Table 1: Log of IUE FES Observations

Date Time (UT) Countsa ffiX ffiY Phaseb Focus HH MM SS (f/o) Step

10 Nov 90 03 54 59 4916 0 0 0.9560 -2.12 10 Nov 90 03 56 24 4923 0 0 0.9563 10 Nov 90 05 07 04 4392 0 0 0.9716 -2.86 10 Nov 90 05 08 18 4399 -1 0 0.9719 10 Nov 90 05 48 02 3874 0 0 0.9805 -2.83 10 Nov 90 05 49 27 3855 -1 0 0.9808 10 Nov 90 06 59 38 2983 0 0 0.9961 -3.15 10 Nov 90 07 00 51 2974 -1 0 0.9963 10 Nov 90 07 40 53 3036 0 0 0.0050 -3.06 10 Nov 90 07 42 13 3047 -1 0 0.0053 10 Nov 90 08 51 29 3926 0 0 0.0204 -3.38 10 Nov 90 08 52 56 3951 0 0 0.0207 10 Nov 90 09 32 58 4443 -1 2 0.0294 -3.39 10 Nov 90 09 35 40 4425 0 0 0.0300 10 Nov 90 10 47 04 4752 0 -1 0.0455 -3.39 10 Nov 90 10 48 25 4741 0 -1 0.0458 10 Nov 90 11 02 19 4766 -1 1 0.0488 -3.72 10 Nov 90 11 03 26 4765 -2 1 0.0490 10 Nov 90 11 43 03 4760 -2 1 0.0576 -3.28 10 Nov 90 11 44 13 4760 -2 2 0.0579 10 Nov 90 13 02 52 4690 -1 0 0.0749 -3.71 10 Nov 90 13 04 02 4690 -2 0 0.0752 10 Nov 90 13 48 16 4622 -1 0 0.0848 -4.06 10 Nov 90 13 49 17 4624 -1 -1 0.0850 10 Nov 90 14 58 24 4574 -1 -1 0.1000 -4.41 10 Nov 90 14 59 21 4594 -1 0 0.1002 10 Nov 90 15 41 44 4627 -1 0 0.1094 -4.45 10 Nov 90 15 42 45 4621 -1 -2 0.1097 10 Nov 90 15 44 18 4649 -2 0 0.1100 10 Nov 90 17 30 50 4694 -1 0 0.1331 -3.89 10 Nov 90 17 32 01 4702 -1 0 0.1334 10 Nov 90 18 15 44 4707 0 0 0.1429 -3.50 10 Nov 90 18 16 45 4713 -1 0 0.1431 10 Nov 90 19 55 04 4763 -1 0 0.1644 -2.19 10 Nov 90 19 56 22 4764 -1 0 0.1647 10 Nov 90 20 04 19 4777 0 1 0.1664 -2.19 10 Nov 90 20 05 42 4779 -1 1 0.1667 10 Nov 90 20 44 48 4810 0 0 0.1752 -2.49 10 Nov 90 20 46 06 4794 -1 0 0.1755 10 Nov 90 22 26 46 4868 0 0 0.1974 -1.98 10 Nov 90 22 28 05 4855 -1 0 0.1977 10 Nov 90 23 07 49 4814 0 0 0.2063 -1.98 10 Nov 90 23 09 06 4820 0 0 0.2066 11 Nov 90 00 47 55 4800 0 0 0.2280 -2.29 11 Nov 90 00 51 11 4700 2 0 0.2287 11 Nov 90 01 30 28 4860 1 0 0.2372 -1.97 11 Nov 90 01 31 25 4867 1 0 0.2374 11 Nov 90 03 10 34 4978 0 0 0.2590 -1.01 11 Nov 90 03 11 52 4985 1 0 0.2593 11 Nov 90 03 51 30 4953 1 0 0.2679 -1.44 11 Nov 90 03 52 50 4939 2 -1 0.2681 11 Nov 90 05 34 14 4855 0 0 0.2902 -1.01 11 Nov 90 05 35 23 4861 1 0 0.2904

Table continued on next page...

Table 1 (continued): Log of IUE FES Observations

Date Time (UT) Countsa ffiX ffiY Phaseb Focus HH MM SS f/o Step

11 Nov 90 06 14 53 4829 1 0 0.2990 -1.83 11 Nov 90 06 16 11 4801 2 0 0.2993 11 Nov 90 07 55 14 4768 1 -1 0.3208 -1.01 11 Nov 90 07 56 28 4754 1 0 0.3210 11 Nov 90 08 04 42 4786 0 1 0.3228 -1.01 11 Nov 90 08 05 54 4772 1 0 0.3231 11 Nov 90 08 45 48 4755 1 0 0.3318 -2.33 11 Nov 90 08 47 03 4734 1 0 0.3320 11 Nov 90 10 36 13 4685 1 -1 0.3557 -2.33 11 Nov 90 10 37 36 4698 1 -1 0.3560 11 Nov 90 10 53 25 4633 3 -2 0.3595 -2.76 11 Nov 90 10 55 39 4710 0 0 0.3599 11 Nov 90 11 51 48 4697 -1 0 0.3721 -2.76 11 Nov 90 11 52 55 4680 -1 0 0.3724 11 Nov 90 13 21 37 4561 0 0 0.3916 -3.65 11 Nov 90 13 32 36 4586 -1 0 0.3940 11 Nov 90 14 25 59 4514 -1 0 0.4056 -4.12 11 Nov 90 14 27 01 4527 -1 -1 0.4058 11 Nov 90 16 05 35 4554 -1 0 0.4272 -4.15 11 Nov 90 16 06 44 4561 -3 0 0.4275 11 Nov 90 16 10 09 4558 -3 0 0.4282 11 Nov 90 16 58 51 4563 0 0 0.4388 -3.29 11 Nov 90 16 59 49 4568 -1 0 0.4390 11 Nov 90 18 52 50 4440 -1 1 0.4635 -3.64 11 Nov 90 18 53 58 4442 -2 1 0.4638 11 Nov 90 19 46 46 3859 -2 0 0.4753 -2.79 11 Nov 90 19 48 08 3849 -3 0 0.4756 11 Nov 90 21 37 35 2513 0 0 0.4993 -2.71 11 Nov 90 21 38 46 2508 0 0 0.4996 11 Nov 90 22 29 05 3020 0 0 0.5105 -1.80 11 Nov 90 22 30 06 3033 0 0 0.5107 12 Nov 90 00 10 05 4450 0 0 0.5324 -1.37 12 Nov 90 00 11 21 4462 0 0 0.5327 12 Nov 90 01 02 56 4741 0 0 0.5439 -0.46 12 Nov 90 01 03 52 4745 0 0 0.5441 12 Nov 90 02 43 26 4628 1 -1 0.5657 -1.74 12 Nov 90 02 44 25 4628 2 -1 0.5659 12 Nov 90 03 34 20 4608 0 0 0.5767 -1.69 12 Nov 90 03 35 25 4620 0 0 0.5770 12 Nov 90 05 15 51 4567 1 0 0.5988 -2.19 12 Nov 90 05 16 48 4545 1 0 0.5990 12 Nov 90 05 23 32 4566 1 0 0.6005 -2.19 12 Nov 90 05 24 31 4548 2 0 0.6007 12 Nov 90 06 33 46 4552 1 0 0.6157 -2.61 12 Nov 90 06 34 55 4545 1 0 0.6160 12 Nov 90 07 44 18 4523 0 0 0.6310 -2.61 12 Nov 90 07 45 10 4535 0 0 0.6312 12 Nov 90 08 22 39 4546 1 -1 0.6393 -3.04 12 Nov 90 08 23 37 4545 1 -1 0.6395

Table continued on next page...

Table 1 (continued): Log of IUE FES Observations

Date Time (UT) Countsa ffiX ffiY Phaseb Focus HH MM SS (f/o) Step

12 Nov 90 10 03 50 4534 1 0 0.6613 -2.65 12 Nov 90 10 05 09 4529 1 0 0.6616 12 Nov 90 10 54 33 4521 0 0 0.6723 -2.65 12 Nov 90 10 55 55 4528 1 -1 0.6726 12 Nov 90 11 04 24 4552 1 0 0.6745 -3.07 12 Nov 90 11 05 23 4537 1 0 0.6747 12 Nov 90 12 43 13 4566 0 -1 0.6959 -2.65 12 Nov 90 12 44 12 4580 0 -1 0.6961 12 Nov 90 13 42 19 4529 -1 -1 0.7087 -3.54 12 Nov 90 13 43 18 4534 -1 -1 0.7090 12 Nov 90 15 46 07 4508 -1 0 0.7356 -4.07 12 Nov 90 15 47 06 4499 -1 0 0.7358 12 Nov 90 16 36 24 4535 -1 -1 0.7465 -3.71 12 Nov 90 16 37 25 4540 -2 -1 0.7468 12 Nov 90 18 25 22 4583 0 0 0.7702 -3.21 12 Nov 90 18 26 19 4592 -1 0 0.7704 12 Nov 90 19 14 58 4600 0 0 0.7810 -3.64 12 Nov 90 19 16 13 4608 -2 0 0.7812 12 Nov 90 20 58 50 4656 0 0 0.8035 -3.29 12 Nov 90 21 00 44 4668 0 -1 0.8039 12 Nov 90 21 50 30 4703 0 0 0.8147 -2.64 12 Nov 90 21 51 30 4701 0 -1 0.8149 12 Nov 90 23 31 05 4789 0 0 0.8366 -1.30 12 Nov 90 23 32 24 4786 0 0 0.8369 13 Nov 90 00 21 47 4851 0 0 0.8476 -1.30 13 Nov 90 00 23 03 4853 0 0 0.8478 13 Nov 90 02 03 04 4819 0 0 0.8695 -1.67 13 Nov 90 02 04 21 4813 1 0 0.8698 13 Nov 90 02 53 49 4781 2 -1 0.8806 -2.10 13 Nov 90 02 55 02 4761 2 -1 0.8808 13 Nov 90 04 36 02 4760 0 0 0.9028 -2.59 13 Nov 90 04 37 18 4760 0 0 0.9030 13 Nov 90 05 29 32 4736 1 0 0.9144 -2.54 13 Nov 90 05 30 48 4714 2 -1 0.9146 13 Nov 90 05 39 30 4741 1 0 0.9165 -2.54 13 Nov 90 05 40 44 4732 2 0 0.9168 13 Nov 90 06 59 59 4721 1 0 0.9340 -2.54 13 Nov 90 07 01 53 4710 1 0 0.9344 13 Nov 90 07 30 37 4749 0 0 0.9407 -2.61 13 Nov 90 07 31 38 4740 1 -1 0.9409 13 Nov 90 08 56 14 4759 1 0 0.9592 -2.61 13 Nov 90 08 57 14 4754 1 0 0.9595 13 Nov 90 09 38 27 4531 1 0 0.9684 -2.19 13 Nov 90 09 41 49 4490 4 -1 0.9691 13 Nov 90 11 22 08 3299 0 0 0.9909 -2.19

aFast-Track Overlap mode.

bPhases are computed using the ephemeris HJD2443548.6695 + 3.198584E.