&8.56$\pm$0.18
 \hspace*{-2.5mm}&4.13$\pm$0.09 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 2.50$\pm$0.08\\
582 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&8.11$\pm$0.11 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&691
 \hspace*{-2.5mm}&29.97$\pm$0.10 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 4.23$\pm$0.09 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.53$\pm$0.10\\
587 \hspace*{-3.0mm}&30.67$\pm$0.23 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
  --- \hspace*{-2.5mm}&1.86$\pm$0.03 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 697 \hspace*{-2.5mm}&30.05$\pm$0.41 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
589 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&8.25$\pm$0.13 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}&1.83$\pm$0.02 \hspace*{-2.5mm}&2.52$\pm$0.26 \hspace*{-2.5mm}
 &700 \hspace*{-2.5mm}&29.99$\pm$0.21 \hspace*{-2.5mm}&8.38$\pm$0.10
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
590 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&3.98$\pm$0.16
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&702 
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&1.90$\pm$0.03 \hspace*{-2.5mm}& --- \\
591 \hspace*{-3.0mm}&29.66$\pm$0.17 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&703
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&1.89$\pm$0.03 \hspace*{-2.5mm}& --- \\
592 \hspace*{-3.0mm}&29.68$\pm$0.15 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}&1.87$\pm$0.03 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 704 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 4.21$\pm$0.09 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.89$\pm$0.19\\
593 \hspace*{-3.0mm}&30.03$\pm$0.12 \hspace*{-2.5mm}&7.80$\pm$0.08
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&1.95$\pm$0.04 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}&705 \hspace*{-2.5mm}&30.28$\pm$0.13 \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
594 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&7.87$\pm$0.06 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&706
 \hspace*{-2.5mm}&30.26$\pm$0.14 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
597 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&7.68$\pm$0.06 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&707
 \hspace*{-2.5mm}&30.18$\pm$0.19 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
598 \hspace*{-3.0mm}&29.40$\pm$0.17 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}&1.94$\pm$0.04 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 708 \hspace*{-2.5mm}&30.45$\pm$0.21 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}&2.00$\pm$0.05 \hspace*{-2.5mm}& --- \\
599 \hspace*{-3.0mm}&29.40$\pm$0.29 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 4.05$\pm$0.13 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.79$\pm$0.30
 \hspace*{-2.5mm}&709 \hspace*{-2.5mm}&30.76$\pm$0.28 \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
600 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&7.69$\pm$0.07 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&710
 \hspace*{-2.5mm}&31.18$\pm$0.26 \hspace*{-2.5mm}&8.56$\pm$0.10
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
601 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&7.91$\pm$0.08 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}&1.92$\pm$0.05 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&711
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&8.49$\pm$0.17 \hspace*{-2.5mm}&
 3.89$\pm$0.07 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.90$\pm$0.10\\
606 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&7.98$\pm$0.07 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&713
 \hspace*{-2.5mm}&30.52$\pm$0.11 \hspace*{-2.5mm}&8.38$\pm$0.12
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
613 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&8.25$\pm$0.12 \hspace*{-2.5mm}&
 4.22$\pm$0.11 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&3.11$\pm$0.16
 \hspace*{-2.5mm}&715 \hspace*{-2.5mm}&30.69$\pm$0.23 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
615 \hspace*{-3.0mm}&30.05$\pm$0.28 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&719
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&1.93$\pm$0.04 \hspace*{-2.5mm}& --- \\
616 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&4.26$\pm$0.07
 \hspace*{-2.5mm}&2.00$\pm$0.05 \hspace*{-2.5mm}&3.02$\pm$0.15 \hspace*{-2.5mm}
 &725 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&1.99$\pm$0.04 \hspace*{-2.5mm}& --- \\
617 \hspace*{-3.0mm}&30.28$\pm$0.10 \hspace*{-2.5mm}&8.27$\pm$0.22
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&736 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&8.18$\pm$0.09
 \hspace*{-2.5mm}&4.08$\pm$0.09 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 2.10$\pm$0.09\\
618 \hspace*{-3.0mm}&30.84$\pm$0.18 \hspace*{-2.5mm}&8.33$\pm$0.13
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.05$\pm$0.05 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}&741 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&3.77$\pm$0.06 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 2.24$\pm$0.04\\
620 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&2.12$\pm$0.03 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&742
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&3.82$\pm$0.06
 \hspace*{-2.5mm}&1.83$\pm$0.03 \hspace*{-2.5mm}&2.35$\pm$0.06\\
621 \hspace*{-3.0mm}&31.05$\pm$0.14 \hspace*{-2.5mm}&8.57$\pm$0.11
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.00$\pm$0.02 \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&746 \hspace*{-2.5mm}&28.82$\pm$0.18 \hspace*{-2.5mm}&
 7.80$\pm$0.08 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&1.83$\pm$0.03
 \hspace*{-2.5mm}& --- \\
623 \hspace*{-3.0mm}&31.49$\pm$0.16 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}&2.06$\pm$0.06 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 748 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&7.66$\pm$0.08 \hspace*{-2.5mm}&
 3.49$\pm$0.07 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.15$\pm$0.10\\
624 \hspace*{-3.0mm}&31.55$\pm$0.11 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}&1.99$\pm$0.04 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 749 \hspace*{-2.5mm}&28.36$\pm$0.32 \hspace*{-2.5mm}&7.37$\pm$0.04
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
626 \hspace*{-3.0mm}&31.80$\pm$0.24 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}&2.09$\pm$0.03 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 754 \hspace*{-2.5mm}&28.62$\pm$0.08 \hspace*{-2.5mm}&7.60$\pm$0.06
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
627 \hspace*{-3.0mm}&32.82$\pm$0.36 \hspace*{-2.5mm}&8.60$\pm$0.08
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.16$\pm$0.07 \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&757 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&7.30$\pm$0.06
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&1.78$\pm$0.02 \hspace*{-2.5mm}& --- \\
628 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&8.52$\pm$0.13 \hspace*{-2.5mm}&
 4.40$\pm$0.14 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&3.16$\pm$0.21
 \hspace*{-2.5mm}&758 \hspace*{-2.5mm}&29.91$\pm$0.23 \hspace*{-2.5mm}&
 7.13$\pm$0.05 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&1.73$\pm$0.03
 \hspace*{-2.5mm}& --- \\
643 \hspace*{-3.0mm}&33.86$\pm$0.33 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}&2.21$\pm$0.07 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 759 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&7.06$\pm$0.05 \hspace*{-2.5mm}& 
 --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
644 \hspace*{-3.0mm}&33.60$\pm$0.16 \hspace*{-2.5mm}&8.95$\pm$0.11
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&765 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&7.20$\pm$0.05
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \\
645 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&8.90$\pm$0.15 \hspace*{-2.5mm}&
 4.64$\pm$0.14 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&3.90$\pm$0.21
 \hspace*{-2.5mm}&766 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& ---         
 \hspace*{-2.5mm}&3.75$\pm$0.05 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 2.54$\pm$0.13\\
648 \hspace*{-3.0mm}&33.76$\pm$0.33 \hspace*{-2.5mm}&9.31$\pm$0.21
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&767 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&7.04$\pm$0.05
 \hspace*{-2.5mm}&3.82$\pm$0.05 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 2.96$\pm$0.17\\
649 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&9.33$\pm$0.14 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&769
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&1.82$\pm$0.03 \hspace*{-2.5mm}& --- \\
650 \hspace*{-3.0mm}&34.34$\pm$0.23 \hspace*{-2.5mm}&9.30$\pm$0.21
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.17$\pm$0.09 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}&777 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&1.88$\pm$0.03 \hspace*{-2.5mm}& --- \\
652 \hspace*{-3.0mm}&33.92$\pm$0.29 \hspace*{-2.5mm}&9.44$\pm$0.17
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&778 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&7.88$\pm$0.10
 \hspace*{-2.5mm}&4.03$\pm$0.09 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&
 2.88$\pm$0.12\\
653 \hspace*{-3.0mm}& --- \hspace*{-2.5mm}&9.52$\pm$0.17 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&797
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- \hspace*{-2.5mm}& --- 
 \hspace*{-2.5mm}&1.87$\pm$0.02 \hspace*{-2.5mm}& --- \\
654 \hspace*{-3.0mm}&33.93$\pm$0.10 \hspace*{-2.5mm}&9.35$\pm$0.16
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.03$\pm$0.04 \hspace*{-2.5mm}& ---
 \hspace*{-2.5mm}&809 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&8.18$\pm$0.09
 \hspace*{-2.5mm}& --- \hspace*{-2.5mm}&2.01$\pm$0.05 \hspace*{-2.5mm}& --- \\
\hline
\end{tabular}
\end{table*}
%
\end{document}






