\documentstyle{l-aa}
\begin{document}
\begin{table*}
\caption[]{{\em UBV} photoelectric photometry of CH Cyg during 1991-1995.
MJD = JD -- 2440000.}
\begin{flushleft}
\begin{tabular}{crrr|crrr|crrr|crrr}\\
\hline
  MJD    &   U   &   B   &  V   &  MJD   &   U   &   B   &    V   &
  MJD    &   U   &   B   &  V   &  MJD   &   U   &   B   &    V   \\  
\hline
8379 &  9.48 & 10.03 & 8.58 &8865 &  8.34 &  8.94 & 8.07 &
			     9294 &  7.42 &  8.32 & 7.67 &
			     9897 & 10.45 & 10.13 & 8.53 \\
8411 &  9.84 & 10.32 & 8.74 &8870 &  8.34 &  8.91 & 8.12 &
			     9496 &  7.55 &  8.35 & 7.75 &
			     9902 & 10.86 & 10.31 & 8.56 \\
8425 &  9.48 &  9.63 & 8.57 &8881 &  8.53 &  9.10 & 8.19 &
			     9499 &  7.14 &  8.00 & 7.52 &
			     9903 & 11.16 & 10.34 & 8.65 \\
8439 & 10.27 & 10.29 & 8.58 &8899 & 10.72 & 10.32 & 8.62 &
			     9583 &  7.04 &  7.75 & 7.34 &
			     9916 & 11.12 & 10.41 & 8.62 \\
8457 & 10.70 & 10.44 & 8.60 &8902 & 10.51 & 10.55 & 8.59 &
			     9598 &  6.71 &  7.68 & 7.42 &
			     9917 & 11.11 & 10.40 & 8.62 \\
8462 & 10.96 & 10.54 & 8.66 &8924 &  9.33 &  9.55 & 8.27 &
			     9610 &  7.13 &  7.95 & 7.50 &
                             9920 & 11.07 & 10.42 & 8.67 \\
8470 &  9.99 & 10.19 & 8.59 &8961 &  9.12 &  9.51 & 8.27 &
			     9615 &  7.15 &  8.04 & 7.59 &
                             9921 & 11.04 & 10.43 & 8.68 \\
8471 & 10.06 & 10.17 & 8.59 &9141 &  7.43 &  8.20 & 7.52 &
			     9617 &  7.36 &  8.09 & 7.59 &
                             9924 & 11.04 & 10.44 & 8.70 \\
8782 &  8.20 &  9.03 & 8.40 &9150 &  7.72 &  8.59 & 7.83 &
			     9642 &  9.51 &  9.68 & 8.52 &
                             9929 & 11.07 & 10.46 & 8.73 \\
8784 &  7.92 &  8.76 & 8.15 &9178 &  8.61 &  9.28 & 8.17 &
			     9675 &  9.27 &  9.57 & 8.53 &
			     9931 & 10.97 & 10.44 & 8.72 \\
8814 &  8.89 &  9.58 & 8.61 &9179 &  8.03 &  8.94 & 8.16 &
			     9840 &  8.50 &  8.97 & 8.19 &
			          &       &       &      \\
8833 &  8.34 &  9.03 & 8.23 &9227 &  7.75 &  8.67 & 7.91 &
			     9855 &  9.27 &  9.74 & 8.78 &
			          &       &       &      \\
8836 &  8.20 &  9.00 & 8.28 &9236 &  7.83 &  8.75 & 7.95 &
			     9862 &  9.08 &  9.49 & 8.61 &
			          &       &       &      \\
8840 &  8.07 &  8.86 & 8.15 &9253 &  8.17 &  8.98 & 8.14 &
			     9881 &  9.15 &  9.63 & 8.60 &
			          &       &       &      \\
8857 &  8.42 &  9.06 & 8.21 &9255 &  7.87 &  8.68 & 7.98 &
			     9882 &  9.46 &  9.79 & 8.70 &
			          &       &       &      \\
8860 &  8.72 &  9.30 & 8.28 &9292 &  7.53 &  8.38 & 7.74 &
			     9885 &  9.50 &  9.80 & 8.60 &
			          &       &       &      \\
\hline
\end{tabular}
\end{flushleft}
\end{table*}
\end{document}
